
\def \bj{ b_{rm J}}
\halign{ \hfil# & \hfil# & \hfil# & \hfil# & \hfil# & \hfil# & \hfil# & 
\hfil# & \hfil# & \hfil# & \hfil# & \hfil# & \hfil# & \hfil# \cr 
 \multispan3 $\alpha$ & \multispan3 $\delta$ & $B$ & $V$ & $\bj$ & $m_{APM}$&
 Class. Flag & X & Y \cr
 F053 \cr
    2  &20  &49.2   &-67 &-51 &-44.0   &19.56   &18.80   &19.37    &9.95 &2598.00    &9644.0  &-14561.0 \cr
    2  &20  &46.5   &-67 &-51 &-20.4   &20.45   &19.73   &20.27    &8.80 &1670.00    &9675.0  &-14603.0 \cr
    2  &20  &45.3   &-67 &-52  &-6.8   &19.72   &18.74   &19.47    &9.75 &2397.00    &9682.0  &-14516.0 \cr
    2  &20  &37.7   &-67 &-52 &-53.1   &20.89   &19.56   &20.55    &8.54 &-730.00    &9756.0  &-14425.0 \cr
    2  &20  &32.7   &-67 &-51 &-55.3   &20.96   &19.34   &20.55    &8.59  &783.00    &9816.0  &-14529.0 \cr
    2  &20  &32.0   &-67 &-52 &-25.7   &20.44   &19.53   &20.21    &8.93 &1781.00    &9820.0  &-14472.0 \cr
    2  &20  &25.8   &-67 &-52  &-3.5   &17.43   &16.44   &17.18   &12.23 &3263.00    &9887.0  &-14509.0 \cr
F108    \cr
   21  &54  &15.1   &-65 &-41 &-16.7   &20.20   &19.70   &20.07    &9.33 &1287.00    &3905.0    &3912.0 \cr
   21  &54   &9.9   &-65 &-43 &-10.4   &18.95   &18.12   &18.74   &10.80 &-564.00    &3960.0    &4125.0 \cr
   21  &53  &56.1   &-65 &-41 &-46.8   &20.67   &19.96   &20.49    &9.01 &-592.00    &4123.0    &3973.0 \cr
   21  &53  &54.1   &-65 &-41 &-16.9   &18.83   &17.83   &18.58   &10.99 &2033.00    &4147.0    &3918.0 \cr
   21  &53  &53.6   &-65 &-42  &-4.6   &18.77   &17.41   &18.42   &11.07 &2281.00    &4151.0    &4007.0 \cr
   21  &53  &48.6   &-65 &-42 &-10.3   &20.93   &19.59   &20.59    &9.20 &-557.00    &4208.0    &4019.0 \cr
   21  &53  &47.7   &-65 &-42  &-1.1   &20.42   &19.53   &20.20    &9.31  &104.00    &4218.0    &4002.0 \cr
 F110 \cr
   23   &6  &48.9   &-66 &-51 &-34.2   &20.99   &20.86   &20.96    &8.34 &-133.00   &13905.0   &12375.0 \cr
   23   &6  &52.1   &-66 &-52 &-17.8   &21.03   &19.43   &20.62    &8.64  &597.00   &13863.0   &12453.0 \cr
   23   &6  &46.1   &-66 &-51 &-49.0   &20.82   &19.24   &20.42    &8.88 &1487.00   &13933.0   &12405.0 \cr
   23   &6  &45.1   &-66 &-52 &-12.2   &20.22   &19.58   &20.06    &9.13  &135.00   &13941.0   &12449.0 \cr
   23   &6  &33.1   &-66 &-50 &-50.9   &18.24   &17.01   &17.93   &11.23 &2781.00   &14084.0   &12309.0 \cr
   23   &6  &29.1   &-66 &-52 &-16.8   &19.98   &18.43   &19.59    &9.69 &1840.00   &14115.0   &12472.0 \cr
 F111 \cr
   23  &51  &22.8   &-58 &-39 &-35.7   &19.01   &18.67   &18.93    &9.73 &-142.00    &7697.0   &-9663.0 \cr
   23  &51  &22.3   &-58 &-39  &-5.5   &17.55   &16.83   &17.37   &11.83 &2026.00    &7706.0   &-9719.0 \cr
   23  &51  &20.6   &-58 &-37 &-56.4   &19.92   &18.58   &19.58    &9.33 &-390.00    &7734.0   &-9847.0 \cr
   23  &51   &4.3   &-58 &-39 &-20.3   &18.43   &17.27   &18.14   &10.98 &2337.00    &7967.0   &-9684.0 \cr
 F113 \cr
    0  &53  &33.8   &-61 &-23 &-17.6   &19.78   &19.32   &19.67    &9.72 &1925.00   &17854.0    &9528.0 \cr
    0  &53  &22.2   &-61 &-24 &-33.4   &19.50   &17.88   &19.09   &10.45 &2417.00   &17997.0    &9682.0 \cr
    0  &53  &11.0   &-61 &-23 &-44.5   &20.21   &19.21   &19.96    &9.24  &119.00   &18153.0    &9604.0 \cr
    0  &53   &9.1   &-61 &-23 &-26.1   &19.91   &18.90   &19.66    &9.65 &1597.00   &18181.0    &9572.0 \cr
 F145 \cr
   21  &41  &17.3   &-62 &-37  &-1.6   &19.48   &18.20   &19.16   &10.02 &1781.00   &-6957.0   &16789.0 \cr
   21  &41  &13.7   &-62 &-37 &-32.5   &19.62   &19.07   &19.48    &9.90 &2436.00   &-6909.0   &16845.0 \cr
   21  &41   &8.9   &-62 &-36  &-6.6   &20.85   &19.64   &20.54    &8.81 &-662.00   &-6853.0   &16683.0 \cr
   21  &41   &6.1   &-62 &-37 &-39.2   &17.73   &16.64   &17.45   &12.04 &-5000.00   &-6810.0   &16854.0 \cr
   21  &41   &5.8   &-62 &-36 &-55.7   &20.77   &19.47   &20.44    &9.08 &1656.00   &-6809.0   &16773.0 \cr
   21  &40  &60.0   &-62 &-37  &-3.5   &20.11   &19.29   &19.90    &9.54 &2398.00   &-6734.0   &16785.0 \cr
   21  &40  &57.4   &-62 &-36 &-53.9   &20.73   &19.54   &20.43    &8.93 &1116.00   &-6701.0   &16766.0 \cr
   21  &40  &55.3   &-62 &-37 &-34.1   &20.62   &19.34   &20.30    &9.24 &1491.00   &-6672.0   &16840.0 \cr
 F147 \cr
