%
%       AAS Latex Table for "Table 4" of the ApJ Supp. M31 paper, 
%			    Nov. 1994 (JEI)
%
%       Makes use of Mike Greason's AAS Camera Ready Table Instructions
%
\documentstyle[aastab]{article} % Mike's AAS Table style.
\begin{document}
\pagenumbering{arabic}
\input environ % Read Mike's new table environment.
\pagestyle{empty}
%
%       Define maximum widths of the columns:
%
\newlength{\tfivlena} % First column.           (PSK)
\settowidth{\tfivlena}{15000}
\newlength{\tfivlenb} % Second column.          (MF)
\settowidth{\tfivlenb}{15000}
\newlength{\tfivlenc} % Third column.           (EMF)
\settowidth{\tfivlenc}{15000}
\newlength{\tfivlend} % Fourth column.          (MN)
\settowidth{\tfivlend}{15000}
\newlength{\tfivlene} % Fifth column.           (EMN)
\settowidth{\tfivlene}{15000}
\newlength{\tfivlenf} % Sixth column.           (FHA)
\settowidth{\tfivlenf}{15000}
\newlength{\tfivleng} % Seventh column.         (EFHA)
\settowidth{\tfivleng}{15000}
\newlength{\tfivlenh} % Eighth column.          (FHB)
\settowidth{\tfivlenh}{15000}
\newlength{\tfivleni} % Ninth column.           (EFHB)
\settowidth{\tfivleni}{15000}
%
%       Define the "stdtable" arguments.
%
\renewcommand{\tabarga}{9}      % Number of columns in table
\renewcommand{\tabargb}{rrrrrrrrr} % Columns all right-justified
\renewcommand{\tabargc}{Table 4}% Table title one (first of two)
\renewcommand{\tabargd}{Source ID's and Fluxes} % Table 
\renewcommand{\tabarge}{ID & X & Y & $m_{249}$ & $m_{152}$ &U & B & R & alt. id} 
\renewcommand{\tabargf}{\tinvrule{\tfivlena}&\tinvrule{\tfivlenb}&
\tinvrule{\tfivlenc}&\tinvrule{\tfivlend}&\tinvrule{\tfivlene}&
\tinvrule{\tfivlenf}&\tinvrule{\tfivleng}&\tinvrule{\tfivlenh}&
\tinvrule{\tfivleni}} % Tab settings
%
%       The Table.
%
\cameratable
1-1 & -23.2 & -19.0 & 17.40 & 16.75 & ... & 19.69 & ...&... \\      
1-2 & -17.0 & -16.3 & 17.43 & ...  & ... & 19.74 & ...&... \\     
   1-3&   7.0&   6.0&17.21& ...& ...&18.69& ...&...        \\
   1-4&   9.7&  -5.3&16.99&16.74& ...&19.33& ...&...        \\
   1-5&  11.9&  11.2&16.28&16.74& ...&18.42& ...&...        \\
   1-6&  20.8&  15.3&17.51& ...& ...&19.90& ...&...        \\
   1-7&  26.0&   7.5&15.42&15.62& ...&18.04& ...&...        \\
   1-8&  30.7&  22.4&16.89&16.91& ...&19.42& ...&...       \\
   1-9&  36.2&  10.0&18.41& ...& ...&20.36& ...&...       \\
   2-1& -67.8&-146.9&18.30& ...& ...& ...& ...&M273351*   \\
   2-2& -57.4&-135.0&17.72& ...& ...&19.20& ...&M274229*  \\
   2-3& -54.3&-160.4&17.91& ...& ...&20.47& ...&M272405*  \\
   2-4& -54.7& -92.7&17.93& ...& ...&20.24& ...&...       \\
   2-5& -50.9&-126.3&16.76&16.78& ...&18.96& ...&M274902 \\
   2-6& -50.8&-112.7&18.04& ...& ...&19.77& 19.55 &M275810*  \\
   2-7& -37.9& -53.5&15.84&16.57& ...&17.64& ...&M283106*  \\
   2-8& -34.5&-106.3&17.67& ...& ...&18.18& ...&M276106*  \\
   2-9& -33.6& -36.5&16.38&16.99& ...&18.53& 18.30 &M285636* \\
  2-10& -31.8& -67.2&12.20& ...& ...&12.94& 10.44& F,M280774* \\
  2-11& -31.3& -94.9&18.35& ...& ...&20.47& ...&M276758*   \\
  2-12& -23.4& -32.6&17.73& ...& ...&19.79& ...&M286165* \\
  2-13& -20.5& -83.6&17.90& ...& ...&20.09& ...&...       \\
  2-14& -20.0&  87.6&17.93& ...& ...&20.73& 20.08 &M299890* \\
  2-15& -12.2& -42.8&17.69& ...& ...&20.33& ...&M285102*     \\
  2-16&  -8.2& -36.9&17.28&16.80& ...&19.59& ...&M285521*    \\
  2-17&  -8.9&  84.9&17.78& ...& ...&19.80& 19.71 &M299690* \\
  2-18&  -5.6& -10.7&17.68& ...& ...&19.75& 18.25 &M288849*  \\
  2-19&  -0.8&  24.6&16.60& ...& ...&15.22& 13.95 & F,M293223* \\
  2-20&   1.9& 102.9&17.34& ...& ...&18.82& ...&M301578* \\
  2-21&   4.9& -58.7&18.52& ...& ...& ...& ...& ...   \\
  2-22&   7.5& -35.8&17.99& ...& ...&19.88& 19.22 &M285594*    \\
  2-23&  21.4&  -0.4&17.67& ...& ...&19.62& 19.26 &M290095* \\
  2-24&  33.2&  99.7&14.19& ...& ...&13.74& ...& F,M301218* \\
  2-25&  36.1&  60.9&15.45& ...& ...&14.62& ...& F,M297241* \\
  2-26&  42.6&  24.3&18.41& ...& ...&20.09& ...&M293005* \\
  2-27&  49.3&  22.5&17.14& ...& ...&20.01& ...&M292834* \\
  2-28&  54.7&  90.4&17.17& ...& ...&20.15& 19.79 &M300236* \\
  2-29&  61.1& -21.5&17.40& ...& ...&18.36& 17.72 &M287462*  \\
  2-30&  61.3&   9.4&12.97& ...& ...&13.81& ...& F      \\
  2-31&  61.0&  97.7&16.32& ...& ...&18.38& ...&M300943* \\
  2-32&  62.9&  24.1&16.90& ...& ...&19.48& ...&...       \\
  2-33&  70.5&  46.5&14.32& ...& ...&17.51& 17.75 &C272,M295709* \\
  2-34&  70.7&  84.4&18.01& ...& ...&19.69& ...&M299479* \\
  2-35&  73.1&  57.1&17.38& ...& ...&19.95& 19.14 &M296649* \\
  2-36&  73.8&  79.5&17.00& ...& ...&15.98& 15.11 & F,M299023* \\
\tableline
\tableline
\cameracont
  2-37&  78.1&  31.3&16.81& ...& ...&18.01& 17.63 &M293895* \\
  2-38&  84.5&  18.3&18.16& ...& ...&20.26& 19.80 &M292232* \\
  2-39&  89.4&  36.4&16.76& ...& ...&19.12& 18.91 &M294521*  \\
  2-40& 106.4&  43.6&16.69& ...& ...&20.13& 17.72 &M295241*  \\
  12-1& -24.7& -34.5&16.84& ...& ...&19.16& 18.80 &M310382*       \\
  12-2& -19.5& -27.9&16.84& ...& ...&18.30& 17.38 &M311353*      \\
  12-3& -18.0& -39.7&17.47& ...& ...&20.02& 19.39 &M309701*       \\
  12-4& -14.9& -37.1&17.27& ...& ...&19.91& 19.28 &M309980* \\
  12-5& -13.4& -13.9&17.62& ...& ...&19.78& 19.88& M313244* \\
  12-6& -12.7& -24.2&17.97& ...& ...& ...& ...& ...  \\
