\documentclass{aa}
\topmargin -1.0cm
\begin{document}

\begin{center}
{\bf Table 9.} Lines identified in the optical spectra of AS 78 and MWC 657
\begin{tabular}{llllllllllllll}
\hline
\noalign{\smallskip}
Line     & $\lambda_{\rm lab}$ &\multicolumn{8}{c}{MWC 657}&\multicolumn{4}{c}{AS78}\\
\cline{3-10}\cline{11-14}
& & \multicolumn{4}{c}{OHP 1994} & \multicolumn{4}{c}{SAO}& & & & \\
\cline{3-6}\cline{7-10}
 & & I  & RV  & EW & Rem. & I & RV  & EW & Rem. & I & RV  & EW & Rem.\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
Fe{\sc ii}(27)       &4233.17& 2.4:  & $-$60 & 1.40&     &       &       &     &      &       &       &     &      \\
Fe{\sc ii}(38)       &4508.28& 2.0:  & $-$80 & 1.06&     &       &       &     &      &       &       &     &      \\
Fe{\sc ii}(37)       &4515.34& 1.7:  & $-$63 & 0.79&     &       &       &     &      &       &       &     &      \\
Fe{\sc ii}(37)       &4520.22& 1.3:  &       &     &blend&       &       &     &      &       &       &     &      \\
Fe{\sc ii}(38)       &4522.63& 1.5:  &       &     & +p  &       &       &     &      &       &       &     &      \\
Fe{\sc ii}(37)       &4534.17& 1.1:  &       &     &weak &       &       &     &      &       &       &     &      \\
Fe{\sc ii}(38)       &4541.52& 1.8:  & $-$77 & 1.01&     &       &       &     &      &       &       &     &      \\
Fe{\sc ii}(38)       &4549.47& 1.9:  & $-$73 & 1.77&     &       &       &     &      & 1.33  &$-$38: & 0.61&blend:\\
Fe{\sc ii}(37)       &4555.89& 1.4:  & $-$70 & 0.64&     &       &       &     &      & 1.14  &$-$45: & 0.21&double\\
Fe{\sc ii}(20)       &4558.58& 1.2:  & $-$64 & 0.27&     &       &       &     &      & 1.10: &$-$41: & 0.14&noisy \\
Ti{\sc ii}(82)       &4571.97&       &       &     &     &       &       &     &      & 1.18  &$-$43  & 0.32&      \\
Fe{\sc ii}(38)       &4576.33&       &       &     &     &       &       &     &      & 1.05: &       &     &      \\
Fe{\sc ii}(38)       &4583.83& 2.1:  & $-$66 & 1.94&     &       &       &     &      & 1.64  &$-$40  & 1.01&P Cyg:\\
Cr{\sc ii}(44)       &4588.21&       &       &     &     &       &       &     &      & 1.15  &$-$45: & 0.25&      \\
Cr{\sc ii}(44)       &4592.05&       &       &     &     &       &       &     &      & 1.04: &       &     &      \\
Cr{\sc ii}(44)       &4618.83&       &       &     &     &       &       &     &      & 1.10  &$-$40: & 0.09&      \\
Fe{\sc ii}(38)       &4620.51&       &       &     &     &       &       &     &      & 1.08  &$-$38  & 0.05&      \\
Fe{\sc ii}(38)       &4629.34& 1.7:  & $-$62 & 1.50&     &       &       &     &      & 1.37  &$-$42  & 0.33&      \\
Cr{\sc ii}(44)       &4634.07&       &       &     &     &       &       &     &      & 1.06  &$-$48: & 0.05&      \\
Fe{\sc ii}(43)?      &4656.18&       &       &     &     &       &       &     &      & 1.05: &$-$38: & 0.05&      \\
He{\sc  i}(12)       &4713.14&       &       &     &     &       &       &     &      & 0.91: &$-$33  & 0.06&      \\
Fe{\sc ii}(43)       &4731.47&       &       &     &     &       &       &     &      & 1.08  &$-$33: & 0.09&      \\