   23  &11  &15.2   &-61 &-53  &-9.3   &19.90   &19.12   &19.70    &9.66 &1247.00  &-18418.0   &12962.0 \cr
   23  &11  &12.2   &-61 &-53  &-4.7   &19.48   &18.77   &19.30    &9.78 &1369.00  &-18380.0   &12950.0 \cr
   23  &11   &5.6   &-61 &-53 &-26.7   &18.26   &17.04   &17.95   &11.02 &2127.00  &-18289.0   &12983.0 \cr
   23  &11   &5.0   &-61 &-51 &-55.9   &20.61   &19.80   &20.40    &9.05 &1302.00  &-18297.0   &12814.0 \cr
   23  &11   &2.9   &-61 &-52 &-11.2   &19.81   &18.67   &19.52    &9.55  &629.00  &-18267.0   &12840.0 \cr
   23  &11   &1.1   &-61 &-53 &-14.4   &16.21   &15.24   &15.97   &12.96 &2917.00  &-18233.0   &12955.0 \cr
   23  &10  &56.7   &-61 &-51 &-58.4   &19.96   &19.55   &19.86    &9.18   &62.00  &-18187.0   &12809.0 \cr
   23  &10  &53.8   &-61 &-52 &-49.8   &17.17   &16.39   &16.98   &12.11 &2324.00  &-18141.0   &12901.0 \cr
   23  &10  &53.0   &-61 &-52 &-13.1   &18.92   &17.50   &18.56   &10.98 &3043.00  &-18136.0   &12832.0 \cr
}
\vfil\eject \halign{ \hfil# & \hfil# & \hfil# & \hfil# & \hfil# & \hfil# & \hfil# & 
\hfil# & \hfil# & \hfil# & \hfil# & \hfil# & \hfil# & \hfil# \cr 
 F152 \cr
    1  &33   &4.9   &-52 &-51 &-41.1   &19.86   &18.68   &19.56    &9.94 &1904.00    &5783.0  &-14831.0 \cr
    1  &33   &0.5   &-52 &-52 &-16.3   &17.86   &16.93   &17.62   &12.13 &2230.00    &5856.0  &-14764.0 \cr
    1  &32  &54.7   &-52 &-52  &-2.8   &21.11   &20.66   &21.00    &9.13 &1983.00    &5953.0  &-14787.0 \cr
    1  &32  &49.4   &-52 &-52 &-50.7   &20.77   &18.75   &20.26    &9.69 &1604.00    &6041.0  &-14696.0 \cr
    1  &32  &48.7   &-52 &-53 &-17.5   &20.39   &19.34   &20.13    &9.34 &-334.00    &6052.0  &-14646.0 \cr
 F193 \cr
   23  &50  &14.5   &-47 &-56 &-56.6   &18.54   &18.06   &18.42   &10.72 &2480.00   &10812.0  &-14240.0 \cr
   23  &50  &12.0   &-47 &-57 &-29.2   &20.82   &19.87   &20.58    &8.45 &-357.00   &10857.0  &-14178.0 \cr
   23  &50  &11.0   &-47 &-56 &-39.9   &20.69   &20.03   &20.52    &8.50  &388.00   &10879.0  &-14269.0 \cr
   23  &50   &6.3   &-47 &-57 &-31.1   &16.85   &16.02   &16.64   &12.36 &2801.00   &10964.0  &-14171.0 \cr
   23  &50   &5.6   &-47 &-58  &-2.5   &20.05   &18.91   &19.77    &9.29 &1739.00   &10975.0  &-14112.0 \cr
   23  &50   &3.8   &-47 &-57 &-11.4   &21.05   &19.49   &20.65    &8.63 &1016.00   &11011.0  &-14206.0 \cr
   23  &50   &2.0   &-47 &-56 &-31.7   &21.00   &20.11   &20.77    &8.37 &1071.00   &11046.0  &-14279.0 \cr
   23  &50   &0.3   &-47 &-56 &-50.4   &20.83   &19.48   &20.48    &8.99 &1965.00   &11078.0  &-14243.0 \cr
 F195 \cr
    0  &59  &21.4   &-50  &-1 &-47.7   &17.82   &16.78   &17.56   &12.34 &2943.00    &1007.0    &-530.0 \cr
    0  &59  &20.5   &-50   &0 &-17.9   &20.00   &19.59   &19.90    &9.89 &1858.00    &1023.0    &-697.0 \cr
    0  &59  &19.6   &-50   &0 &-39.4   &20.37   &19.34   &20.11    &9.25 &-602.00    &1039.0    &-657.0 \cr
    0  &59  &14.6   &-50  &-1 &-58.2   &20.66   &19.52   &20.37    &9.53 &1975.00    &1128.0    &-510.0 \cr
    0  &59  &13.4   &-50   &0 &-31.1   &20.41   &19.28   &20.13    &9.79 &2042.00    &1151.0    &-672.0 \cr
    0  &59   &9.1   &-50   &0 &-19.7   &17.70   &16.59   &17.42   &11.90 &2488.00    &1228.0    &-693.0 \cr
 F199 \cr
    2  &52  &45.2   &-52  &-9  &-7.4   &17.96   &16.72   &17.65   &11.59 &1934.00    &7613.0   &13848.0 \cr
    2  &52  &39.8   &-52  &-8 &-23.1   &17.74   &16.29   &17.37   &12.44 &2984.00    &7708.0   &13768.0 \cr
    2  &52  &35.4   &-52  &-8 &-35.0   &19.36   &18.11   &19.05   &10.48 &1800.00    &7783.0   &13792.0 \cr
    2  &52  &30.9   &-52  &-8  &-3.8   &19.84   &18.85   &19.59   &10.01 &1254.00    &7861.0   &13736.0 \cr
 F235 \cr
   20  &59  &46.1   &-50  &-1 &-27.1   &20.43   &19.99   &20.32    &9.12 &1594.00     &148.0    &-698.0 \cr
   20  &59  &44.2   &-50  &-2 &-49.8   &19.80   &18.76   &19.54    &9.88 &1429.00     &182.0    &-544.0 \cr
   20  &59  &40.9   &-50  &-3   &0.0   &17.68   &16.23   &17.31   &11.64 &2456.00     &242.0    &-525.0 \cr
   20  &59  &37.2   &-50  &-2 &-24.1   &17.83   &16.74   &17.55   &11.54 &2531.00     &307.0    &-592.0 \cr
   20  &59  &36.3   &-50  &-1 &-49.7   &21.05   &19.39   &20.63    &9.19 &2107.00     &323.0    &-656.0 \cr
   20  &59  &35.6   &-50  &-1 &-52.4   &20.90   &20.03   &20.68    &8.55  &303.00     &336.0    &-651.0 \cr