  12-7&  -3.4& -12.7&16.97& ...& ...&19.87& ...&C271,M313039*       \\
  13-1&   2.5&   5.6&16.60&16.03& ...&20.12& ...&Bo133,M287167*       \\
  13-2&  10.3&   2.5&16.78& ...& ...&19.62& 17.60 &M286897*+    \\
  13-3&  13.4&   0.2&17.74& ...& ...& ...& 18.94 &M286613*+       \\
  14-1&  -4.5&  14.2&18.41& ...& ...&19.56& ...&...       \\
  14-2&  20.0&   3.9&17.82& ...& ...&18.96& ...&M296593*  \\
  14-3&  23.8& -11.8&18.05& ...& ...&18.86& 18.44 &M294947*  \\
  15-1&  -9.4&   0.2&17.75& ...& ...&20.80& ...&...       \\
  15-2&  -7.1&  -9.4&15.27&14.52& ...&17.66& ...&M305085*   \\
  15-3&  -0.5&  -4.0&16.40&15.38& ...&19.35& ...&M305627*  \\
  15-4&  18.1& -13.0&17.28&16.35& ...&19.67& ...&...     \\
  16-1&   6.2& -27.3&17.31& ...& ...&19.76& ...&  M269269 \\
  16-2&  18.6&   4.4&17.62& ...& ...&19.86& ...&  M271605 \\
  17-1&  10.8&  18.9&17.69& ...& ...&19.13& ...&  M262052 \\
  19-1& -19.3& -20.7&16.91&15.70& ...&17.44& ...&  M189230,C214 \\
  20-1&  31.4& -19.1&16.39&15.90& ...&18.32& 18.26 &  M201062,C219 \\
  21-1& -58.0& -38.0&18.56&16.72&19.63&20.54& ...&...       \\
  21-2& -50.1&  -1.7&18.38&16.97&19.63&20.33& ...&...       \\
  21-3& -49.2&   8.6&17.74&16.33&18.93&19.75&19.62& M116914*  \\
  21-4& -46.2&  19.4&18.21&16.96&18.99&19.69&19.45& M117260*  \\
  21-5& -45.5& -21.0&17.90&16.97&18.67&19.57&19.29&M115071*  \\
  21-6& -38.1& -31.1&19.01& ...&20.38&21.11& ...&...       \\
  21-7& -35.2&  30.3&17.14&15.86&18.36&19.07&18.17& M117914* \\
  21-8& -33.3&  37.3&18.15&16.57&19.13&19.92&19.25& M118340*  \\
  21-9& -33.6&   2.7&17.54& ...&18.01&18.65&17.40&M116231*+   \\
 21-10& -33.2&  -4.9&17.63& ...&17.93&18.59&17.59&M115888*+  \\
 21-11& -31.9&   5.2&17.56&16.32&17.20&17.71&16.76& M116394*+  \\
 21-12& -30.7& -33.0&18.37& ...&19.60&20.40&20.22&M114664*   \\
 21-13& -30.0&   0.7&16.76&16.19&17.55&18.49&17.97&C162,M116005*+  \\
 21-14& -24.2&  35.6&18.75& ...&19.14&19.86&19.49&...      \\
 21-15& -22.8&  -1.0&18.07& ...&19.39&20.21&19.61&M116059*  \\
 21-16& -21.9&  16.0&17.33&16.12&18.57&20.42&19.26& M117067*+  \\
 21-17& -21.9& -55.4&19.15& ...&20.01&20.22&19.40& M113014*+  \\
 21-18& -21.4&  29.7&16.59&15.82&18.91&18.85&18.50& M117890*+  \\
 21-19& -18.4&  47.3&18.12&16.81&19.24&20.14&19.72&...      \\
\tableline
\tableline
\cameracont
 21-20& -15.9&  31.9&17.57&16.54&18.69&19.57&19.34&M118031*   \\
 21-21& -13.0&   0.9&17.82& ...&19.12&19.98&19.84& M116100*+   \\
 21-22& -12.3& -30.6&18.39& ...&18.83&19.14&18.13&M114558*+   \\
 21-23&  -5.3&  29.1&18.98& ...&19.91&20.48&19.75&...       \\
 21-24&   2.8& -12.5&18.69&17.44&19.78&20.49&19.76& M115544*    \\
 21-25&  17.1&  42.7&18.96& ...&20.00&20.59& ...&...       \\
 21-26&  20.0&   8.9&17.08&15.97&18.43&19.32&19.19& M116654*+  \\
 21-27&  20.5&  36.0&17.36& ...&17.51&18.17&17.70& M118284*+   \\
 21-28&  20.3& -48.3&19.11& ...&19.86&20.74& ...&M113509*  \\
 21-29&  21.0&  50.3&18.38& ...&19.40&20.02&19.48&M118987*  \\
 21-30&  21.0& -24.0&18.59& ...&19.90&20.27&19.08&...       \\
 21-31&  43.1& -14.3&18.63& ...&19.80&20.09&18.60&M115603*  \\
 21-32&  44.0&   1.1&19.10& ...&20.29&20.87&19.68& M116622*  \\
 21-33&  50.6&  26.2&18.02& ...&18.40&19.13&18.61& M117689*+  \\
 21-34&  50.8&  22.3&18.12& ...&18.92&19.61&19.01& M117411*+   \\
 21-35&  54.4&  23.7&18.27& ...&18.79&19.45&18.82& M117528*+  \\
  22-1& -20.2&  24.1&19.09& ...& ...& ...& ...&...       \\
  22-2& -17.4& -29.8&18.03& ...&18.95&19.41&17.74& M121860*+ \\
  22-3& -14.1&  -2.0&19.19& ...&19.92&20.19&19.69& M124242*+ \\
  22-4& -12.9& -23.6&17.86& ...&19.92&20.49&18.45& M122833*+      \\
  22-5&  -7.9& -31.2&15.89&15.21&17.88&17.69&16.22&  C179,M121810*+ \\
  22-6&  -7.5& -39.2&18.15& ...&18.39&17.97&16.93&  F,M121110*+ \\
  22-7&  11.0&  -8.5&17.00&15.97&18.43&19.17&18.77& M123759*+ \\
  23-1&  -7.6&  27.6&18.23& ...& ...&16.81&15.62&  F,M123009*+ \\
  23-2&  -3.4&   6.0&17.61& ...&16.49&15.49&14.19&  F,M121411*+ \\
  23-3&  -1.7&  -9.0&18.39& ...& ...&19.20&18.62& C186,M120509*+ \\
  23-4&  13.2&  27.1&18.95& ...& ...&20.70& ...&...       \\
  24-1& -37.1&   3.1&18.53& ...& ...&18.45& 18.02 &M142150*  \\
  24-2&  16.5& -27.3&18.59& ...& ...&20.04& 20.17 &M140350*  \\
  24-3&  16.9& -12.9&16.79& ...& ...&15.85& 15.03&  C202,M141201*  \\
  24-4&  17.7&  -3.4&16.14&15.99& ...&15.11& 14.30&  C203,M141762* \\
  24-5&  21.0& -23.5&17.74&16.29& ...&19.27& 19.08 &M140700* \\
  24-6&  29.1&  32.3&17.36&16.34& ...&18.76& 18.61 &M143851*   \\
  24-7&  41.5&  34.6&18.84& ...& ...&19.02& ...&M144039* \\
  25-1& -17.0&   3.4&17.64& ...& ...&20.68& 19.13 & M150442 \\
  25-2&   8.8&  23.0&18.44& ...& ...&20.12& ...& M153427 \\
  26-1&  44.9&  10.3&17.87& ...& ...&19.91& 19.90 & M173058 \\
  26-2&  45.1&  20.0&15.24& ...& ...&14.17& 13.50 & M174377,F \\
  26-3&  60.7&  27.9&18.14& ...& ...&18.82& 19.68 & M175403 \\
  27-1& -31.4& -15.5&17.44& ...& ...&18.27& 17.65 & M184894 \\
  27-2& -15.8&  11.7&17.15& ...& ...&13.39& 11.78 & M190392,F \\
  27-3&  17.9&  33.6&15.49& ...& ...&14.25& 13.47 & M193766,F \\ 
  27-4&  22.0& -20.8&18.07& ...& ...&19.53& ...& M184137 \\
  29-1& -32.3&  -4.8&17.88& ...& ...&19.52& ...& M222245 \\
  29-2& -26.8&  -6.6&17.94& ...& ...&19.57& 19.62 & M221939 \\
\tableline
\tableline
\cameracont
