\documentclass{article}
\usepackage{aj_pt4}
\begin{document}
\begin{deluxetable}{lccccc}
\tablewidth{0pc}
\tablecaption{New Quasar Radio Detections}
\tablenum{1}
\tablehead{
\colhead{R.A.(2000)}& 
\colhead{Dec.(2000)} & \colhead{$z$} & \colhead{S$_{\rm 1400}$(mJY)} & \colhead{M$_{\rm B}$} & \colhead{logL$_{\rm 8400}$} }
\startdata
00\phantom{q}00\phantom{q}41.9 & -02\phantom{q}29\phantom{q}23 & 1.07 &    7.2 &
 -26.3 & 32.1 \nl
00\phantom{q}01\phantom{q}50.0 & -01\phantom{q}59\phantom{q}40 & 2.82 &   37.1 &
 -27.4 & 33.7 \nl
00\phantom{q}05\phantom{q}07.0 & -01\phantom{q}32\phantom{q}46 & 1.71 &   73.1 &
 -25.9 & 33.5 \nl
00\phantom{q}07\phantom{q}27.1 &  02\phantom{q}41\phantom{q}12 & 0.30 &    8.0 &
 -23.5 & 31.1 \nl
00\phantom{q}27\phantom{q}17.3 &  00\phantom{q}37\phantom{q}23 & 1.23 &    4.6 &
 -26.1 & 32.1 \nl
00\phantom{q}31\phantom{q}36.5 & -01\phantom{q}36\phantom{q}22 & 2.38 &   16.6 &
 -26.7 & 33.2 \nl
00\phantom{q}39\phantom{q}42.4 & -39\phantom{q}29\phantom{q}14 & 1.46 &    4.6 &
 -25.9 & 32.2 \nl
00\phantom{q}39\phantom{q}42.5 & -35\phantom{q}28\phantom{q}02 & 0.84 &   92.2 &
 -25.2 & 33.0 \nl
00\phantom{q}41\phantom{q}50.6 & -38\phantom{q}20\phantom{q}09 & 1.74 &   71.2 &
 -24.8 & 33.5 \nl
00\phantom{q}41\phantom{q}59.9 & -39\phantom{q}21\phantom{q}47 & 1.85 &    4.9 &
 -26.7 & 32.4 \nl
00\phantom{q}42\phantom{q}16.5 & -02\phantom{q}54\phantom{q}22 & 2.74 &   31.6 &
 -27.3 & 33.6 \nl
00\phantom{q}42\phantom{q}40.7 & -33\phantom{q}39\phantom{q}20 & 2.06 &    6.4 &
 -25.8 & 32.6 \nl
00\phantom{q}42\phantom{q}59.9 & -30\phantom{q}07\phantom{q}42 & 0.61 &   39.1 &
 -24.7 & 32.4 \nl
00\phantom{q}43\phantom{q}22.4 & -26\phantom{q}39\phantom{q}05 & 1.00 &   80.1 &
 -26.4 & 33.1 \nl
00\phantom{q}43\phantom{q}51.3 & -28\phantom{q}27\phantom{q}41 & 0.84 &   55.2 &
 -25.1 & 32.8 \nl
00\phantom{q}48\phantom{q}10.3 & -40\phantom{q}05\phantom{q}34 & 1.64 &    8.1 &
 -26.2 & 32.6 \nl
00\phantom{q}49\phantom{q}40.8 & -26\phantom{q}32\phantom{q}59 & 3.16 &   39.0 &
 -25.9 & 33.8 \nl
00\phantom{q}50\phantom{q}40.9 & -25\phantom{q}41\phantom{q}24 & 0.78 &   43.7 &
 -24.5 & 32.7 \nl
00\phantom{q}51\phantom{q}30.4 &  00\phantom{q}41\phantom{q}50 & 1.19 &   16.3 &
 -25.8 & 32.6 \nl