   20  &59  &30.2   &-50  &-1 &-24.5   &19.61   &18.54   &19.34   &10.20 &2301.00     &433.0    &-703.0 \cr
 F237 \cr
   22   &8   &6.0   &-52   &0 &-32.3   &20.82   &19.97   &20.61    &8.84  &741.00   &-8407.0   &13036.0 \cr
   22   &8   &4.3   &-52   &0 &-35.9   &19.84   &19.01   &19.63    &9.77 &1802.00   &-8378.0   &13042.0 \cr
   22   &8   &2.7   &-52  &-1  &-7.0   &20.55   &19.56   &20.30    &8.88 &-466.00   &-8348.0   &13099.0 \cr
   22   &8   &1.9   &-52  &-1 &-58.2   &20.11   &19.60   &19.98    &9.18  &259.00   &-8332.0   &13194.0 \cr
   22   &7  &58.1   &-52  &-1 &-49.5   &20.64   &20.13   &20.51    &8.73 &-325.00   &-8267.0   &13176.0 \cr
   22   &7  &55.3   &-52   &0 &-35.0   &20.53   &19.76   &20.34    &8.82 &-170.00   &-8223.0   &13036.0 \cr
   22   &7  &53.0   &-52   &0 &-44.2   &20.20   &19.43   &20.01    &9.59 &2244.00   &-8182.0   &13052.0 \cr
   22   &7  &53.1   &-52  &-1 &-21.2   &17.00   &16.08   &16.76   &12.22 &2035.00   &-8182.0   &13121.0 \cr
   22   &7  &46.4   &-52   &0 &-15.2   &20.24   &19.63   &20.09    &8.94 &-227.00   &-8071.0   &12995.0 \cr
   22   &7  &45.6   &-52   &0 &-50.3   &20.31   &19.70   &20.16    &9.13 &-345.00   &-8055.0   &13060.0 \cr
 F244 \cr
    1  &20  &58.6   &-44 &-45 &-30.8   &18.86   &17.56   &18.53   &10.87 &2481.00    &3797.0   &-2238.0 \cr
    1  &20  &57.9   &-44 &-43 &-58.3   &20.61   &19.37   &20.30    &9.45 &1588.00    &3814.0   &-2410.0 \cr
    1  &20  &57.6   &-44 &-44 &-17.0   &17.18   &16.29   &16.95   &12.24 &2568.00    &3819.0   &-2375.0 \cr
    1  &20  &56.2   &-44 &-43 &-46.8   &20.10   &19.63   &19.98    &9.45  &880.00    &3848.0   &-2431.0 \cr
    1  &20  &54.3   &-44 &-44 &-20.4   &19.90   &19.17   &19.72    &9.73 &1593.00    &3884.0   &-2368.0 \cr
    1  &20  &52.2   &-44 &-44 &-15.8   &21.40   &19.64   &20.96    &9.06 &1328.00    &3926.0   &-2376.0 \cr
    1  &20  &51.9   &-44 &-45 &-14.4   &17.21   &16.61   &17.06   &12.04 &1334.00    &3930.0   &-2267.0 \cr
    1  &20  &51.1   &-44 &-44 &-28.6   &20.17   &19.31   &19.95    &9.81 &2005.00    &3947.0   &-2352.0 \cr
    1  &20  &49.0   &-44 &-44 &-21.9   &21.36   &20.07   &21.04    &8.80 &1173.00    &3989.0   &-2364.0 \cr
}
\vfil\eject \halign{ \hfil# & \hfil# & \hfil# & \hfil# & \hfil# & \hfil# & \hfil# & 
\hfil# & \hfil# & \hfil# & \hfil# & \hfil# & \hfil# & \hfil# \cr 
 F249 \cr
    3  &33  &56.8   &-45 &-19  &-4.9   &17.30   &16.24   &17.03   &11.93 &2453.00   &11905.0    &1547.0 \cr
    3  &33  &52.9   &-45 &-19 &-33.2   &17.65   &16.54   &17.37   &11.40 &1771.00   &11981.0    &1602.0 \cr
    3  &33  &49.1   &-45 &-19  &-0.7   &19.66   &18.69   &19.41   &10.21 &2627.00   &12058.0    &1544.0 \cr
    3  &33  &49.2   &-45 &-19 &-42.7   &16.29   &15.24   &16.03   &13.05 &2316.00   &12052.0    &1622.0 \cr
    3  &33  &46.6   &-45 &-19 &-20.3   &17.40   &16.26   &17.11   &12.08 &3035.00   &12105.0    &1582.0 \cr
    3  &33  &40.7   &-45 &-19 &-58.1   &20.87   &20.58   &20.79    &8.93 &2000.00   &12218.0    &1656.0 \cr
    3  &33  &40.1   &-45 &-20 &-14.0   &20.17   &19.12   &19.90    &9.41   &63.00   &12230.0    &1686.0 \cr
 F287 \cr
   21  &37  &29.0   &-47 &-17 &-15.3   &20.27   &19.67   &20.12    &9.37 &1582.00  &-10871.0   &14745.0 \cr
   21  &37  &27.0   &-47 &-18 &-28.5   &20.65   &19.49   &20.35    &9.56 &2372.00  &-10828.0   &14880.0 \cr
   21  &37  &26.2   &-47 &-17 &-32.9   &19.75   &18.97   &19.55    &9.65 &-221.00  &-10816.0   &14776.0 \cr
   21  &37  &23.6   &-47 &-17 &-57.3   &16.85   &15.98   &16.63   &12.84 &2871.00  &-10766.0   &14820.0 \cr
   21  &37  &22.9   &-47 &-18 &-23.8   &20.57   &20.08   &20.44    &9.16 &-614.00  &-10751.0   &14869.0 \cr
   21  &37  &19.9   &-47 &-16 &-45.3   &19.72   &19.30   &19.61    &9.59  &199.00  &-10699.0   &14684.0 \cr
   21  &37  &19.2   &-47 &-17 &-23.1   &18.25   &17.49   &18.06   &11.15 &2294.00  &-10685.0   &14754.0 \cr
   21  &37  &19.4   &-47 &-16 &-50.9   &20.58   &20.33   &20.52    &8.77  &358.00  &-10689.0   &14694.0 \cr
   21  &37  &17.7   &-47 &-17 &-50.5   &18.15   &17.21   &17.91   &11.07 &1977.00  &-10654.0   &14804.0 \cr
   21  &37  &17.4   &-47 &-18 &-13.7   &19.13   &18.62   &19.00   &10.15 &1366.00  &-10647.0   &14847.0 \cr
   21  &37  &15.1   &-47 &-17 &-30.8   &17.83   &16.70   &17.54   &11.54 &2589.00  &-10607.0   &14766.0 \cr