Ti{\sc ii}(92)?      &4805.09&       &       &     &     &       &       &     &      & 1.04  &$-$44: & 0.03&      \\
Cr{\sc ii}(30)       &4824.14&       &       &     &     &       &       &     &      & 1.09  &$-$48  & 0.09&      \\
Cr{\sc ii}(30)       &4848.25&       &       &     &     &       &       &     &      & 1.09: &$-$40: & 0.09&      \\
Fe{\sc ii}(42)       &4923.92& 3.4   & $-$69 & 3.52&P Cyg& 2.5   & $-$60 & 3.21&double& 2.30  &$-$41  & 1.74&P Cyg \\
Fe{\sc ii}(36)       &4993.35&       &       &     &     &       &       &     &      & 1.04  &$-$43: & 0.05&      \\
Fe{\sc ii}(42)       &5018.43& 3.2   & $-$60 & 4.38&P Cyg& 3.1   & $-$52 & 4.68&double& 2.69  &$-$39  & 2.49&P Cyg \\
Si{\sc ii}(5)?       &5041.03&       &       &     &     &       &       &     &      & 0.95: &$-$37: & 0.05&      \\
Si{\sc ii}(5)        &5056.00&       &       &     &     &       &       &     &      & 0.91  &$-$30: & 0.07&      \\
Ti{\sc ii}(86)       &5129.14&       &       &     &     &       &       &     &      & 1.07  &$-$32: & 0.06&      \\
Fe{\sc ii}(42)       &5169.03& 2.8   & $-$70 & 3.75&P Cyg& 2.8   & $-$55 & 4.22&double& 2.52  &$-$42  & 2.30&P Cyg \\
\noalign{\smallskip}
\hline
\end{tabular}
\end{center}
\clearpage
\pagebreak

\begin{center}
{\bf Table 9. Continued.}
\begin{tabular}{llllllllllllll}
\hline
\noalign{\smallskip}
Line     & $\lambda_{\rm lab}$ &\multicolumn{8}{c}{MWC 657}&\multicolumn{4}{c}{AS78}\\
\cline{3-10}\cline{11-14}
& & \multicolumn{4}{c}{OHP 1994} & \multicolumn{4}{c}{SAO}& & & & \\
\cline{3-6}\cline{7-10}
 & & I  & RV  & EW & Rem. & I & RV  & EW & Rem. & I & RV  & EW & Rem.\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
Mg{\sc ii}(2)        &5172.68&       &       &     &     &       &       &     &      & 1.16: &$-$43: & 0.16&      \\
Mg{\sc ii}(2)        &5183.61&       &       &     &     &       &       &     &      & 1.18  &$-$40  & 0.18&      \\
Ti{\sc ii}(70)       &5188.68&       &       &     &     &       &       &     &      & 1.10  &$-$38: & 0.09&      \\
Fe{\sc ii}(49)       &5197.57& 1.6   & $-$55 & 1.22&     & 1.6   & $-$65:& 1.87&      & 1.37  &$-$41  & 0.52&P Cyg:\\
Ti{\sc ii}(70)       &5226.53&       &       &     &     &       &       &     &      & 1.11  &$-$40  & 0.08&      \\
Fe{\sc ii}(49)       &5234.62& 1.6   & $-$79 & 1.33&     & 1.65  & $-$50:& 1.55&double:&1.44  &$-$38  & 0.60&P Cyg:\\
Cr{\sc ii}(43)       &5237.32&       &       &     &     &       &       &     &      & 1.06: &$-$40: & 0.06&      \\
Fe{\sc ii}(49)       &5254.93&       &       &     &     &       &       &     &      & 1.10: &       & 0.09&      \\
Fe{\sc ii}(40)       &5264.80&       &       &     &     & 1.03  &       &     &      & 1.04: &       & 0.03&      \\
Fe{\sc ii}(49)       &5275.99& 1.7   &       & 2.18&compl& 1.75  & $-$53 & 1.87&      & 1.46  &$-$42  & 0.55&      \\
Fe{\sc ii}(41)       &5284.09&       &       &     &     & 1.3:  &       &     &      & 1.15  &$-$42: & 0.11&      \\
Fe{\sc ii}(48)       &5316.78& 2.6   & $-$75 & 4.15&     & 2.65  & $-$65 & 4.41&      & 1.90  &$-$42  & 1.14&P Cyg \\
Fe{\sc ii}(49)       &5325.56&       &       &     &     &       &       &     &      & 1.07  &$-$45: & 1.06&      \\