  29-3& -25.1&  -1.6&16.80& ...& ...&18.70& ...&  M222694 \\
  29-4& -24.5& -11.1&17.24& ...& ...&19.78& 19.98 &  M221208 \\
  29-5& -12.4& -20.3&17.36& ...& ...&19.78& ...&  M219847 \\
  29-6&  -3.7& -27.4&17.63& ...& ...&18.65& ...&  M218638 \\
  29-7&  -2.4& -18.3&15.75&14.68& ...&17.21& ...&  M220179,C259\\
  29-8&   2.3&  14.9&17.60&16.43& ...&19.41& 19.37 &  M226111 \\
  29-9&  18.1&  -0.4&18.31& ...& ...&20.32& ...&  M222869 \\
 29-10&  18.9&   9.4&17.73& ...& ...&17.75& 17.19 &  M225062 \\
 29-11&  25.6&  -1.5&17.31&16.40& ...&18.88& 19.36 &  M223306 \\
 29-12&  37.2&   1.3&17.27&16.29& ...&18.42& ...&  M223518 \\
 29-13&  37.8&  -6.6&15.83&14.98& ...&16.59& 16.15 &  M222014 \\
 29-14&  49.7& -12.9&17.70& ...& ...&18.56& ...&  M221082 \\
  30-1& -44.9& -28.9&18.12& ...& ...&15.66& ...&  F,M228960* \\
  30-2& -41.1& -19.5&16.34& ...& ...&14.97& ...&  F   \\
  30-3& -18.4& -35.0&17.17& ...& ...&18.29& 17.12 & M228465* \\
  30-4& -12.9& -36.2&17.93& ...& ...&20.14& 19.77 & M228330* \\
  30-5&  -7.2&  14.5&17.65& ...& ...&19.42& 18.94 & M232121* \\
  30-6&   0.5& -11.5&17.45& ...& ...&19.89& 19.85 & M230202* \\
  30-7&  10.1&   2.5&18.12& ...& ...&19.06& 18.51 & M231289* \\
  30-8&  12.5&  38.0&17.94& ...& ...&20.13& 19.78 & M233726*  \\
  30-9&  19.3&  22.5&17.57& ...& ...&19.81& 19.22 & M232583* \\
 30-10&  20.8&  -9.7&17.46& ...& ...&18.49& 17.88 & M230297* \\
 30-11&  25.8&  31.1&15.31&14.65& ...&18.27& 17.98 &  C262,M233196*\\
 30-12&  28.6&  -0.6&16.93& ...& ...&19.80& 18.34 &M230997*  \\
 30-13&  56.3&  34.2&17.53& ...& ...&18.83& ...&...  \\
  31-1& -46.9& -28.6&17.45&16.32& ...&19.17& 18.78 &M238910*  \\
  31-2& -35.9& -68.3&17.68& ...& ...&19.78& 19.77 &M235189* \\
  31-3& -33.2&  21.9&17.74& ...& ...&19.64& 19.66 &M245254*  \\
  31-4& -31.2& -42.8&17.65& ...& ...&19.26& 18.99 &M237521*  \\
  31-5& -22.8& -33.3&16.73& ...& ...&18.58& 18.43 &M238383*  \\
  31-6& -17.7& -34.5&16.40& ...& ...&17.99& 17.64 &M238292*  \\
  31-7& -12.3& -41.8&17.02&15.88& ...&19.05& 18.69 &M237513*  \\
  31-8&  -7.9& -45.6&17.57& ...& ...&19.81& ...&M237157*  \\
  31-9&  -7.4&   7.2&16.22&15.65& ...&19.26& 18.25 &M243192*  \\
 31-10&  -3.9&  12.8&17.41& ...& ...&19.68& 19.39 &M243914*   \\
 31-11&  17.3&   8.2&17.60& ...& ...&19.47& 19.26 &M243379*  \\
 31-12&  66.7&  -3.9&17.41&16.50& ...&20.10& ...&M241834*  \\
 31-13&  91.5&  27.2&18.01& ...& ...&20.87& 20.25 &M245757*    \\
 31-14& 103.8&  28.5&17.51& ...& ...&18.06& 17.67 &M245981*  \\
  34-1& -24.8&  -9.9&17.28&15.70& ...&20.61& 20.46 &M244061* \\
  34-2& -11.7&  14.7&16.73& ...& ...&15.05& 13.54 & F,M247410* \\
  34-3&  -3.2&  -1.3&17.69&16.55& ...&20.01& ...&M245273*    \\
  35-1& -36.6& -22.1&17.77& ...& ...&19.78& ...&M260197*   \\
  35-2& -18.7& -11.8&18.12& ...& ...&20.71& ...&...      \\
  35-3&   6.1&  -5.5&15.56&14.90& ...&18.22& ...& M262035*\\
\tableline
\tableline
\cameracont      
  35-4&  11.1&   1.8&17.72& ...& ...&20.03& ...&...      \\
  35-5&  26.2&  15.1&17.07&16.01& ...&19.65& ...& M264052*   \\
  35-6&  28.5&   9.4&17.45& ...& ...&20.05& ...& M263457*\\
  61-1& -46.1& -70.0&17.49& ...& ...&18.69& 18.48 &  M318399 \\
  61-2& -39.6& -27.6&18.48& ...& ...& ...& ...&...      \\
  61-3& -37.1& -68.2&16.33&15.25& ...&18.05& 18.22 &  M318521 \\
  61-4& -29.1& -72.4&17.96& ...& ...&20.46& 20.47&  M317901 \\
  61-5& -24.9&  28.5&18.41& ...& ...&22.41& ...&  M330848 \\
  61-6& -18.1& -22.2&16.93&16.10& ...&20.50& ...&  M324358 \\
  61-7& -13.0& -30.9&17.80& ...& ...&21.88& ...&  M323444 \\
  61-8&  -1.5&  21.1&18.14& ...& ...&21.93& ...&  M329966 \\
  61-9&   2.2& -17.6&17.47& ...& ...&20.68& 16.94 &  M325012 \\
 61-10&  21.3&  56.6&18.14& ...& ...&20.01& 19.79 &  M334351 \\
 61-11&  74.1&  41.0&18.86& ...& ...&20.74& ...&  M332637 \\
  62-1& -16.1&  -6.1&17.59& ...& ...&14.92& 13.84 &  M310396,F \\
  62-2&  -8.8& -11.0&16.94&15.96& ...&18.81& ...&  M309854 \\
  63-1& -26.9&  -0.4&15.57& ...& ...&14.13& 13.48 &  M300228,F \\
  63-2& -16.9&  21.9&14.42& ...& ...& ...& ...&...      \\
  63-3&  -7.2& -15.8&17.80& ...& ...&18.86& ...&  M298586 \\
  63-4&  -4.7&  35.9&17.65& ...& ...& ...& ...&...      \\
  63-5&  11.0&  19.7&17.14& ...& ...&19.37& ...&  M302323 \\
  63-6&  14.0&  24.9&17.01&15.66& ...&18.66& ...&  M302895 \\
  64-1& -28.3& -15.8&16.53& ...& ...&14.20& 13.10 &  M280810,F \\
  64-2&  -6.5& -13.5&17.98& ...& ...&20.19& 19.87 &  M281341,C253 \\
  64-3&   3.9&   5.0&17.59& ...& ...& ...& ...&...      \\
  64-4&  32.0&  49.0&18.44& ...& ...& ...& ...&...      \\
  64-5&  39.9&  28.9&14.98& ...& ...& ...& ...&...      \\
  64-6&  46.1&  -5.3&16.36& ...& ...& ...& ...&...      \\
  64-7&  49.2&  32.4&18.90& ...& ...& ...& ...&...      \\
  66-1& -61.9& -45.3&17.09& ...& ...&14.05& 12.78 &  M230960,F \\
  66-2& -47.4& -65.2&17.00& ...& ...&14.81& 13.80 &  M229428,F \\
  66-3& -38.0& -42.2&18.44& ...& ...&19.50& 19.17 &  M231225 \\
  66-4& -29.3&  12.5&17.82& ...& ...&19.70& ...&  M235247 \\
  66-5& -24.0&  24.8&17.65& ...& ...&19.93& 19.81 &  M236469 \\
  66-6& -14.1& -26.6&18.16& ...& ...&19.53& 19.30 &  M232273 \\
  66-7&   6.1& -28.2&17.46&16.69& ...&18.32& 17.76 &  M232187,C225 \\
  66-8&  70.7&  54.3&17.65& ...& ...&18.99& 18.79 &  M239330 \\
  66-9&  73.1&  59.4&17.85& ...& ...& ...& ...&...      \\