   21  &37  &12.1   &-47 &-17 &-52.1   &20.96   &19.46   &20.58    &8.91  &664.00  &-10549.0   &14804.0 \cr
 F302 \cr
    3  &42  &56.8   &-41 &-21 &-53.3   &20.20   &18.97   &19.89    &9.38 &-692.00   &13887.0    &8703.0 \cr
    3  &42  &54.7   &-41 &-22  &-2.8   &20.78   &19.98   &20.58    &8.96 &-281.00   &13930.0    &8722.0 \cr
    3  &42  &54.2   &-41 &-21 &-46.4   &18.72   &17.66   &18.45   &11.07 &2535.00   &13943.0    &8692.0 \cr
    3  &42  &52.2   &-41 &-22  &-8.9   &19.69   &19.17   &19.56   &10.03 &1909.00   &13982.0    &8735.0 \cr
    3  &42  &52.2   &-41 &-23 &-40.7   &17.26   &16.23   &17.00   &12.07 &1772.00   &13978.0    &8906.0 \cr
    3  &42  &50.0   &-41 &-22 &-38.1   &18.12   &17.55   &17.98   &11.04 &2299.00   &14028.0    &8791.0 \cr
 F304 \cr
    4  &43  &28.1   &-38  &-3 &-58.9   &18.51   &17.69   &18.30   &11.16 &1823.00    &3287.0  &-13620.0 \cr
    4  &43  &27.7   &-38  &-3 &-26.6   &20.07   &18.68   &19.72   &10.19 &1752.00    &3296.0  &-13680.0 \cr
    4  &43  &27.0   &-38  &-3 &-37.3   &18.74   &18.16   &18.60   &10.99 &2200.00    &3311.0  &-13660.0 \cr
    4  &43  &19.5   &-38  &-3 &-21.1   &19.74   &19.50   &19.68    &9.99 &-5000.00    &3476.0  &-13689.0 \cr
 F342 \cr
   21   &0  &54.6   &-41 &-26 &-59.0   &21.22   &20.09   &20.94    &8.84  &540.00   &16375.0    &9458.0 \cr
   21   &0  &53.6   &-41 &-27 &-13.6   &20.93   &19.41   &20.54    &9.23  &218.00   &16394.0    &9486.0 \cr
   21   &0  &52.1   &-41 &-28  &-6.1   &21.06   &19.85   &20.76    &9.27 &1506.00   &16423.0    &9585.0 \cr
   21   &0  &50.5   &-41 &-26 &-58.8   &19.57   &18.07   &19.19   &10.64 &2333.00   &16460.0    &9461.0 \cr
   21   &0  &49.1   &-41 &-28 &-19.4   &20.31   &18.89   &19.95    &9.94 &1508.00   &16483.0    &9612.0 \cr
   21   &0  &48.4   &-41 &-27 &-47.4   &19.94   &19.35   &19.79   &10.13 &2357.00   &16500.0    &9553.0 \cr
   21   &0  &44.8   &-41 &-27 &-10.8   &21.05   &20.44   &20.89    &9.49 &2246.00   &16579.0    &9488.0 \cr
   21   &0  &40.9   &-41 &-28 &-13.1   &21.23   &20.39   &21.02    &8.73 &-568.00   &16656.0    &9607.0 \cr
 F344A \cr
   22   &6  &29.0   &-39 &-14 &-40.3   &17.57   &16.46   &17.29    &0.00 &-9999.00    &-514.0   &-5576.0 \cr
   22   &6  &26.3   &-39 &-13 &-40.8   &20.84   &20.74   &20.81    &0.00 &-9999.00    &-457.0   &-5687.0 \cr
   22   &6  &23.4   &-39 &-14 &-13.7   &19.75   &18.96   &19.55    &0.00 &-9999.00    &-394.0   &-5626.0 \cr
   22   &6  &21.3   &-39 &-14  &-8.4   &20.68   &19.98   &20.50    &0.00 &-9999.00    &-349.0   &-5636.0 \cr
   22   &6  &20.8   &-39 &-14 &-45.0   &20.46   &19.20   &20.14    &0.00 &-9999.00    &-337.0   &-5568.0 \cr
   22   &6  &18.9   &-39 &-14  &-1.5   &18.88   &18.04   &18.67    &0.00 &-9999.00    &-296.0   &-5649.0 \cr
   22   &6  &17.1   &-39 &-13 &-36.9   &19.64   &18.64   &19.39    &0.00 &-9999.00    &-257.0   &-5695.0 \cr
   22   &6  &16.8   &-39 &-13 &-50.4   &20.89   &20.35   &20.76    &0.00 &-9999.00    &-252.0   &-5670.0 \cr
 F344B \cr
   22  &16  &45.3   &-40   &0 &-46.1   &20.50   &19.01   &20.13    &0.00 &-9999.00  &-13671.0    &-182.0 \cr
   22  &16  &43.5   &-39 &-59 &-17.5   &21.03   &19.96   &20.76    &0.00 &-9999.00  &-13638.0    &-348.0 \cr
   22  &16  &43.4   &-40   &0 &-29.1   &21.52   &20.45   &21.25    &0.00 &-9999.00  &-13631.0    &-215.0 \cr
   22  &16  &41.9   &-39 &-59 &-11.7   &21.50   &21.23   &21.43    &0.00 &-9999.00  &-13604.0    &-360.0 \cr
   22  &16  &41.4   &-39 &-59  &-1.7   &19.21   &18.61   &19.06    &0.00 &-9999.00  &-13594.0    &-379.0 \cr
   22  &16  &39.3   &-40   &0 &-47.8   &17.94   &17.18   &17.75    &0.00 &-9999.00  &-13543.0    &-183.0 \cr
   22  &16  &37.8   &-40   &0  &-9.7   &17.82   &17.17   &17.66    &0.00 &-9999.00  &-13514.0    &-255.0 \cr
   22  &16  &37.0   &-39 &-59 &-28.6   &20.89   &20.19   &20.71    &0.00 &-9999.00  &-13498.0    &-332.0 \cr
   22  &16  &35.3   &-40   &0 &-14.4   &16.03   &15.03   &15.78    &0.00 &-9999.00  &-13460.0    &-248.0 \cr
 F347 \cr
   23  &23  &48.4   &-39 &-29 &-41.5   &21.54   &21.01   &21.41    &8.64 &1401.00     &256.0   &-4015.0 \cr
   23  &23  &44.5   &-39 &-30 &-55.9   &21.37   &20.39   &21.13    &8.65  &972.00     &339.0   &-3876.0 \cr
