
\documentstyle{article}

\begin{document}

\begin{table*}
\begin{flushleft}
\begin{tabular}{rrrr@{\hspace{5mm}+}*{7}{r}l}
\hline
\# & \multicolumn{3}{c}{RA(1950)} & \multicolumn{3}{c}{Dec(1950)} &
$F_{12}$ & $F_{25}$ & $F_{60}$ & $F_{100}$ & Name \\
\hline
 1 & 22 & 27 & 21.6 & 74 & 52 & 36 & $<0.07$ & $<0.04$ &  0.32 &       & \\
 2 & 22 & 27 & 37.4 & 74 & 48 & 37 & $<0.04$ &  0.08 &  0.35 &       & \\
 3 & 22 & 28 & 17.1 & 75 &  6 & 40 &  0.08 &  0.10 &  0.68 &  3.10 &
IRAS\,22282+7506 \\
 4 & 22 & 29 &  3.4 & 74 & 58 & 40 & $<0.06$ &  0.34 &  0.87 &       &
IRAS\,22290+7458 \\
 5 & 22 & 29 & 34.3 & 74 & 58 & 20 & $<0.06$ & $<0.05$ &  0.84 &       & \\
 6 & 22 & 30 &  5.0 & 74 & 58 & 10 & $<0.06$ & $<0.04$ &  0.79 &       & \\
 7 & 22 & 33 & 11.4 & 75 &  2 & 36 &  1.22 &  1.97 &  2.01 &       &
IRAS\,22331+7502, H$\alpha$\,1 \\
 8 & 22 & 34 & 22.0 & 75 &  1 & 32 &  4.97 & 26.08 & 66.34 & 80.04 &
IRAS\,22343+7501 \\
 9 & 22 & 35 &  3.6 & 75 &  2 & 59 &  0.36 &  0.66 &  0.99 &       &
IRAS\,22350+7502, H$\alpha$\,2 \\
10 & 22 & 35 & 32.6 & 75 &  5 & 55 &  0.11 &  0.24 &  0.23 &       &
IRAS\,22355+7505 \\
11 & 22 & 36 &  9.6 & 75 &  6 & 39 &  9.17 &  2.17 &  0.29 &       &
IRAS\,22361+7506, HD\,214710 \\
12 & 22 & 36 & 47.3 & 74 & 48 & 38 & $<0.05$ &  0.14 &  0.24 &       &
H$\alpha$\,3 \\
13 & 22 & 37 & 11.0 & 74 & 55 & 37 &  0.27 &  0.51 & $<9.21$ &       & \\
14 & 22 & 37 & 40.8 & 74 & 55 & 50 &  0.80 &  5.55 & 32.34 & 66.84 &
IRAS\,22376+7455 \\
15 & 22 & 38 &  0.0 & 74 & 55 & 51 &  0.16 &  0.50 & $<8.23$ &       & \\
16 & 22 & 38 & 20.3 & 74 & 54 & 49 &  0.12 &  0.26 & $<7.11$ &       &
H$\alpha$\,45 \\
17 & 22 & 38 & 34.1 & 74 & 57 & 53 &  0.35 &  0.31 &  0.32 &       &
IRAS\,22385+7457, H$\alpha$\,46 \\
18 & 22 & 39 & 45.1 & 74 & 54 & 15 &  0.22 &  0.23 &  2.33 &  6.24 &
IRAS\,22397+7454, UGC\,12160 \\
19 & 22 & 39 & 49.7 & 74 & 48 & 12 & $<0.07$ &  0.20 &  1.34 &       &
IRAS\,22398+7448 \\
\hline
\end{tabular}
\end{flushleft}
\end{table*}
\end{document}