  67-1& -20.6&   6.4&17.61& ...& ...&17.51& 17.31 &  M212107,C223 \\
  67-2&  -5.7&  10.6&18.18& ...& ...&19.67& 19.18 &  M212788 \\
  67-3&  -4.0&   2.8&15.98&16.38& ...&18.34& 17.60 &  M211519,C224\\
  67-4&   4.7&  -3.9&17.54& ...& ...&19.67& 19.70 &  M210550 \\
  67-5&   5.6&   5.5&17.45& ...& ...&17.97& 17.71 &  M211864 \\
  67-6&  12.7&   1.4&17.96& ...& ...&21.50& 20.06 &  M211341 \\
  67-7&  19.4&  18.5&18.05& ...& ...&19.40& 19.45 &  M213883 \\
\tableline
\tableline
\cameracont      
  67-8&  28.7&  19.0&17.68&17.81& ...&19.17& 19.19 &  M213989 \\
  68-1& -22.4&  -0.7&18.25& ...& ...&19.75& 19.59&  M205414 \\
  68-2& -14.2&  26.8&17.74& ...& ...&18.80& 18.44 &  M208680 \\
  68-3&   5.9&  -1.1&17.48& ...& ...&19.06& 19.24 &  M205279 \\
  69-1& -26.2& -15.9&15.91&15.46& ...&18.17& 17.89 &  M174595 \\
  69-2& -17.7& -41.7&17.52&16.54& ...&20.44& 19.94 &  M170823 \\
  69-3& -14.6& -13.1&14.00&13.49& ...&16.19& 15.98 &  M175031,C205\\
  69-4& -13.8&   6.8&17.15& ...& ...&18.85& 18.66 &  M178102 \\
  69-5& -11.5& -30.5&16.72&15.83& ...&20.45& 19.19 &  M172416 \\
  69-6& -10.2&  -4.0&16.76&15.93& ...&18.83& 18.27 &  M176445 \\
  69-7&  -9.0&  13.7&17.50& ...& ...&19.47& 19.37 &  M179323 \\
  69-8&  -6.7& -41.0&17.76& ...& ...&19.94& 19.66 &  M170945 \\
  69-9&  -0.7& -45.6&18.14& ...& ...&19.85& 18.31 &  M170310 \\
 69-10&   4.4&  -6.8&18.03& ...& ...&20.12& ...&  M176005 \\
 69-11&  10.9& -33.1&18.17& ...& ...&20.16& 19.80 &  M172052 \\
 69-12&  13.0& -58.6&17.23&15.72& ...&19.65& 19.58 &  M168596 \\
 69-13&  14.7&  29.6&17.65& ...& ...&18.94& 17.83 &  M181766 \\
 69-14&  21.4& -26.5&17.27&15.88& ...&19.08& 18.08 &  M173006 \\
 69-15&  34.8& -10.7&17.02&16.38& ...&18.67& 18.51 &  M175355 \\
 69-16&  37.7&  52.5&18.50& ...& ...&19.40& 18.88 &  M185318 \\
  70-1& -57.7& -33.4&15.92&14.96& ...&17.33& 17.17 &M141838*  \\
  70-2& -30.6& -38.6&18.15& ...& ...&19.65& ...& ...     \\
  70-3&  -4.2& -20.3&18.31& ...& ...&19.98& ...& ...     \\
  70-4&  -4.0& -27.1&17.75&16.63& ...&19.48& ...&...      \\
  70-5&  25.1&   6.7&17.39& ...& ...&13.59& ...& F,M144354*  \\
  70-6&  30.2& -20.7&18.25& ...& ...&19.54& ...& C180,M142868* \\
  70-7&  33.6&  35.9&17.69&16.16& ...&20.00& ...&M146626*  \\
  70-8&  41.1&  43.0&18.56& ...& ...&19.64& 18.46 &M147357*  \\
  70-9&  54.8&  48.8&18.08& ...& ...&20.21& ...&M147789*  \\
 70-10&  64.4&  50.9&17.67& ...& ...&18.90& 18.38 &M147947* \\
  71-1& -33.7& -43.3&15.57& ...&13.82&13.75&12.47& F,M126315*+  \\
  71-2& -19.6&  -5.8&18.40& ...&19.90&20.25&19.40& M129271*+    \\
  71-3& -16.5& -10.7&18.45& ...&15.69&15.28&13.54& F,M129001*+    \\
  71-4& -13.5& -46.6&19.03& ...&18.92&20.24&18.46& M126058*+  \\
  71-5&   2.0&  15.7&18.49& ...&17.34&17.32&15.93& F,M130197*  \\
  71-6&  11.4& -26.2&19.30& ...&20.39&20.83&20.13&...      \\
  71-7&  23.4&  30.4&19.05& ...& ...&21.61& ...&...      \\
  72-1&  10.7& -66.4&18.66&17.78&19.37&20.12&19.73& M115091*+      \\
  72-2&  16.2&  54.1&16.68& ...&15.35&15.40&14.18& F,M122083*+     \\
  72-3&  20.8&  45.4&17.59& ...&16.68&16.70&15.44& F,M121469*+     \\
  72-4&  23.1&  35.8&13.35& ...&12.37&12.89&11.69& F,M120852*+     \\
  72-5&  24.7& -30.2&17.34& ...&18.02&18.58&18.21&M117014*+      \\
  72-6&  27.3& -59.0&18.27& ...&18.08&17.03&14.82& F,M115526*+     \\
  72-7&  35.0& -65.3&18.55&17.12&20.11&20.69& ...&...      \\
  72-8&  41.2&  -3.6&18.28& ...&19.32&20.01&19.69& M118590*+  \\
\tableline
\tableline
\cameracont
  72-9&  44.6&  17.5&18.56& ...&19.54&20.26& ...& M119239*  \\
 72-10&  58.4& -20.8&17.68& ...&18.10&18.73&18.27& M117508*+      \\
 72-11&  63.1&  15.8&17.26&16.33&18.30&19.17&18.85&M119624*+      \\
 72-12&  64.2&  31.1&17.60& ...&18.95&19.77&19.48&M120551*+      \\
  74-1& -11.5&   2.2&18.48& ...& ...&18.69& ...&M98637*+ \\
  74-2&  -7.0&   8.4&18.58& ...& ...&18.49& 18.91 &M99367*      \\
  74-3&   9.1& -15.4&19.84& ...& ...& ...& ...&...      \\
  74-4&  14.0&  -7.5&19.42& ...& ...& ...& ...&...      \\
  74-5&  15.1& -19.4&18.83& ...& ...&19.62& ...& M97778*    \\
  75-1& -17.6& -17.0&18.15& ...& ...&19.80& ...& M78656*  \\
  75-2&  -6.9& -17.6&18.00& ...& ...&18.88& 18.77&M78570*      \\
  75-3&  -4.6&   3.4&18.13& ...& ...&19.31& 19.49 &M80105*      \\
  75-4&  17.9& -13.8&17.00& ...& ...&18.63& ...& M79401*  \\
  76-1& -10.3&   6.9&18.21& ...&16.33&16.25&14.91&M105276*+      \\
  76-2&   7.4&  16.6&16.44& ...&14.28&14.18&12.73&M106059*+      \\
  76-3&  13.3&  10.7&18.76& ...&16.28&15.60&13.77&M105519*+     \\
  76-4&  15.2&   1.4&17.84& ...& ...&18.96&19.00& C158,M104590*+     \\
  77-1& -16.2&  33.0&19.29& ...&18.87&19.28&18.43& M128248*+  \\
  77-2& -14.4& -34.4&18.80& ...&19.89&19.72&17.67& M122502*+  \\
  77-3&  -7.4&  34.1&18.96& ...&19.06&19.43&18.33& M128323*+  \\
  77-4&   7.8&  18.5&19.36& ...&20.10&20.71&19.91& M126841*+  \\
  77-5&  11.9&  47.4&18.26& ...&19.33&19.92&19.42& M129124*+  \\
  77-6&  21.9&   2.1&17.68& ...&18.38&18.74&17.81& M125478*  \\
  78-1& -61.5&  91.2&17.36& ...&15.71&15.76&14.49& M108192*+  \\
  78-2& -55.5&  59.2&16.15& ...&14.75&14.80&13.63& M105577*+  \\
  78-3& -50.2& -79.8&17.06& ...&16.02&18.01&14.17& M92874*  \\
  78-4& -48.6& -97.1&18.38& ...& ...&19.84&19.46& M91046*+ \\
  78-5& -48.3&  24.4&16.82& ...&18.01&19.13&18.49&   MAC43,M102230*+   \\