   23  &23  &42.9   &-39 &-30 &-10.2   &15.43   &14.52   &15.20   &13.57 &-5000.00     &375.0   &-3961.0 \cr
   23  &23  &41.3   &-39 &-30 &-40.7   &21.50   &20.53   &21.26    &8.15 &-171.00     &409.0   &-3904.0 \cr
   23  &23  &37.4   &-39 &-30 &-46.3   &21.21   &20.86   &21.12    &8.44 &1173.00     &494.0   &-3893.0 \cr
   23  &23  &35.5   &-39 &-31 &-16.8   &16.56   &15.69   &16.34   &12.65 &-5000.00     &533.0   &-3836.0 \cr
   23  &23  &34.5   &-39 &-30 &-58.0   &21.58   &21.00   &21.44    &8.45  &679.00     &555.0   &-3871.0 \cr
}
\vfil\eject \halign{ \hfil# & \hfil# & \hfil# & \hfil# & \hfil# & \hfil# & \hfil# & 
\hfil# & \hfil# & \hfil# & \hfil# & \hfil# & \hfil# & \hfil# \cr 
 F349 \cr
   23  &53  &21.4   &-34 &-42 &-16.5   &19.51   &18.75   &19.32    &9.71 &1356.00    &9017.0   &-2333.0 \cr
   23  &53  &20.9   &-34 &-43 &-28.4   &20.07   &18.63   &19.70    &9.51 &1522.00    &9025.0   &-2199.0 \cr
   23  &53  &17.8   &-34 &-43 &-19.7   &20.07   &18.71   &19.73    &9.58 &1618.00    &9098.0   &-2214.0 \cr
   23  &53  &16.9   &-34 &-42 &-22.6   &20.57   &20.31   &20.50    &8.32  &601.00    &9120.0   &-2320.0 \cr
   23  &53  &13.6   &-34 &-43 &-16.3   &16.51   &15.53   &16.26   &12.81 &2063.00    &9195.0   &-2219.0 \cr
   23  &53   &9.0   &-34 &-42 &-28.7   &19.63   &18.57   &19.37   &10.02 &2378.00    &9301.0   &-2306.0 \cr
 F355 \cr
    2  &26  &34.2   &-36 &-26 &-23.5   &21.09   &20.47   &20.93    &8.68  &-54.00   &-3340.0    &8882.0 \cr
    2  &26  &31.8   &-36 &-26 &-22.6   &20.99   &19.44   &20.60    &9.07 &-371.00   &-3286.0    &8880.0 \cr
    2  &26  &29.9   &-36 &-27 &-33.6   &16.64   &15.74   &16.41   &12.68 &2413.00   &-3243.0    &9012.0 \cr
    2  &26  &27.7   &-36 &-26 &-12.7   &21.23   &21.01   &21.18    &8.73  &890.00   &-3195.0    &8861.0 \cr
 F401 \cr
   20  &57  &56.8   &-36 &-18 &-46.9   &20.28   &19.44   &20.07    &8.89 &-421.00  &-13325.0    &8449.0 \cr
   20  &57  &55.1   &-36 &-18 &-56.6   &19.35   &18.08   &19.03    &9.80  &-54.00  &-13285.0    &8466.0 \cr
   20  &57  &53.1   &-36 &-18 &-22.8   &17.67   &16.43   &17.36   &11.39 &2686.00  &-13243.0    &8402.0 \cr
   20  &57  &50.3   &-36 &-18 &-31.1   &20.50   &19.39   &20.22    &8.73 &-124.00  &-13180.0    &8416.0 \cr
   20  &57  &49.6   &-36 &-17 &-54.8   &20.85   &19.80   &20.58    &8.47 &-485.00  &-13165.0    &8348.0 \cr
   20  &57  &48.9   &-36 &-18  &-5.8   &20.10   &19.49   &19.94    &9.07  &505.00  &-13149.0    &8368.0 \cr
   20  &57  &47.7   &-36 &-19 &-15.5   &19.85   &19.26   &19.70    &9.14 &-287.00  &-13118.0    &8497.0 \cr
   20  &57  &44.7   &-36 &-18 &-20.5   &20.22   &18.85   &19.87    &9.21 &1423.00  &-13054.0    &8393.0 \cr
 F403 \cr
   21  &38  &33.0   &-34 &-14 &-14.6   &18.53   &17.47   &18.26   &11.15 &2141.00   &-3461.0   &-5815.0 \cr
   21  &38  &32.0   &-34 &-15 &-54.5   &19.56   &19.08   &19.44    &9.68 &-538.00   &-3439.0   &-5629.0 \cr
   21  &38  &29.3   &-34 &-14 &-40.6   &19.86   &19.21   &19.70    &9.44 &-496.00   &-3376.0   &-5767.0 \cr
   21  &38  &28.8   &-34 &-15  &-1.6   &19.01   &18.19   &18.80   &10.49 &2110.00   &-3365.0   &-5728.0 \cr
   21  &38  &28.7   &-34 &-15 &-54.2   &18.69   &17.63   &18.42   &10.64 &1633.00   &-3362.0   &-5630.0 \cr
   21  &38  &27.1   &-34 &-15 &-40.9   &17.24   &16.15   &16.97   &12.40 &2804.00   &-3324.0   &-5655.0 \cr
   21  &38  &24.6   &-34 &-16  &-4.8   &21.09   &19.98   &20.81    &9.14 &1588.00   &-3266.0   &-5611.0 \cr
   21  &38  &24.2   &-34 &-15 &-42.8   &20.80   &19.89   &20.57    &8.80  &350.00   &-3258.0   &-5652.0 \cr
   21  &38  &19.1   &-34 &-14 &-26.8   &20.48   &19.67   &20.27    &9.33  &323.00   &-3140.0   &-5794.0 \cr
 F405 \cr
   22  &11  &18.2   &-36 &-56 &-15.8   &21.10   &19.72   &20.75    &8.79 &1361.00   &17035.0   &12662.0 \cr
   22  &11  &16.3   &-36 &-54 &-43.6   &19.80   &18.06   &19.36   &10.27 &-5000.00   &17085.0   &12492.0 \cr
   22  &11  &14.9   &-36 &-55 &-48.5   &20.47   &19.86   &20.32    &9.06 &1800.00   &17112.0   &12614.0 \cr
   22  &11  &14.5   &-36 &-55 &-31.2   &19.56   &17.95   &19.16   &10.29 &2129.00   &17122.0   &12582.0 \cr
   22  &11  &12.5   &-36 &-56 &-34.8   &19.79   &18.99   &19.59   &10.05 &2347.00   &17162.0   &12702.0 \cr
   22  &11  &11.6   &-36 &-54 &-56.7   &16.87   &16.21   &16.70   &12.31 &1945.00   &17188.0   &12520.0 \cr