00\phantom{q}51\phantom{q}53.6 & -27\phantom{q}56\phantom{q}18 & 1.15 &    6.8 &
 -23.8 & 32.2 \nl
00\phantom{q}52\phantom{q}05.5 &  00\phantom{q}35\phantom{q}38 & 0.40 &  135.3 &
 -25.3 & 32.6 \nl
00\phantom{q}52\phantom{q}45.4 & -26\phantom{q}24\phantom{q}23 & 2.22 &    5.6 &
 -25.0 & 32.6 \nl
00\phantom{q}52\phantom{q}52.4 & -28\phantom{q}25\phantom{q}55 & 1.65 &  226.6 &
 -26.1 & 34.0 \nl
00\phantom{q}54\phantom{q}04.0 & -27\phantom{q}10\phantom{q}10 & 0.69 &    7.0 &
 -23.9 & 31.8 \nl
00\phantom{q}54\phantom{q}24.9 & -25\phantom{q}24\phantom{q}00 & 1.95 &  112.5 &
 -24.7 & 33.8 \nl
00\phantom{q}54\phantom{q}41.2 &  00\phantom{q}01\phantom{q}10 & 0.65 &    4.4 &
 -25.0 & 31.5 \nl
00\phantom{q}54\phantom{q}45.4 & -38\phantom{q}44\phantom{q}15 & 3.18 &   29.0 &
 -26.9 & 33.7 \nl
00\phantom{q}55\phantom{q}19.8 & -29\phantom{q}59\phantom{q}33 & 2.10 &   40.1 &
 -25.3 & 33.5 \nl
00\phantom{q}55\phantom{q}35.1 &  01\phantom{q}40\phantom{q}35 & 0.44 &   26.8 &
 -24.2 & 32.0 \nl
00\phantom{q}55\phantom{q}42.8 & -27\phantom{q}23\phantom{q}19 & 1.54 &    9.9 &
 -25.1 & 32.6 \nl
00\phantom{q}56\phantom{q}04.3 & -26\phantom{q}52\phantom{q}57 & 1.04 &   21.7 &
 -25.2 & 32.6 \nl
00\phantom{q}58\phantom{q}01.8 &  15\phantom{q}53\phantom{q}15 & 1.26 &    6.1 &
 -26.3 & 32.2 \nl
00\phantom{q}58\phantom{q}41.2 & -39\phantom{q}08\phantom{q}42 & 1.41 &    8.6 &
 -26.8 & 32.5 \nl
00\phantom{q}59\phantom{q}17.6 &  01\phantom{q}42\phantom{q}06 & 3.15 &    6.5 &
 -27.8 & 33.0 \nl
00\phantom{q}59\phantom{q}58.1 & -39\phantom{q}35\phantom{q}56 & 2.04 &   10.2 &
 -25.7 & 32.8 \nl
01\phantom{q}00\phantom{q}12.3 & -27\phantom{q}08\phantom{q}53 & 3.52 &  210.9 &
 -27.4 & 34.6 \nl
01\phantom{q}00\phantom{q}59.8 & -28\phantom{q}51\phantom{q}15 & 0.87 &    8.8 &
 -25.4 & 32.1 \nl
01\phantom{q}02\phantom{q}00.6 & -30\phantom{q}18\phantom{q}27 & 1.03 &   78.7 &
 -26.6 & 33.2 \nl
01\phantom{q}02\phantom{q}59.8 & -27\phantom{q}23\phantom{q}43 & 1.42 &    3.8 &
 -25.2 & 32.1 \nl
01\phantom{q}03\phantom{q}29.4 &  00\phantom{q}40\phantom{q}54 & 1.44 &  117.9 &
 -25.5 & 33.6 \nl
01\phantom{q}04\phantom{q}03.5 & -29\phantom{q}43\phantom{q}53 & 1.32 &   13.1 &
 -24.1 & 32.6 \nl
01\phantom{q}09\phantom{q}28.8 & -34\phantom{q}05\phantom{q}18 & 0.83 &   26.8 &