  78-6& -47.6&  -2.1&17.49&16.06&18.50&19.61&19.70&   MAC50,M99865* \\
  78-7& -45.7& -13.6&18.07& ...&19.08&20.13&19.52&   MAC55,M98372*+   \\
  78-8& -44.2& -59.0&17.11& ...&15.38&15.35&14.00&   F,M94509*+ \\
  78-9& -44.1&   8.3&16.65&15.63&17.52&18.40&18.18&   MAC63,M100485*+   \\
 78-10& -42.1&  18.5&18.13& ...&19.39&20.30&19.98&   MAC68,M101761*   \\
 78-11& -40.9&  23.7&17.57& ...&18.43&19.38&19.26&   MAC75,M102348*   \\
 78-12& -37.8&  35.7&16.84&15.39&17.91&18.78&18.64&   MAC82,M103270*+   \\
 78-13& -37.0& -51.8&17.78& ...&19.01&19.98&19.65&   MAC86,M95100*+ \\
 78-14& -34.6&  14.5&17.15& ...&18.29&19.14&18.77&   MAC89,M101163*+   \\
 78-15& -33.3&   4.3&17.49& ...&17.69&18.39&18.11&   MAC99,M100127*+ \\
 78-16& -33.0&  25.7&17.90& ...&19.25&20.23& ...&   MAC100,M102266*   \\
 78-17& -31.4&  36.2&18.26& ...&19.28&20.36&20.55&   MAC104,M103322*+ \\
 78-18& -30.9&-104.6&17.78& ...& ...&19.39&18.85& M90408* \\
 78-19& -29.0& -76.4&16.99& ...&17.24&18.02&17.70&   MAC114,M92873*+  \\
 78-20& -29.0&  16.3&17.88& ...&19.09&20.19&20.07&   MAC113,M101502*   \\
 78-21& -27.1&  -7.4&15.62&14.66&17.13&18.13&17.96&   MAC119,M98966*+   \\
 78-22& -26.6&  44.1&18.78& ...&19.19&20.23&20.32&   MAC123,M104151*+ \\
\tableline
\tableline
\cameracont
 78-23& -25.1&  15.1&17.93& ...&19.52&20.71&20.76&   MAC130,M101555*   \\
 78-24& -24.1&  20.9&16.99&15.82&18.48&19.25&18.96&   MAC134,M101781*+ \\
 78-25& -21.9& -79.6&17.35& ...&18.56&19.46&18.55&   MAC144,M92719*+ \\
 78-26& -21.7&  -7.8&17.91& ...&18.30&19.09&18.94&   MAC145,M98967*   \\
 78-27& -19.1& -72.5&18.12& ...&19.45&20.38&20.05&   MAC161,M93535*  \\
 78-28& -18.5&  29.3&17.13& ...&18.98&20.11&19.92&   MAC162,M102811* \\
 78-29& -19.0& -44.7&15.76&15.00&17.09&17.94&17.72&   MAC159,M95773*   \\
 78-30& -18.3&  20.5&16.48& ...&16.59&17.25&16.79&   MAC163,M101752*+   \\
 78-31& -15.2& -12.0&17.94& ...&18.07&18.80&18.04&   MAC179,M98593*+ \\
 78-32& -14.4&  30.9&17.03& ...&19.16&20.36&19.82&   MAC188,M102821*   \\
 78-33& -14.8&  51.0&18.07& ...&19.78&20.44&19.44&   MAC180,M104889*   \\
 78-34& -13.7&  12.7&17.22& ...&18.94&20.10&19.75&   MAC192,M101005*   \\
 78-35& -12.9& -29.4&17.37& ...&18.57&19.39&19.24&   MAC196,M97021* \\
 78-36& -10.1& -57.3&17.18& ...&19.11&18.94&18.54&   MAC216,M94730*+   \\
 78-37& -11.2&  20.4&16.66&16.00&17.39&18.15&17.87&   MAC209,M101965*   \\
 78-38&  -9.8& -74.0&16.70&15.47&18.31&19.11&18.76&   MAC220,M93149*+ \\
 78-39&  -9.0&  33.6&16.61& ...&17.46&18.13&17.77&   MAC223,M103111*+ \\
 78-40&  -7.7&  12.1&16.10&15.29&17.50&18.52&18.38&   MAC231,M100953*+   \\
 78-41&  -7.7&  37.1&16.91& ...&18.80&19.91&19.74&   MAC227,M103476*+   \\
 78-42&  -7.2& -11.4&16.60& ...&17.65&18.44&17.58&   MAC230,M98633*+\\
 78-43&  -5.4&  26.6&16.94& ...&18.77&19.65&18.33&   MAC246,M102407*\\
 78-44&  -7.2&  88.7&18.29& ...&19.20&20.13&19.97& M108079*  \\
 78-45&  -6.1& -18.3&16.78& ...&18.30&18.98&18.88&   MAC241,M98242*\\
 78-46&  -2.4& -62.4&17.57& ...&19.40&20.27&17.60&   MAC273,M94278*+\\
 78-47&  -3.6&  50.3&17.20& ...&19.35&20.21&20.01&   MAC262,M104969*\\
 78-48&  -1.8& -48.4&16.84& ...&15.62&15.50&14.11&   F,M95442*+ \\
 78-49&  -2.3& -76.9&14.70&14.06&16.47&17.26&16.93&   MAC277,M92869*+\\
 78-50&  -2.1& -67.6&16.94& ...&18.34&19.28&19.03&   MAC279,M93826*+\\
 78-51&  -1.9&  34.9&16.91& ...&18.66&19.81&19.21&   MAC274,M103231*+\\
 78-52&  -2.2&  -7.0&16.97& ...&18.16&18.88&18.55&   MAC272,M99251*\\
 78-53&  -1.3& -25.0&16.62& ...&18.15&18.69&18.50&   MAC287,M97550*\\
 78-54&  -0.4& -34.1&17.08& ...&18.96&19.83&19.41&   MAC296,M96618*\\
 78-55&  -0.7&  57.7&14.27&13.75&15.54&16.13&15.59&   MAC284,M105562*\\
 78-56&   0.6&  30.4&15.00&14.20&16.77&17.59&17.00&   MAC302,M102805*+\\
 78-57&  -0.3&  63.8&16.76& ...&16.97&17.53&17.06&   MAC293,M106123*+\\
 78-58&   0.3& -12.1&17.00&15.76&18.49&19.30&19.17&   MAC300,M98693*\\
 78-59&   0.0&  21.3&16.61& ...&17.23&17.73&17.25&   MAC297,M102170*\\
 78-60&   1.2&  49.4&17.02& ...&20.10&20.09&19.84&   MAC307,M104740*+\\
 78-61&   2.4& -19.5&16.45& ...&17.83&18.70&18.44&   MAC327,M97939*\\
 78-62&   1.2&  34.8&15.72& ...&18.42&19.12&18.41&   MAC308,M103087*+\\
 78-63&   3.5& -67.2&15.32&14.36&17.32&18.27&18.22&   MAC343,M93674*\\
 78-64&   3.2&  85.8&17.82& ...&18.95&19.85&19.22&   MAC329,M107853*+\\
 78-65&   3.7& -30.6&16.85&15.97&18.60&19.36&18.02&   MAC344,M96931*+\\
 78-66&   6.3& -46.6&16.80& ...&18.07&19.02&18.75&   MAC362,M95882*\\
 78-67&   7.4& -18.5&16.47& ...&18.21&19.12&18.94&   MAC374,M98311*\\
\tableline
\tableline
\cameracont
 78-68&   5.3&  52.4&16.78& ...&19.20&20.36& ...&   MAC357,M104904*\\
 78-69&   7.4&  45.7&15.87&15.80&18.38&19.25&18.53&   MAC369,M104435*\\
 78-70&   8.9& -26.3&16.33& ...&18.56&19.31&18.60&   MAC383,M97606*\\
 78-71&   8.1&  36.6&15.26&14.85&17.63&18.53&18.56&   MAC376,M103482*\\
 78-72&   9.1& -38.9&16.41&15.55&18.19&18.93&18.76&   MAC388,M96264*+\\
 78-73&   9.3&  57.0&16.76&15.75&18.97&20.03&20.08&   MAC385,M105480*+\\
 78-74&   9.5&  68.1&16.40&15.33&18.02&19.00&18.82&   MAC387,M106455*+\\
 78-75&  12.5&  20.5&17.02& ...&18.33&18.96&18.47&   MAC415,M101834*+\\
 78-76&  13.1&  28.8&16.84& ...&18.54&19.60&19.72&   MAC418,M102785*\\
 78-77&  13.4&  52.2&16.44& ...&17.78&18.41&17.31&   MAC421,M105064*+\\