Cr{\sc ii}(43)       &5334.86&       &       &     &     &       &       &     &      & 1.08  &       & 0.07&      \\
Ti{\sc ii}(69)       &5336.81&       &       &     &     &       &       &     &      & 1.04: &$-$38: & 0.09&blend \\
Fe{\sc ii}(48)       &5362.86& 1.3   & $-$70 & 0.84&     & 1.32  & $-$55:& 0.82&      & 1.19  &$-$40  & 0.24&      \\
Cr{\sc ii}(23)       &5407.62&       &       &     &     &       &       &     &      & 1.04: &       & 0.04&      \\
Fe{\sc ii}(49)       &5425.25&       &       &     &     & 1.15: & $-$52:& 0.18&      & 1.06  &$-$38: & 0.06&      \\
DIB                  &5487.67&       &       &     &     &       &       &     &      & 0.98: &       & 0.01&      \\
Cr{\sc ii}(50)       &5502.05&       &       &     &     &       &       &     &      & 1.03: &$-$40: & 0.03&      \\
Fe{\sc ii}(55)       &5534.86& 1.3   & $-$77 & 0.60&     & 1.30: & $-$40:& 0.54&      & 1.15  &$-$40  & 0.16&      \\
$[$0 {\sc i}$]$(3f)  &5577.35&       &       &     &     & 2.6   &       &     &      & 1.66  &       &     &tell. \\
$[$0 {\sc i}$]$(3f)  &5577.35&       &       &     &     & 1.25: & $-$18 &     &      & 1.07  &$-$30: & 0.39&      \\
DIB                  &5780.41& 0.74  & $-$34 & 0.54&     & 0.70  & $-$18:& 0.48&      & 0.82  &$-$10  & 0.43&      \\
DIB                  &5797.03& 0.85  & $-$26 & 0.15&     & 0.77  &       &     &noisy & 0.87  &$-$10: & 0.11&      \\
DIB                  &5849.79&       &       &     &     & 0.88: &       & 0.10&      & 0.97: &$+$1:  & 0.01&      \\
He{\sc  i}( 2)       &5875.65& 0.88  & $-$188& 0.28&     &       &       &     &      & 0.86  &$-$33: & 0.31&      \\
Na{\sc  i}( 1)       &5889.95& 1.17  & $-$96 & 0.05&     &       &       &     &      & 1.27  &$-$102 & 0.14&      \\
Na{\sc  i}( 1)       &5889.95& 0.02  & $-$29 & 0.98&-71/-138&0.34& $-$40 & 1.19&      & 0.25  &$-$40  & 0.88&$^{\rm a}$\\
Na{\sc  i}( 1)       &5895.92& 1.14  & $-$94 & 0.05&     &       &       &     &      & 1.22  &$-$102 & 0.14&      \\
Na{\sc  i}( 1)       &5895.92& 0.02  & $-$26 & 0.85&-75/-143&0.36& $-$32:& 0.98&      & 0.30  &$-$40  & 0.72&$^{\rm a}$\\
\noalign{\smallskip}
\hline
\end{tabular}
\end{center}
\clearpage
\pagebreak

\begin{center}
{\bf Table 9. Continued.}
\begin{tabular}{llllllllllllll}
\hline
\noalign{\smallskip}
Line     & $\lambda_{\rm lab}$ &\multicolumn{8}{c}{MWC 657}&\multicolumn{4}{c}{AS78}\\
\cline{3-10}\cline{11-14}
& & \multicolumn{4}{c}{OHP 1994} & \multicolumn{4}{c}{SAO}& & & & \\
\cline{3-6}\cline{7-10}
 & & I  & RV  & EW & Rem. & I & RV  & EW & Rem. & I & RV  & EW & Rem.\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
Si{\sc ii}(4)?       &5978.93&       &       &     &noisy& 1.19: & $-$90:& 0.82&      &       &       &     &      \\
Fe{\sc ii}(74)       &6147.74& 1.1   &       & 0.29& +f  & 1.10  &       & 0.31& +f   & 1.06  &$-$30  & 0.18& +f   \\
Fe{\sc ii}(74)       &6149.23&       &       &     &     & 1.10: &       &     &      &       &$-$45  &     &      \\
DIB                  &6194.73&       &       &     &     &       &       &     &      & 0.97: &       & 0.03& +f   \\