   22  &11  &10.4   &-36 &-55  &-0.5   &18.82   &18.02   &18.62   &10.52 &1484.00   &17214.0   &12528.0 \cr
 F407 \cr
   23  &12  &28.4   &-33 &-35 &-36.0   &20.53   &20.08   &20.42    &9.04 &1498.00    &-801.0   &-9984.0 \cr
   23  &12  &27.4   &-33 &-36 &-15.8   &18.11   &16.65   &17.74   &12.13 &3280.00    &-778.0   &-9910.0 \cr
   23  &12  &26.3   &-33 &-35 &-10.3   &20.38   &19.35   &20.12    &9.65 &2023.00    &-754.0  &-10032.0 \cr
   23  &12  &21.1   &-33 &-35 &-38.3   &21.09   &19.51   &20.69    &8.94 &1154.00    &-632.0   &-9980.0 \cr
   23  &12  &19.4   &-33 &-34 &-52.1   &20.93   &20.39   &20.79    &8.54 &-472.00    &-593.0  &-10066.0 \cr
 F407 \cr
   23  &12  &28.4   &-33 &-35 &-36.0   &20.31   &19.94   &20.22    &9.04 &1498.00    &-801.0   &-9984.0 \cr
   23  &12  &27.4   &-33 &-36 &-15.8   &17.75   &16.34   &17.39   &12.13 &3280.00    &-778.0   &-9910.0 \cr
   23  &12  &26.3   &-33 &-35 &-10.3   &20.06   &18.97   &19.78    &9.65 &2023.00    &-754.0  &-10032.0 \cr
   23  &12  &21.1   &-33 &-35 &-38.3   &20.97   &19.46   &20.59    &8.94 &1154.00    &-632.0   &-9980.0 \cr
   23  &12  &21.0   &-33 &-36 &-37.4   &19.73   &19.57   &19.69    &9.61 &1491.00    &-629.0   &-9870.0 \cr
   23  &12  &19.4   &-33 &-34 &-52.1   &20.78   &20.42   &20.69    &8.54 &-472.00    &-593.0  &-10066.0 \cr
 F412 \cr
    1  &20  &13.4   &-30 &-15 &-21.8   &19.89   &19.15   &19.71    &9.71 &1842.00  &-16082.0    &1167.0 \cr
    1  &20  &11.5   &-30 &-15 &-29.9   &19.25   &17.97   &18.92   &10.45 &2182.00  &-16035.0    &1181.0 \cr
    1  &20   &8.6   &-30 &-15  &-5.0   &19.79   &19.02   &19.60    &9.80 &1496.00  &-15966.0    &1133.0 \cr
    1  &20   &8.2   &-30 &-14 &-37.7   &20.34   &19.35   &20.09    &9.34 &1338.00  &-15958.0    &1082.0 \cr
 F418 \cr
    3  &32  &35.0   &-29  &-7 &-54.1   &19.39   &18.32   &19.12   &10.12 &2313.00   &-8049.0   &-6637.0 \cr
    3  &32  &33.1   &-29  &-8 &-13.1   &18.28   &17.60   &18.11   &11.00 &2422.00   &-8003.0   &-6602.0 \cr
    3  &32  &30.9   &-29  &-7 &-55.2   &20.26   &19.05   &19.95    &9.58 &2074.00   &-7950.0   &-6636.0 \cr
    3  &32  &30.8   &-29  &-8 &-39.3   &19.69   &19.07   &19.53    &9.46  &819.00   &-7945.0   &-6554.0 \cr
    3  &32  &30.3   &-29  &-7 &-40.2   &19.32   &18.14   &19.02   &10.14 &1777.00   &-7936.0   &-6664.0 \cr
    3  &32  &27.8   &-29  &-7 &-51.4   &16.93   &15.89   &16.67   &11.97 &2293.00   &-7874.0   &-6644.0 \cr
    3  &32  &26.0   &-29  &-8 &-35.2   &21.26   &20.24   &21.00    &8.82 &1467.00   &-7828.0   &-6563.0 \cr
    3  &32  &26.1   &-29  &-9 &-11.6   &20.16   &19.64   &20.03    &9.18 &1786.00   &-7832.0   &-6495.0 \cr
}
\vfil\eject \halign{ \hfil# & \hfil# & \hfil# & \hfil# & \hfil# & \hfil# & \hfil# & 
\hfil# & \hfil# & \hfil# & \hfil# & \hfil# & \hfil# & \hfil# \cr 
 F467 \cr
   22  &17  &34.1   &-29 &-18 &-47.2   &17.97   &16.74   &17.66   &12.53 &3330.00   &-5099.0   &-5276.0 \cr
   22  &17  &32.2   &-29 &-19 &-47.0   &21.00   &20.18   &20.79    &8.45 &-416.00   &-5053.0   &-5165.0 \cr
   22  &17  &30.3   &-29 &-19 &-21.9   &20.00   &18.64   &19.66    &9.73 &1617.00   &-5007.0   &-5212.0 \cr
 F467 \cr
   22  &17  &34.1   &-29 &-18 &-47.2   &17.90   &17.09   &17.70   &12.53 &3330.00   &-5099.0   &-5276.0 \cr
   22  &17  &32.2   &-29 &-19 &-47.0   &20.83   &20.55   &20.76    &8.45 &-416.00   &-5053.0   &-5165.0 \cr
   22  &17  &30.3   &-29 &-19 &-21.9   &20.05   &18.73   &19.72    &9.73 &1617.00   &-5007.0   &-5212.0 \cr
   22  &17  &25.7   &-29 &-18 &-23.2   &20.50   &19.87   &20.34    &9.43 &1692.00   &-4896.0   &-5322.0 \cr
 F469 \cr
   22  &49   &5.6   &-29 &-43  &-3.3   &21.05   &19.57   &20.68    &8.65  &417.00   &15921.0   &-2453.0 \cr
   22  &49   &4.9   &-29 &-43  &-9.0   &20.92   &20.19   &20.74    &8.58 &1015.00   &15938.0   &-2442.0 \cr
   22  &49   &2.4   &-29 &-42 &-51.6   &19.37   &18.65   &19.19   &10.34 &2097.00   &15998.0   &-2473.0 \cr
   22  &48  &57.3   &-29 &-43 &-12.0   &19.45   &18.20   &19.13   &10.12 &1724.00   &16122.0   &-2432.0 \cr
   22  &48  &55.4   &-29 &-42 &-25.2   &20.41   &19.46   &20.17    &9.41 &1570.00   &16171.0   &-2518.0 \cr
 F471 \cr
   23  &46  &22.1   &-30 &-25 &-15.3   &19.98   &19.17   &19.78    &9.35  &101.00    &-342.0    &2222.0 \cr