 78-78&  13.9& -28.8&16.04&15.53&17.17&17.81&16.91&   MAC427,M97109*+\\
 78-79&  13.2&  46.7&15.24&14.55&16.58&17.28&16.72&   MAC419,M104503*+\\
 78-80&  14.4& -10.9&17.33& ...&18.94&19.94&19.83&   MAC434,M98725*\\
 78-81&  15.0&  10.6&17.18& ...&18.34&19.02&18.85&   MAC437,M100481*\\
 78-82&  14.7&  40.1&16.61& ...&17.21&17.94&17.78&   MAC432,M103846*\\
 78-83&  15.6&  16.4&17.28& ...&18.60&19.91&19.05&   MAC439,M101663*\\
 78-84&  17.1& -53.7&17.63& ...&18.88&19.77&18.52&   MAC459,M95142*+\\
 78-85&  17.3&  80.9&17.53& ...&17.75&18.21&17.75&   MAC453,M107513*+\\
 78-86&  16.6& -40.2&16.87&15.85&18.98&20.02&20.02&   MAC455,M96373*\\
 78-87&  19.6& -18.7&16.41& ...&17.98&18.54&17.34&   MAC470,M98040*+\\
 78-88&  20.4& -58.7&16.35&15.44&17.52&18.23&18.02&   MAC485,M94633*+\\
 78-89&  19.9&  42.8&15.39&14.79&16.78&17.75&17.54&   MAC478,M104136*\\
 78-90&  21.8& -51.0&16.55& ...&18.44&19.42&19.25&   MAC490,M95269*+\\
 78-91&  22.8&  59.3&17.69& ...&18.85&19.88&20.16&   MAC492,M105720*\\
 78-92&  22.4&  20.1&17.91& ...&19.55&20.64&19.77&   MAC491,M101763*+\\
 78-93&  23.6& -21.8&17.25&15.75&18.74&19.78&19.40&   MAC500,M97771*+\\
 78-94&  23.0&  32.0&16.03&15.40&17.11&18.01&17.70&   MAC496,M103021*+\\
 78-95&  23.0&  45.8&16.75& ...&18.41&19.47&19.16&   MAC494,M104381*+\\
 78-96&  25.5& -43.4&15.08&14.66&17.79&18.65&18.09&   MAC509,M95922*+\\
 78-97&  27.6&  50.1&17.08&15.38&18.11&19.01&18.86&   MAC519,M104808*\\
 78-98&  29.3&  21.1&17.80& ...&18.88&19.84&19.84&   MAC531,M101911*+\\
 78-99&  30.7& -43.5&15.80&15.14&16.72&17.22&15.97&   MAC537,M95929*+\\
78-100&  33.1& -55.4&18.15& ...&20.29&20.70&19.58&   MAC546,M94942*\\
78-101&  32.8& -49.6&17.33& ...&19.15&19.69&19.20&   MAC543,M95590*\\
78-102&  33.5&   8.9&18.63& ...&18.34&19.14&18.69&   MAC545,M100691*\\
78-103&  33.8& -40.5&16.59& ...&17.28&18.16&17.74&   MAC550,M96432*\\
78-104&  35.6&  13.8&18.88& ...&19.72&20.57&20.47&   MAC557,M101219*\\
78-105&  42.2& -50.8&17.71& ...&18.71&19.51&19.45&   MAC572,M95322*+\\
78-106&  63.2& -31.6&17.59& ...& ...&18.76&18.27&M96895*+  \\
78-107&  71.6&   5.0&18.52& ...& ...&20.23&19.88& M100250*    \\
  79-1& -40.6& -26.3&16.77& ...& ...&15.83& 15.15 &  F,M77126*    \\
  79-2& -28.3&   7.4&17.76& ...& ...&18.72& 18.10& M79662*     \\
  79-3& -36.7&  42.2&17.98& ...& ...&18.55& 18.05 & M82010*     \\
  79-4& -22.2&  -0.6&17.10& ...& ...&18.06& 17.56 & M79068*     \\
  79-5& -19.3&  11.0&17.48& ...& ...&18.35& 18.17 & M79912*     \\
\tableline
\tableline
\cameracont
  79-6&  -7.3&  45.4&17.46& ...& ...&18.38& 18.19 & M82305*     \\
  79-7&  24.0&  -9.5&17.13& ...& ...&15.59& 14.78 & F,M78417*     \\
  79-8&  32.4&  -7.0&17.95& ...& ...&19.12& 18.64 & M78581*     \\
  79-9&  35.0&  88.7&17.59& ...& ...&15.76& 14.69 & F,M86640*     \\
  80-1& -47.4& -15.7&16.05& ...&16.67&17.12&16.34& Bo327,M69422*\\
  80-2& -45.2&   9.7&18.11& ...&20.23&20.77&19.78& M71678* \\
  80-3& -30.8&  -8.7&17.86& ...&19.38&20.64&19.92& M70614*   \\
  80-4& -23.6&  38.0&18.01& ...&19.34&20.04&19.94& M74214*  \\
  80-5& -23.3&  32.3&17.65& ...&15.25&14.71&12.94& F,M73619*   \\
  80-6&  -9.7&  77.6&17.76& ...&18.65&19.71&19.51& M76945*  \\
  80-7&  -6.2&  25.6&18.46& ...&20.80&20.45& ...& M72742*  \\
  80-8&  -2.5& -22.9&14.37&13.96&15.37&17.20&17.02&  C107,M68940*\\
  80-9&  -1.6&   1.5&17.49& ...&18.50&18.24&16.09& M70960*+  \\
 80-10&  -0.4&  37.1&18.37& ...&19.05&19.97&19.80& M74024*+  \\
 80-11&   7.4&  66.5&18.72& ...&20.48&21.19&20.41& M75594* \\
 80-12&   9.9&  47.1&17.76& ...&18.13&18.98&18.44& M74749*  \\
 80-13&  10.4& -13.2&17.04&16.70&18.68&19.48&19.43&...      \\
 80-14&  12.0& -37.1&17.22&16.78&18.36&19.29&19.20& M66923*  \\
 80-15&  13.4&   8.4&18.87& ...&20.12&20.84&18.55&...      \\
 80-16&  14.5&  54.6&15.53& ...&14.07&14.02&12.78& F,M75359* \\
 80-17&  16.2&  -3.4&16.42&16.00&17.50&18.33&18.16& M70627*+  \\
 80-18&  24.7& -42.4&17.18&16.51&18.35&19.25&19.02&...      \\
 80-19&  28.0&  27.0&18.08& ...&19.20&19.94&19.85& M73258*+ \\
 80-20&  28.6&  -5.9&17.09&16.76&18.92&19.76&19.58& M70985*  \\
 80-21&  30.4& -24.4&18.50&17.57&19.35&20.32&19.70&...      \\
 80-22&  38.9& -77.2&17.79& ...&19.77&20.47&19.90& M63577* \\
 80-23&  40.3& -46.9&17.50&16.09&19.04&19.84&19.10& M66566*  \\
 80-24&  42.4&   0.2&16.90&16.13&17.93&20.23&18.93&  C111,M70962*\\
 80-25&  51.0&  27.2&18.57& ...&19.66&20.40& ...&M73300*  \\
 80-26&  58.4& -38.8&18.02& ...&19.60&20.36&19.31&...      \\
 80-27&  60.5& -54.8&17.23&16.58&18.21&19.10&19.04&...    \\
 80-28&  61.3& -15.0&18.76& ...&18.01&18.57&17.80& F,M69743* \\
  82-1& -91.6& -25.4&16.72& ...&15.13&15.17&13.90& F,M60501*+     \\
  82-2& -88.9&  11.3&18.06& ...&18.31&18.49&17.60& M64074*+ \\
  82-3& -83.6& -23.2&17.13& ...&15.20&15.05&13.66& F,M60725*+ \\
  82-4& -64.2&  59.7&17.61& ...&16.06&16.01&14.65& F,M68623*+    \\
  82-5& -62.6&  30.3&18.28& ...&16.29&16.04&14.53& F,M65934*+ \\
  82-6& -60.7& -82.0&17.30& ...&16.86&17.46&16.79& F,M55971* \\
  82-7& -59.8&  55.0&17.53& ...&18.46&19.98&18.48& M68152*+     \\
  82-8& -50.5&  42.3&18.22& ...&19.63&20.48& ...&M66481*  \\
  82-9& -44.1& -20.2&19.00& ...&20.00&20.36&19.57&M61066*+      \\
 82-10& -39.5&  36.1&18.30& ...&18.86&19.52&19.31&M66512*+ \\
 82-11& -37.9& -52.0&18.77& ...&19.86&20.69& ...& M59004* \\