DIB                  &6195.95&       &       &     &     &       &       &     &      & 0.97: &       &     &      \\
DIB                  &6203.19&       &       &     &     & 0.90: & $-$23:&     &      & 0.96  & $-$15:& 0.03&compl \\
Fe{\sc ii}(74)       &6238.38& 1.1   & $-$61 & 0.16&     & 1.09  &       & 0.09&noisy & 1.07  & $-$37 & 0.11&      \\
Fe{\sc ii}(74)       &6247.56& 1.3   & $-$52:& 0.66&     & 1.32  & $-$45:& 0.88&      & 1.17  & $-$37 & 0.26&P Cyg:\\
DIB                  &6269.77&       &       &     &     &       &       &     &      & 0.97: &       & 0.05&      \\
DIB                  &6283.85& 0.68  &       & 1.74&+6278& 0.71  &       & 2.64&+6278 & 0.82: &       & 1.29&+6278 \\
$[$0 {\sc i}$]$      &6300.23& 2.1   & $-$71 & 1.21&     & 2.54  & $-$60 & 2.70&      & 1.32  & $-$35 & 0.59&      \\
Fe{\sc ii}           &6317.99& 1.6   & $-$85 & 2.05&     & 1.85  & $-$75 & 3.11&      & 1.07  & $-$39 & 0.14&      \\
Ne{\sc i}(1)         &6334.43&       &       &     &     &       &       &     &      & 0.98: & $-$38:& 0.02&      \\
Si{\sc ii}( 2)       &6347.10& 1.3   & $-$65 & 1.08&     & 1.32  & $-$82 & 1.50&double&       &       &     &      \\
$[$0 {\sc i}$]$      &6363.78& 1.3   & $-$85 & 0.31&     & 1.43  & $-$55:& 0.67&      & 1.15  & $-$35 & 0.16&      \\
Si{\sc ii}( 2)       &6371.36& 1.2   & $-$64:& 0.77&     & 1.19  & $-$76:& 0.62&compl &       &       &     &      \\
Fe{\sc ii}           &6383.72& 1.5   & $-$49:& 1.86&compl& 1.55  & $-$50:& 2.12&blend & 1.08  &       & 0.17&compl \\
Ne{\sc i}(1)         &6402.25&       &       &     &     &       &       &     &      & 0.98  &       & 0.03&      \\
Fe{\sc ii}(74)       &6407.25&       &       &     &     &       &       &     &      & 1.02: &       &     &      \\
Fe{\sc ii}(74)       &6416.92& 1.1   & $-$62 & 0.17&     & 1.10  & $-$70 & 0.17&      & 1.27  &       & 0.24&double\\
Fe{\sc ii}(40)       &6432.68& 1.1   & $-$63 & 0.15&     &       &       &     &noisy & 1.10  & $-$30:& 0.14&      \\
Fe{\sc ii}           &6442.95& 1.2   & $-$86:& 0.44&compl& 1.13  & $-$92:& 0.32&      &       &       &     &      \\
Fe{\sc ii}(74)       &6456.39& 1.4   & $-$74 & 1.19&     & 1.51  &       & 1.91&$^{\rm b}$&1.28&$-$35 & 0.46&P Cyg:\\
Fe{\sc ii}           &6491.28& 1.4   &       & 0.83& +f  & 1.30  &       & 1.04& +f   &       &       &     &      \\
Fe{\sc ii}           &6493.03& 1.2   &       &     &     &       &       &     &      &       &       &     &      \\
Fe{\sc ii}           &6506.33&       &       &     &     & 1.21  & $-$101& 0.45&      &       &       &     &      \\
Fe{\sc ii}(40)       &6516.05& 1.2   & $-$69 & 0.43&     & 1.32  & $-$46 & 0.87&      & 1.05: &       &     &      \\
DIB                  &6613.63& 0.87  & $-$27 & 0.14&     & 0.79  & $-$15 & 0.26&      & 0.84  & $-$8  & 0.15&      \\
DIB                  &6660.64&       &       &     &     &       &       &     &      & 0.98: & $-$16:& 0.02&      \\
\noalign{\smallskip}
\hline
\end{tabular}
\end{center}
\clearpage
\pagebreak

\begin{center}
{\bf Table 9. Continued.}
\begin{tabular}{llllllllllllll}
\hline
\noalign{\smallskip}
Line     & $\lambda_{\rm lab}$ &\multicolumn{8}{c}{MWC 657}&\multicolumn{4}{c}{AS78}\\
