Table 5. Correlation coefficients of the resolved system; rows 1 to 6 correspond respectively to therectangular coordinates of initial position and velocity of (17) Thetis, while the last row concerns themass of (11) Parthenope1.00-0.211.00-0.09-0.761.000.680.25-0.041.00 0.92-0.12-0.220.571.000.45-0.270.110.400.261.00-0.600.070.11-0.44-0.72-0.321.00