 -23.3 & 32.5 \nl
01\phantom{q}09\phantom{q}52.0 & -35\phantom{q}25\phantom{q}56 & 2.19 &    2.8 &
 -25.0 & 32.3 \nl
01\phantom{q}11\phantom{q}08.1 & -35\phantom{q}35\phantom{q}17 & 2.36 &   15.0 &
 -26.4 & 33.1 \nl
01\phantom{q}11\phantom{q}19.5 & -33\phantom{q}08\phantom{q}22 & 2.31 &    3.1 &
 -26.0 & 32.4 \nl
01\phantom{q}15\phantom{q}47.7 & -33\phantom{q}07\phantom{q}15 & 1.91 &   80.1 &
 -24.3 & 33.7 \nl
01\phantom{q}16\phantom{q}36.9 & -34\phantom{q}57\phantom{q}01 & 1.96 &  107.5 &
 -25.7 & 33.8 \nl
01\phantom{q}22\phantom{q}04.4 & -33\phantom{q}10\phantom{q}12 & 1.11 &   17.9 &
 -26.7 & 32.6 \nl
01\phantom{q}26\phantom{q}55.8 & -32\phantom{q}08\phantom{q}10 & 2.20 &    4.5 &
 -27.5 & 32.5 \nl
01\phantom{q}27\phantom{q}44.0 & -34\phantom{q}57\phantom{q}54 & 2.16 &   18.8 &
 -26.5 & 33.2 \nl
01\phantom{q}34\phantom{q}05.1 & -39\phantom{q}32\phantom{q}15 & 1.89 &   12.1 &
 -24.8 & 32.8 \nl
01\phantom{q}34\phantom{q}38.6 & -19\phantom{q}32\phantom{q}07 & 3.13 &   47.4 &
 -28.4 & 33.9 \nl
01\phantom{q}35\phantom{q}05.7 & -07\phantom{q}20\phantom{q}29 & 1.64 &    6.8 &
 -26.1 & 32.5 \nl
01\phantom{q}35\phantom{q}35.7 & -38\phantom{q}54\phantom{q}25 & 2.08 &  182.0 &
 -25.3 & 34.1 \nl
01\phantom{q}35\phantom{q}55.5 &  00\phantom{q}39\phantom{q}24 & 1.46 &    4.7 &
 -24.2 & 32.2 \nl
01\phantom{q}42\phantom{q}54.7 & -30\phantom{q}23\phantom{q}45 & 3.12 &    5.0 &
 -28.4 & 32.9 \nl
01\phantom{q}42\phantom{q}54.8 & -38\phantom{q}56\phantom{q}46 & 2.21 &    4.0 &
 -25.6 & 32.5 \nl
01\phantom{q}52\phantom{q}27.3 & -20\phantom{q}01\phantom{q}07 & 2.15 &   26.9 &
 -27.7 & 33.3 \nl
01\phantom{q}52\phantom{q}59.1 & -01\phantom{q}29\phantom{q}40 & 2.02 &   47.7 &
 -26.8 & 33.5 \nl
01\phantom{q}57\phantom{q}08.6 &  01\phantom{q}38\phantom{q}24 & 2.13 &    4.8 &
 -26.7 & 32.5 \nl
01\phantom{q}59\phantom{q}21.0 &  19\phantom{q}00\phantom{q}32 & 2.61 &   21.9 &
 -26.1 & 33.4 \nl
02\phantom{q}16\phantom{q}12.3 & -01\phantom{q}05\phantom{q}19 & 2.15 &  144.0 &
 -27.0 & 34.0 \nl
02\phantom{q}42\phantom{q}05.2 & -23\phantom{q}44\phantom{q}53 & 2.63 &   29.5 &
 -26.4 & 33.5 \nl
02\phantom{q}42\phantom{q}40.3 &  00\phantom{q}57\phantom{q}27 & 0.57 &    8.3 &