 82-12& -28.4&  60.7&13.27& ...&12.50&12.43&11.47& F,M68791*+     \\
 82-13& -21.1& -93.3&18.19& ...&16.12&15.90&14.43& F,M55316*+ \\
 82-14& -18.5& -79.4&18.37& ...&19.76&20.50& ...&...      \\
\tableline
\tableline
\cameracont
 82-15& -18.6&  27.3&17.99& ...&18.07&18.75&18.17&M65727* \\
 82-16&  -1.9& -98.5&17.12& ...&17.84&18.34&17.81& M55008*  \\
 82-17&  -1.2&  72.8&17.78& ...&19.58&19.20&19.65&M69689*+      \\
 82-18&   1.7&  56.9&18.49& ...&18.38&19.08&18.40&M68456*+      \\
 82-19&   1.7&  41.1&16.34& ...&15.44&15.27&13.48& Bo338,M67024*+ \\
 82-20&   2.3& -87.6&17.55& ...&18.16&18.80&18.41& M55681*+     \\
 82-21&   2.7& -36.3&18.97& ...&19.87&20.51& ...& M59878* \\
 82-22&   9.8&  71.8&17.93& ...&18.96&19.68&19.20&M69782*+ \\
 82-23&  10.4&  25.7&18.00& ...&15.48&14.77&12.94& F,M65628*+ \\
 82-24&  18.8&  74.1&18.23& ...&18.96&19.67&19.31&M69970*+ \\
 82-25&  24.9& -46.6&19.14& ...& ...& ...&19.34&M58598*+     \\
 82-26&  26.7&   5.4&18.72& ...&19.73&21.28& ...&M62857* \\
 82-27&  30.3& -29.4&18.68& ...&19.61&20.45& ...& M60284*\\
 82-28&  35.6&  84.8&18.95& ...&17.35&18.83&15.35& F,M61269*+ \\
 82-29&  35.5& -19.2&18.47& ...&19.38&19.87&19.43& M61297*+ \\
 82-30&  34.3&  -7.8&18.19& ...&19.19&19.48&18.88& M62459*+ \\
 82-31&  36.2&   3.1&18.52& ...&18.58&20.41&17.99&M63439*+      \\
 82-32&  39.7&  44.6&18.12& ...&18.61&19.48&18.89& M67404*+      \\
 82-33&  50.0&  98.3&19.00& ...&18.40&19.11&18.33& M72029*+ \\
 82-34&  50.9&  -7.7&18.26& ...&18.85&19.36&18.43& M62515* \\
 82-35&  55.9&   5.5&18.17& ...&19.72&18.77&19.56& M63512*+  \\
 82-36&  58.1&  77.7&13.90& ...&12.33&12.18&10.88& F     \\
 82-37&  60.5&  62.9&18.81& ...&20.45&19.84&19.10& M68667*+ \\
 82-38&  61.7& 104.4&17.91& ...&19.14&18.40&19.08& M72434*+\\
 82-39&  62.2& -35.5&18.00& ...&16.01&15.96&14.66& F,M59824*+     \\
 82-40&  70.5& -19.6&18.88& ...&19.00&19.23&18.25&M61349*+      \\
 82-41&  76.5& -68.7&17.73& ...&15.09&14.58&12.78& F,M57028*    \\
 82-42&  79.0&  55.9&19.09& ...&17.44&17.53&16.35& F,M68442*+     \\
 82-43&  85.2& -49.9&15.11& ...&14.57&14.54&13.94& F,M58494*+ \\
 82-44& 115.4&  50.9&18.58& ...&19.66&20.41&19.89&M68685* \\
  83-1& -32.1&  10.0&19.95& ...& ...& ...& ...&...      \\
  83-2& -25.0&   7.8&18.02& ...&16.24&16.23&14.89& F,M79092*+     \\
  83-3& -22.5& -19.7&17.62& ...&15.81&15.77&14.41& F,M77012*+     \\
  83-4& -20.9&  16.0&18.62& ...&19.19&19.96&19.54&M79671*+     \\
  83-5& -12.7&  -2.7&18.95& ...&19.49&20.27&19.84&M78231*+  \\
  83-6&   8.0&   7.4&18.26& ...&19.19&19.89&19.46&M79067*+     \\
  83-7&  16.3&  -0.9&18.02& ...&19.07&20.07&20.05& M78085*+  \\
  83-8&  17.9&  29.7&18.77& ...&20.20&20.98& ...&...      \\
  83-9&  19.7&  19.4&18.08& ...&18.94&19.84&19.60& M79930*+ \\
 83-10&  18.2& -16.6&17.63& ...&18.47&19.35&19.10&M77259*+      \\
 83-11&  19.7&   1.3&17.37& ...&18.11&16.12&18.63& F,M78365*+     \\
 83-12&  20.2&  10.6&18.51& ...&18.14&18.59&18.03&M79320*+    \\
 83-13&  27.8&  -9.5&18.24& ...&18.99&19.77&19.49&M77755*+      \\
  84-1&-115.4& -86.8&18.82& ...&19.94&20.58& ...& M88643*   \\
\tableline
\tableline
\cameracont
  84-2&-111.3&-110.6&17.75& ...&17.99&18.12&17.23&M86176*+   \\
  84-3&-101.0& -18.1&18.90& ...&20.14&20.80&20.01& M93320*+  \\
  84-4& -81.1& -28.4&17.31&16.65&17.41&17.58&16.67& Bo43,M94313*+     \\
  84-5& -66.2& -95.9&18.52& ...&19.75&20.44&20.51& M87259*+  \\
  84-6& -55.1& -75.2&18.58& ...& ...&21.03&19.62&...      \\
  84-7& -39.9&-114.1&18.32& ...&19.74&20.53& ...&...      \\
  84-8& -31.8& -67.6&18.74& ...&19.53&20.12&19.64&M89905*+    \\
  84-9& -27.4& -59.8&18.88& ...&19.46&19.52&18.89&M90518*+   \\
 84-10& -25.8&  43.6&17.71& ...&14.93&14.09&12.11& F,M99696*+ \\
 84-11& -25.7& -94.3&18.49& ...&17.26&17.24&15.98& F,M87641*+     \\
 84-12&  -9.7&  22.1&18.00& ...&19.38&20.19&20.32& M97679*+ \\
 84-13&  12.7& -24.3&18.27& ...& ...&19.60&19.11&M93816*+    \\
 84-14&  35.2& -16.3&16.46& ...& ...&14.73&13.40& F,M94495*+ \\
 84-15&  35.5& -30.5&18.04& ...& ...&19.49&18.99&M93240*+ \\
 84-16&  51.6&  58.3&17.95& ...& ...&13.47&12.42& F,M101138*+ \\
 84-17&  57.6&  41.1&17.51& ...& ...&15.75&14.41& F,M99424*+ \\
 84-18&  60.3&  61.7&18.65& ...& ...&19.92& ...& M101485* \\
 84-19&  70.9&  94.9&16.28& ...& ...&13.99&12.60& F,M104766*+ \\
 84-20&  72.4& 129.5&18.81& ...& ...&17.51&16.21& F,M107755*+ \\
 84-21&  78.2&  44.4&18.91& ...& ...&18.65&18.20& F,M99731*+  \\
 84-22&  83.7&   9.9&18.53& ...& ...&20.34& ...& ...     \\
 84-23&  95.3& 149.7&18.47& ...& ...&18.62& ...& M109123* \\
 84-24&  95.5& 122.5&18.88& ...& ...&16.71& ...& F,M107165*     \\
 84-25&  99.5&  70.2&17.67&16.54& ...&17.82&17.33& Bo66,M102294*+      \\
 84-26& 118.6& 120.0&17.71& ...& ...&15.96&19.74& F,M107008* \\
 84-27& 134.8& 134.3&18.66& ...& ...&19.05& ...& M108090*  \\
  85-1& -69.6&  47.7&16.61& ...& ...&14.84& 13.96 & M117613,F \\
  85-2& -46.8&  40.2&17.32&16.15& ...&18.61& 18.72 & M117190 \\
  85-3& -42.0&  27.8&18.19& ...& ...&16.03& 15.01 & M116413,F \\
  85-4& -28.9&   6.5&17.50& ...& ...&18.44& 18.44 & M115316 \\
  85-5&   7.9& -12.0&17.76& ...& ...&19.57& 19.62 & M114276 \\
  85-6&  17.3& -11.5&18.46& ...& ...&20.39& ...& M114317 \\
  85-7&  28.6& -23.9&18.64& ...& ...&20.61& ...& M113591 \\
  85-8&  40.7& -24.2&17.36&16.12& ...&19.69& 19.19 & M113561 \\