   23  &46  &21.8   &-30 &-26 &-40.2   &17.54   &17.02   &17.41   &11.86 &2484.00    &-335.0    &2380.0 \cr
   23  &46  &20.3   &-30 &-26 &-56.4   &17.47   &16.58   &17.25   &11.63 &-5000.00    &-301.0    &2410.0 \cr
   23  &46  &17.6   &-30 &-25 &-35.7   &19.56   &18.54   &19.30   &10.27 &2789.00    &-236.0    &2260.0 \cr
   23  &46  &16.7   &-30 &-25 &-47.0   &20.80   &19.87   &20.57    &9.03 &1674.00    &-213.0    &2281.0 \cr
 F477 \cr
    2   &0  &53.1   &-27  &-3 &-38.8   &19.73   &18.98   &19.54   &10.18 &1862.00  &-16172.0   &13414.0 \cr
    2   &0  &52.0   &-27  &-3  &-8.5   &20.36   &19.70   &20.19    &9.19 &-249.00  &-16147.0   &13358.0 \cr
    2   &0  &51.0   &-27  &-3 &-57.1   &19.99   &18.75   &19.68   &10.20 &2168.00  &-16120.0   &13448.0 \cr
    2   &0  &49.6   &-27  &-4  &-9.8   &18.27   &16.59   &17.85   &12.04 &2165.00  &-16084.0   &13471.0 \cr
    2   &0  &46.9   &-27  &-4 &-32.5   &20.64   &20.21   &20.53    &9.00  &134.00  &-16017.0   &13511.0 \cr
    2   &0  &46.1   &-27  &-3  &-8.4   &20.73   &19.54   &20.43    &9.55 &1337.00  &-15999.0   &13355.0 \cr
    2   &0  &44.2   &-27  &-3 &-32.6   &18.73   &17.85   &18.51   &11.12 &2541.00  &-15952.0   &13399.0 \cr
    2   &0  &44.2   &-27  &-3 &-48.7   &21.05   &20.30   &20.86    &8.81  &-45.00  &-15949.0   &13429.0 \cr
 F477 \cr
    2   &0  &53.1   &-27  &-3 &-38.8   &19.73   &18.98   &19.54    &0.00 &-5000.00  &-16086.0   &13380.0 \cr
    2   &0  &52.0   &-27  &-3  &-8.5   &20.36   &19.70   &20.19    &0.00 &-5000.00  &-16061.0   &13323.0 \cr
    2   &0  &51.0   &-27  &-3 &-57.1   &19.99   &18.75   &19.68    &0.00 &-5000.00  &-16034.0   &13413.0 \cr
    2   &0  &49.6   &-27  &-4  &-9.8   &18.27   &16.59   &17.85    &0.00 &-5000.00  &-15998.0   &13436.0 \cr
    2   &0  &46.9   &-27  &-4 &-32.5   &20.64   &20.21   &20.53    &0.00 &-5000.00  &-15931.0   &13477.0 \cr
    2   &0  &46.1   &-27  &-3  &-8.4   &20.73   &19.54   &20.43    &0.00 &-5000.00  &-15913.0   &13320.0 \cr
    2   &0  &44.2   &-27  &-3 &-32.6   &18.73   &17.85   &18.51    &0.00 &-5000.00  &-15866.0   &13364.0 \cr
    2   &0  &44.2   &-27  &-3 &-48.7   &21.05   &20.30   &20.86    &0.00 &-5000.00  &-15864.0   &13394.0 \cr
 F530A \cr
   21  &12  &54.8   &-23 &-12 &-20.8   &19.47   &18.92   &19.33   &10.48 &2820.00    &4670.0  &-12647.0 \cr
   21  &12  &50.4   &-23 &-11 &-45.1   &20.42   &19.55   &20.20    &9.15 &1774.00    &4783.0  &-12713.0 \cr
   21  &12  &47.7   &-23 &-11  &-3.5   &20.66   &19.61   &20.39    &9.26 &1763.00    &4853.0  &-12790.0 \cr
   21  &12  &42.4   &-23 &-12 &-55.9   &18.49   &16.68   &18.03   &11.55 &-5000.00    &4988.0  &-12580.0 \cr
 F530A \cr
   21  &12  &53.1   &-23 &-13 &-13.4   &19.45   &18.88   &19.31    &9.55 &-665.00    &4711.0  &-12549.0 \cr
   21  &12  &43.7   &-23 &-11 &-30.1   &20.18   &20.15   &20.17    &9.17 &-853.00    &4954.0  &-12740.0 \cr
   21  &12  &43.6   &-23 &-12 &-29.7   &20.54   &18.86   &20.11    &9.86  &869.00    &4956.0  &-12629.0 \cr
   21  &12  &42.4   &-23 &-12 &-55.9   &17.61   &16.74   &17.39   &11.55 &-5000.00    &4988.0  &-12580.0 \cr
   21  &12  &41.9   &-23 &-12 &-28.0   &20.00   &18.78   &19.70    &9.58  &475.00    &5000.0  &-12632.0 \cr
 F530B \cr
   21  &19  &18.1   &-27 &-25 &-26.4   &19.66   &18.91   &19.47    &9.48  &415.00   &-4984.0   &15629.0 \cr
   21  &19  &15.4   &-27 &-24  &-7.7   &20.32   &19.91   &20.21    &8.88 &-812.00   &-4917.0   &15482.0 \cr
   21  &19  &10.8   &-27 &-25 &-28.2   &20.29   &19.57   &20.10    &9.11 &-311.00   &-4802.0   &15631.0 \cr
   21  &19  &10.1   &-27 &-24 &-55.4   &17.66   &16.69   &17.41   &12.56 &3168.00   &-4786.0   &15570.0 \cr
   21  &19   &9.7   &-27 &-25 &-35.7   &20.73   &20.01   &20.54    &9.08 &1687.00   &-4776.0   &15645.0 \cr
 F533 \cr
   22  &16   &4.1   &-26 &-49  &-2.7   &19.85   &18.83   &19.59    &9.65 &1592.00    &9051.0   &11624.0 \cr
   22  &16   &4.1   &-26 &-50  &-4.5   &17.69   &16.34   &17.35   &11.98 &2889.00    &9048.0   &11739.0 \cr
   22  &15  &55.8   &-26 &-50 &-29.7   &19.76   &18.83   &19.53    &9.28 &-429.00    &9256.0   &11788.0 \cr
   22  &15  &54.5   &-26 &-49 &-28.3   &16.33   &15.20   &16.04   &13.43 &-5000.00    &9289.0   &11674.0 \cr
   22  &15  &51.2   &-26 &-49 &-17.6   &20.00   &18.84   &19.71    &9.59 &2000.00    &9371.0   &11655.0 \cr