 -25.8 & 31.7 \nl
02\phantom{q}44\phantom{q}50.5 & -22\phantom{q}16\phantom{q}01 & 2.20 &   24.0 &
 -24.9 & 33.3 \nl
02\phantom{q}45\phantom{q}47.8 & -31\phantom{q}37\phantom{q}25 & 1.88 &   13.6 &
 -26.3 & 32.9 \nl
02\phantom{q}47\phantom{q}39.1 & -00\phantom{q}52\phantom{q}22 & 2.12 &    7.9 &
 -25.0 & 32.8 \nl
02\phantom{q}48\phantom{q}06.6 & -29\phantom{q}36\phantom{q}36 & 1.86 &    3.5 &
 -25.3 & 32.3 \nl
02\phantom{q}50\phantom{q}48.6 &  00\phantom{q}02\phantom{q}08 & 0.77 &  112.7 &
 -24.1 & 33.1 \nl
02\phantom{q}51\phantom{q}46.8 &  15\phantom{q}50\phantom{q}13 & 0.49 &   30.4 &
 -23.1 & 32.1 \nl
02\phantom{q}51\phantom{q}56.2 &  00\phantom{q}57\phantom{q}06 & 0.47 &    7.5 &
 -23.4 & 31.5 \nl
02\phantom{q}56\phantom{q}58.5 &  00\phantom{q}54\phantom{q}47 & 1.11 &   13.2 &
 -24.7 & 32.4 \nl
03\phantom{q}00\phantom{q}29.8 &  02\phantom{q}40\phantom{q}50 & 0.12 &    6.8 &
 -23.0 & 30.2 \nl
03\phantom{q}01\phantom{q}38.2 &  01\phantom{q}38\phantom{q}17 & 1.58 &    8.1 &
 -25.4 & 32.5 \nl
03\phantom{q}05\phantom{q}48.9 & -02\phantom{q}40\phantom{q}13 & 1.27 &   18.6 &
 -25.6 & 32.7 \nl
03\phantom{q}10\phantom{q}02.0 & -37\phantom{q}23\phantom{q}38 & 0.40 &   15.5 &
 -24.1 & 31.6 \nl
03\phantom{q}11\phantom{q}39.8 & -40\phantom{q}08\phantom{q}42 & 1.73 &    9.5 &
 -26.1 & 32.7 \nl
03\phantom{q}16\phantom{q}31.3 &  01\phantom{q}37\phantom{q}30 & 0.96 &   11.5 &
 -24.7 & 32.3 \nl
04\phantom{q}07\phantom{q}28.8 &  17\phantom{q}50\phantom{q}52 & 1.71 &  551.6 &
 -25.4 & 34.4 \nl
04\phantom{q}22\phantom{q}41.8 &  00\phantom{q}30\phantom{q}20 & 2.92 &   20.6 &
 -27.2 & 33.4 \nl
04\phantom{q}29\phantom{q}35.5 & -22\phantom{q}41\phantom{q}03 & 0.27 &   15.8 &
 -24.1 & 31.3 \nl
04\phantom{q}38\phantom{q}48.1 & -36\phantom{q}35\phantom{q}09 & 0.38 &   10.6 &
 -24.2 & 31.4 \nl
04\phantom{q}41\phantom{q}22.6 & -27\phantom{q}08\phantom{q}20 & 0.08 &   34.8 &
 -23.0 & 30.6 \nl
04\phantom{q}43\phantom{q}14.3 & -36\phantom{q}46\phantom{q}24 & 0.68 &    4.7 &
 -25.6 & 31.6 \nl
04\phantom{q}44\phantom{q}15.2 & -30\phantom{q}04\phantom{q}52 & 2.40 &   10.1 &
 -27.4 & 33.0 \nl
04\phantom{q}49\phantom{q}21.1 &  07\phantom{q}29\phantom{q}10 & 1.46 &   61.8 &
 -27.5 & 33.3 \nl