  85-9&  43.6& -34.7&18.50& ...& ...&19.88& 19.79 & M112791 \\
  86-1& -71.2& -54.3&18.49& ...& ...&19.01& 18.16 & M123207 \\
  86-2& -40.9&  58.6&18.73& ...& ...&19.25& 18.67 & M131268 \\
  86-3& -38.3&  -5.0&18.66& ...& ...& ...& ...&...      \\
  86-4& -21.4& -64.2&18.81& ...& ...&20.03& ...& M122382 \\
  86-5&  -5.9&  43.7&18.13& ...& ...& ...& ...&...      \\
  86-6&   9.9&  11.5&18.27& ...& ...&15.91& 14.63 & M128775,F \\
  86-7&  52.9&   0.5&18.77& ...& ...&20.36& ...& M128072 \\
  86-8&  66.0&  -1.0&18.23& ...& ...&19.87& ...& M127701 \\
  86-9&  79.8&  77.4&18.64& ...& ...&20.07& 19.47 & M132656 \\
  87-1& -21.3&  10.1&17.75& ...& ...&20.11& ...& M135189,C184 \\
  87-2&  -7.5&   7.1&18.01&16.53& ...&20.54& ...& M135057,C185 \\
\tableline
\tableline
\cameracont 
  87-3&  17.0&   2.7&17.87& ...& ...&19.69& ...& M134614 \\
  88-1& -17.5&  10.8&18.36& ...& ...&19.48& 19.13& M147668 \\
  88-2&  -1.0&  18.4&17.21& ...& ...&14.98& 13.91& M148487,F \\
  88-3&   5.4& -26.8&17.98& ...& ...&19.49& 19.33& M144692 \\
  88-4&  21.0&   9.4&18.08& ...& ...&13.76& 11.72& M147616,F \\
  88-5&  38.6&  -9.4&17.19& ...& ...&20.19& 19.82& M145926 \\
  89-1& -50.5&   5.5&14.76& ...& ...&13.69& ...& M169104,F \\
  89-2&  -2.5& -33.8&17.86& ...& ...&18.47& 18.22 & M163884,C239 \\
  89-3&  -0.2&  33.9&18.72& ...& ...& ...& ...&...      \\
  89-4&  10.2&  33.8&18.79& ...& ...& ...& ...&...      \\
  89-5&  32.1& -40.0&18.24& ...& ...&22.45& ...& M163030 \\
  90-1& -28.9&  -5.5&18.38& ...& ...&19.22& ...& M212262 \\
  90-2& -27.1& -14.6&17.54& ...& ...&18.20& ...& ...     \\
  91-1&  -4.6&   4.6&17.91& ...& ...&20.75& ...& M230913*  \\
  91-2&   3.5&  -3.5&17.93& ...& ...&20.20& ...& M231870* \\
  91-3&   5.1&  -5.1&17.36& ...& ...&19.85& ...& M231475*  \\
  91-4&  11.2& -11.2&16.83& ...& ...&18.67& 18.22 & M230986* \\
  91-5&  11.4& -11.4&17.53& ...& ...&19.18& 18.61 & M231364*  \\
  91-6&  12.9&  23.9&16.85&16.09& ...&18.78& ...& M232892*  \\
  91-7&  15.9& -15.9&16.99&16.01& ...&19.48& 19.25 & M231093*  \\
 117-1&  14.3&  -3.6&17.61& ...& ...&19.40& 19.72 & M283808 \\
 118-1&  -1.8& -36.8&17.53& ...& ...& ...& ...& ...     \\
 118-2&  -0.7& -23.8&17.84& ...& ...& ...& ...& ...     \\
 118-3&  21.0&  39.4&17.10& ...& ...& ...& ...& ...     \\
 118-4&  33.2&  18.3&18.20& ...& ...& ...& ...& C246     \\
 119-1&  24.9& -14.9&17.45& ...& ...&14.88& 13.89 & M252790,F \\
 119-2&  57.0&   9.1&17.35& ...& ...& ...& ...& ...     \\
 121-1& -49.1& -21.1&17.65& ...& ...&18.74& ...& M152587 \\
 121-2& -35.6& -33.8&17.42& ...& ...&18.70& ...& M150726 \\
 121-3&  -8.1&  -7.6&17.84& ...& ...&14.61& ...& M154785,F \\
 121-4&  -1.4& -34.9&17.29&15.72& ...& ...& ...& ...     \\
 121-5&   7.1&  53.3&17.44& ...& ...& ...& ...& ...     \\
 121-6&  57.8&  28.2&17.71& ...& ...&19.78& ...& M160140,C175 \\
 130-1& -40.8& -16.6&17.68& ...& ...&19.61& ...& M160107 \\
 130-2& -37.4&  -5.6&17.36& ...& ...&18.97& ...& M161722 \\
 130-3& -36.2& -13.5&16.89&15.82& ...&18.63& ...& M160511 \\
 130-4& -34.4&  -0.1&16.82&15.75& ...&18.70& ...& M162612,C183\\
 130-5& -31.0&  -6.3&17.46&15.89& ...&19.84& ...& M161494 \\
 130-6& -28.1& -27.0&17.48&16.09& ...&19.32& ...& M158891 \\
 130-7& -27.0&   3.5&17.44& ...& ...&18.24& ...& M163068 \\
 130-8&  13.5&   7.2&17.45&16.14& ...&19.00& ...& M163624 \\
 130-9&  33.8&  16.2&17.01&15.99& ...&20.21& ...& M165014 \\
130-10&  37.5&  21.4&17.97& ...& ...&19.18& ...& M165574 \\
130-11&  54.9&  28.2&18.51& ...& ...&21.06& ...& M166505 \\
 131-1& -18.0&  -9.6&18.55& ...& ...&20.04&19.68& ...     \\
\tableline
\tableline
\cameracont
 131-2&  -1.8&  13.4&18.30& ...& ...&20.58&18.52&M136045*+     \\
 131-3&  21.7&  16.0&18.70& ...& ...&20.52& ...& ...     \\
 131-4&  22.0&  26.1&17.93& ...& ...&19.78&18.40& C167,M136809*+      \\
 132-1&  -8.8&  -1.4&16.95&15.38&19.17&19.85&19.47& M128117*  \\
 132-2&  -8.9& -11.6&16.93&16.13&17.90&18.65&18.36& M126986*+  \\
 132-3&  -8.2&   3.0&16.57& ...&18.61&19.36&19.20&  C154,M128433*\\
 132-4&  -5.5&  -5.8&17.91& ...&19.24&20.14&19.53& M127550*+  \\
 132-5&  -3.6&   7.7&16.23&15.18&17.68&18.30&19.32& M128711* \\
 144-1& -28.2&  17.0&19.05& ...&16.51&16.27&14.71& F,M63079*+ \\
 144-2& -14.3&  -3.6&16.87&15.81&18.08&19.09&18.99& M61076*+  \\
 144-3&  -7.8&   5.6&16.88& ...&17.06&17.72&17.28& M62024*+ \\
 144-4&   0.3&   3.7&16.87& ...&17.38&18.11&17.08& M61852*+ \\
 144-5&   3.2&  -0.1&16.92&15.36&18.12&19.95&18.90&  C134,M61466*+\\
 144-6&  13.9&   9.1&19.10& ...&20.13&20.86&19.75& M62403*+ \\
 144-7&  11.5& -10.7&18.93& ...&19.94&20.71& ...&...      \\
 144-8&  32.8& -19.4&19.15& ...&20.13&20.25&19.47& M59619*+    \\
 144-9&  36.9&   2.0&17.96& ...&19.00&19.81&19.38& M61681*+ \\
 145-1& -27.4& -30.9&17.54&16.19&19.17&19.93&19.56& M72998*+      \\
 145-2& -10.7&   3.1&19.02& ...&17.96&17.99&15.82& F,M75466*+     \\
 145-3&   1.6&  -3.9&18.30& ...&19.81&20.45&19.53&M74963*+  \\\
 145-4&   2.3&   3.2&18.34& ...&19.31&19.86&19.16&M75583*+  \\
 145-5&   3.6&  13.3&18.79& ...&20.66&20.54& ...& C138     \\
 145-6&  10.9&  14.5&18.73& ...&19.55&19.96&19.58& M76384*+  \\
 145-7&  15.2&   6.0&18.40& ...&19.49&20.21&19.87&M75746*+  \\
 145-8&  20.4&  17.0&18.59& ...&19.85&20.55& ...& ...     \\
\tableline
\tableline
\cameraend
\end{document} 