\cline{3-10}\cline{11-14}
& & \multicolumn{4}{c}{OHP 1994} & \multicolumn{4}{c}{SAO}& & & & \\
\cline{3-6}\cline{7-10}
 & & I  & RV  & EW & Rem. & I & RV  & EW & Rem. & I & RV  & EW & Rem.\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
He{\sc  i}( 2)       &6678.15& 0.90  & $-$188& 0.18&     &       &       &     &      & 0.93  & $-$38 & 0.12&      \\
DIB                  &6699.24&       &       &     &     &       &       &     &      & 0.98  &       & 0.02&      \\
He{\sc  i}(10)       &7065.19&       &       &     &     &       &       &     &      & 0.95: &       & 0.13&blend \\
N{\sc  i}(3)         &7423.64&       &       &     &     &       &       &     &      & 1.07: & $-$30:& 0.06&      \\
Fe{\sc ii}(73)?      &7462.39&       &       &     &     &       &       &     &      & 1.06: &       &     &      \\
$[$Ca{\sc  i}$]$     &7468.41&       &       &     &     &       &       &     &      & 0.15  & $-$55:& 0.41&      \\
Fe{\sc ii}           &7513.17&       &       &     &     & 1.43  & $-$55:& 1.76&      & 1.12: &       & 0.39&blend \\
Fe{\sc ii}(73)       &7711.71&       &       &     &     &       &       &     &      & 1.16  & $-$56:& 0.35&      \\
Fe{\sc ii}?          &7731.68&       &       &     &     & 1.22  & $-$87 & 0.59&      &       &       &     &      \\
O{\sc i}  (1)        &7771.94&       &       &     &     & 1.1:  &       & 0.3:&  +2f & 1.4:  & $-$35:& 3.25& +2f  \\
O{\sc i}  (1)        &7774.17&       &       &     &     & 1.4:  &       & 2.0:&      &       &       &     &      \\
O{\sc i}  (1)        &7775.40&       &       &     &     & 1.29  &       &     &      &       &       &     &      \\
P{\sc ii} (3):       &7869.5 &       &       &     &     & 1.36  &       & 1.39&7865.22&      &       &     &      \\
Mg{\sc ii}(8)        &7877.13&       &       &     &     & 1.17  &       & 0.78&blend &       &       &     &      \\
Mg{\sc ii}(8)        &7896.37&       &       &     &     & 1.23  & $-$66 & 1.08&      &       &       &     &      \\
\noalign{\smallskip}
\hline
\end{tabular}
\end{center}
\begin{list}{}
\item  The intensities are normalized to the continuum, the heliocentric
radial velocities (RV) are given in km\,s$^{-1}$, the equivalent widths (EW) are
given in \AA. The lines with uncertain identification are marked with question marks.
Equivalent widths and radial velocities of the lines measured with low accuracy are
maked by colons.
\item Remarks given in the last column are as follows: ``PCyg'' - P Cyg-type profile;
``PCyg:'' - weak absorption component ($\ge$ 0.95 I$_c$);
``double'' - double-peaked profile; ``compl'' - complex profile shape; ``blend''
- blend with another line; ``tell'' - telluric line; ``f'' refers to the following
line, while ``p'' to the preceeding line.
\item Equvalent widths and velocities are not given for the lines located in the
spectral regions contaminated by telluric absorptions and for very weak lines.
\item $^{\rm a}$ additional absorption components are seen at $-$4 km\,s$^{-1}$
and probably at $-$250 km\,s$^{-1}$ in the spectrum of AS 78
\item $^{\rm b}$ at the edge of the order
\end{list}
\end{document}