   22  &15  &50.4   &-26 &-48 &-56.6   &20.08   &18.96   &19.80    &9.19 &-717.00    &9391.0   &11616.0 \cr
}
\vfil\eject \halign{ \hfil# & \hfil# & \hfil# & \hfil# & \hfil# & \hfil# & \hfil# & 
\hfil# & \hfil# & \hfil# & \hfil# & \hfil# & \hfil# & \hfil# \cr 
 F535 \cr
   23  &16   &4.5   &-26 &-21 &-24.0   &19.15   &18.19   &18.91   &10.56 &2280.00  &-15100.0    &8937.0 \cr
   23  &16   &1.6   &-26 &-20 &-38.5   &20.31   &19.25   &20.04    &9.34 &1403.00  &-15030.0    &8855.0 \cr
   23  &15  &57.8   &-26 &-22 &-13.2   &20.09   &19.47   &19.94    &9.13   &71.00  &-14931.0    &9029.0 \cr
   23  &15  &57.5   &-26 &-21 &-25.0   &20.69   &20.13   &20.55    &8.86  &177.00  &-14924.0    &8940.0 \cr
   23  &15  &55.1   &-26 &-20 &-45.7   &20.64   &20.19   &20.52    &8.96 &1261.00  &-14866.0    &8865.0 \cr
   23  &15  &54.3   &-26 &-20 &-17.4   &20.03   &19.33   &19.85    &9.32   &99.00  &-14848.0    &8812.0 \cr
 F550 \cr
    4   &5  &41.5   &-17 &-29 &-27.1   &20.13   &19.22   &19.90    &9.80 &1409.00   &10104.0  &-17430.0 \cr
    4   &5  &39.3   &-17 &-29 &-18.8   &20.39   &18.89   &20.01    &9.68 &1574.00   &10162.0  &-17445.0 \cr
    4   &5  &34.3   &-17 &-29 &-32.7   &19.99   &18.53   &19.63   &10.11 &1452.00   &10296.0  &-17418.0 \cr
    4   &5  &34.2   &-17 &-28  &-0.3   &18.85   &17.88   &18.60   &10.90 &2327.00   &10300.0  &-17590.0 \cr
    4   &5  &33.0   &-17 &-27 &-49.9   &20.14   &19.54   &19.99    &9.54 &-239.00   &10333.0  &-17609.0 \cr
 F599A \cr
   21  &26  &25.0   &-18 &-16 &-42.4   &21.01   &19.89   &20.73    &8.94 &1156.00   &-8499.0  &-11932.0 \cr
   21  &26  &21.8   &-18 &-16 &-26.7   &19.93   &18.72   &19.62    &9.68 &1892.00   &-8414.0  &-11962.0 \cr
   21  &26  &20.0   &-18 &-15 &-23.0   &20.89   &20.37   &20.76    &8.63 &-475.00   &-8368.0  &-12082.0 \cr
   21  &26  &19.0   &-18 &-16 &-32.4   &17.00   &16.50   &16.87   &12.37 &2464.00   &-8339.0  &-11952.0 \cr
   21  &26  &17.2   &-18 &-15 &-50.3   &19.32   &18.49   &19.11   &10.65 &-5000.00   &-8292.0  &-12031.0 \cr
   21  &26  &16.6   &-18 &-16 &-12.4   &19.17   &18.16   &18.92   &10.86 &2838.00   &-8276.0  &-11990.0 \cr
   21  &26  &13.8   &-18 &-15 &-12.1   &21.37   &20.73   &21.21    &8.25 &-649.00   &-8203.0  &-12103.0 \cr
 F599B \cr
   21  &16  &30.5   &-19  &-7 &-40.8   &19.62   &18.82   &19.42    &0.00 &-5000.00    &7323.0   &-6366.0 \cr
   21  &16  &28.2   &-19  &-6 &-26.6   &19.35   &18.28   &19.08    &0.00 &-5000.00    &7383.0   &-6504.0 \cr
   21  &16  &27.6   &-19  &-6 &-43.7   &19.14   &18.62   &19.01    &0.00 &-5000.00    &7399.0   &-6472.0 \cr
   21  &16  &27.6   &-19  &-7 &-19.7   &19.88   &19.79   &19.86    &0.00 &-5000.00    &7400.0   &-6405.0 \cr
   21  &16  &26.7   &-19  &-6 &-30.8   &20.85   &20.28   &20.70    &0.00 &-5000.00    &7423.0   &-6496.0 \cr
   21  &16  &25.6   &-19  &-7 &-11.0   &19.83   &19.36   &19.71    &0.00 &-5000.00    &7452.0   &-6421.0 \cr
   21  &16  &25.5   &-19  &-6 &-47.9   &19.56   &18.91   &19.39    &0.00 &-5000.00    &7454.0   &-6464.0 \cr
   21  &16  &24.4   &-19  &-7 &-27.6   &19.14   &18.79   &19.06    &0.00 &-5000.00    &7485.0   &-6390.0 \cr
   21  &16  &23.8   &-19  &-7 &-48.5   &19.29   &18.31   &19.04    &0.00 &-5000.00    &7499.0   &-6351.0 \cr
   21  &16  &23.0   &-19  &-6 &-20.9   &20.20   &19.13   &19.93    &0.00 &-5000.00    &7521.0   &-6514.0 \cr
 F603 \cr
   22  &45  &19.0   &-17 &-46 &-23.1   &17.87   &16.80   &17.60   &11.37 &-5000.00    &-312.0  &-15686.0 \cr
   22  &45  &15.1   &-17 &-46 &-10.2   &18.00   &17.15   &17.78   &11.40 &2544.00    &-208.0  &-15710.0 \cr
   22  &45  &13.8   &-17 &-45 &-56.3   &20.44   &19.02   &20.08    &9.76 &2078.00    &-173.0  &-15736.0 \cr
   22  &45  &12.7   &-17 &-46 &-21.5   &20.50   &19.63   &20.28    &9.18 &1161.00    &-144.0  &-15689.0 \cr
 F605 \cr
   23  &24   &3.8   &-22 &-21  &-7.9   &19.81   &19.28   &19.67    &9.34 &1647.00    &4532.0   &15134.0 \cr
   23  &23  &54.8   &-22 &-21 &-43.8   &19.34   &18.09   &19.02   &10.50 &2775.00    &4763.0   &15202.0 \cr
   23  &23  &54.3   &-22 &-22 &-53.1   &17.56   &16.50   &17.29   &11.53 &2637.00    &4775.0   &15331.0 \cr
   23  &23  &51.4   &-22 &-22 &-30.9   &16.90   &15.70   &16.60   &12.48 &2897.00    &4851.0   &15290.0 \cr
}
\bye

