\documentstyle{l-aa}
\begin{document}

\begin{table*}[]
  \caption[]{ISOCAM sources with mid-IR excesses.
    \label{table1}}


  \begin{tabular}{l l l l l l l}

\noalign{\smallskip}
\hline
\noalign{\smallskip}


ISO-CrA   & RA(1950)  & DEC(1950)  & F(6.7), Jy  & F(14.3), Jy  &
F(14.3)/F(6.7)  & Source id.\\

\noalign{\smallskip}
\hline
\noalign{\smallskip}


13    &  18:55:33.2   &  -37:11:45   &  0.144    &  0.065    &  0.45   & \\
55    &  18:56:21.0   &  -37:08:10   &  0.0040   &  0.0052   &  1.30   & \\
76    &  18:56:52.9   &  -37:02:09   &  0.0032   &  0.0058   &  1.81   & \\
83    &  18:56:58.2   &  -37:08:55   &  0.0106   &  0.0145   &  1.37   & \\
88    &  18:57:06.4   &  -37:00:17   &  0.0176   &  0.0081   &  0.46   &
GPg2, R9\\
110   &  18:57:40.2   &  -37:07:55   &  0.184    &  0.161    &  0.88   &
HR 7169, R5\\
116   &  18:57:46.4   &  -37:01:37   &  4.66     &  6.15     &  1.32   &
SCrA, VSS3, R8\\
127   &  18:57:55.6   &  -37:02:47   &  0.031    &  0.030    &  0.98   & \\
134   &  18:58:03.0   &  -37:03:39   &  0.139    &  0.077    &  0.55   &
VSS18, W97-2-2\\
135   &  18:58:04.2   &  -37:03:26   &  0.0149   &           &         &
Gpe2, W97-2-3, R7\\
139   &  18:58:09.5   &  -37:02:25   &  0.0106   &  0.0040   &  0.38   &
IRS14, W97-1-12\\
140   &  18:58:47.4   &  -37:01:08   &  0.0080   &           &         &
W97-1-79\\
143   &  18:58:50.6   &  -37:07:30   &  0.0041   &  0.0046   &  1.12   &
W97-1-83\\
145   &  18:58:52.2   &  -37:04:54   &  0.0112   &  0.0092   &  0.82   &
W97-1-89\\
155   &  18:59:04.9   &  -37:02:33   &  0.167    &  0.139    &  0.83   &
H$\alpha$14, W97-2-24\\
159   &  18:59:10.6   &  -37:02:45   &  0.233    &  0.181    &  0.77   &
H$\alpha$3\\
177   &  18:59:32.7   &  -36:50:45   &  0.0107   &  0.0073   &  0.68   & \\
182   &  18:59:36.1   &  -37:11:59   &  0.0249   &  0.106    &  4.27   &
iras32c\\
185   &  18:59:38.5   &  -37:12:16   &  0.0148   &  0.0121   &  0.82   &
iras32d\\
198   &  18:59:46.9   &  -37:01:46   &  0.062    &  0.034    &  0.55   & \\
201   &  18:59:48.8   &  -37:13:27   &  0.0060   &  0.008    &  1.33   & \\

\noalign{\smallskip}
\hline
\noalign{\smallskip}
\end{tabular}
\end{table*}



\begin{table*}
\caption[]{YSOs without detected mid-IR excesses.
  \label{table2}}

   \begin{tabular}{l l l l l l l}

\noalign{\smallskip}
\hline
\noalign{\smallskip}


ISO-CrA  & RA(1950)  & DEC(1950)  & F(6.7), Jy  & F(14.3), Jy  &
F(14.3)/F(6.7)  & Source id.\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}


46    &  18:56:09.2   &  -36:54:38   &  0.0147   &           &          &
R13(?)\\
94    &  18:57:16.9   &  -36:52:27   &  0.0092   &           &          &
R14\\
111   &  18:57:41.4   &  -37:07:59   &  0.2215   &  0.0594   &  0.27    &
HR 7170\\
118   &  18:57:47.6   &  -36:52:05   &  0.0364   &  0.0063   &  0.17    &
GPf2, R15\\
151   &  18:59:00.1   &  -37:00:03   &  0.0266   &  0.0065   &  0.24    &
GPw, R10, W97-99\\

\noalign{\smallskip}
\hline
\noalign{\smallskip}



\end{tabular}
\end{table*}
\end{document}