04\phantom{q}52\phantom{q}30.1 & -29\phantom{q}53\phantom{q}35 & 0.29 &   10.0 &
 -25.1 & 31.2 \nl
05\phantom{q}04\phantom{q}55.3 & -27\phantom{q}23\phantom{q}11 & 1.14 &  183.4 &
 -26.4 & 33.6 \nl
05\phantom{q}58\phantom{q}13.5 & -36\phantom{q}19\phantom{q}48 & 2.22 &    3.1 &
 -27.0 & 32.4 \nl
06\phantom{q}06\phantom{q}07.2 & -34\phantom{q}47\phantom{q}40 & 2.28 &  280.4 &
 -26.5 & 34.4 \nl
07\phantom{q}07\phantom{q}13.2 &  64\phantom{q}35\phantom{q}59 & 0.08 &    3.2 &
 -23.1 & 29.5 \nl
07\phantom{q}51\phantom{q}00.7 &  03\phantom{q}20\phantom{q}41 & 0.10 &   12.0 &
 -23.6 & 30.3 \nl
07\phantom{q}58\phantom{q}19.8 &  42\phantom{q}19\phantom{q}35 & 0.21 &    4.0 &
 -24.1 & 30.5 \nl
08\phantom{q}15\phantom{q}20.6 &  27\phantom{q}36\phantom{q}18 & 0.91 &    6.0 &
 -27.4 & 31.9 \nl
08\phantom{q}36\phantom{q}58.9 &  44\phantom{q}26\phantom{q}02 & 0.25 &    7.9 &
 -25.3 & 30.9 \nl
08\phantom{q}38\phantom{q}40.5 &  47\phantom{q}34\phantom{q}10 & 0.70 &   29.6 &
 -23.7 & 32.4 \nl
08\phantom{q}41\phantom{q}18.0 &  35\phantom{q}44\phantom{q}38 & 1.77 &    6.7 &
 -28.7 & 32.5 \nl
08\phantom{q}42\phantom{q}15.2 &  45\phantom{q}25\phantom{q}44 & 1.41 &   75.4 &
 -26.9 & 33.4 \nl
08\phantom{q}47\phantom{q}56.4 &  31\phantom{q}47\phantom{q}58 & 1.83 &   29.0 &
 -26.8 & 33.2 \nl
08\phantom{q}48\phantom{q}47.8 &  14\phantom{q}20\phantom{q}56 & 1.69 &   44.3 &
 -26.5 & 33.3 \nl
08\phantom{q}55\phantom{q}16.1 &  56\phantom{q}16\phantom{q}56 & 0.44 &    5.6 &
 -23.3 & 31.3 \nl
08\phantom{q}56\phantom{q}58.8 &  51\phantom{q}20\phantom{q}45 & 2.31 &    8.6 &
 -25.8 & 32.9 \nl
08\phantom{q}57\phantom{q}06.3 &  19\phantom{q}08\phantom{q}54 & 0.33 &    5.2 &
 -23.8 & 31.0 \nl
09\phantom{q}06\phantom{q}03.6 &  19\phantom{q}41\phantom{q}44 & 1.21 &   17.4 &
 -27.2 & 32.6 \nl
09\phantom{q}28\phantom{q}37.9 &  60\phantom{q}25\phantom{q}21 & 0.30 &   67.8 &
 -23.1 & 32.0 \nl
09\phantom{q}29\phantom{q}58.4 & -26\phantom{q}00\phantom{q}31 & 2.15 &    2.8 &
 -27.1 & 32.3 \nl
09\phantom{q}32\phantom{q}35.0 &  21\phantom{q}58\phantom{q}30 & 2.31 &    5.9 &
 -25.4 & 32.7 \nl
09\phantom{q}38\phantom{q}57.2 &  42\phantom{q}48\phantom{q}29 & 2.04 &    6.5 &
 -26.2 & 32.6 \nl
09\phantom{q}41\phantom{q}28.8 &  44\phantom{q}47\phantom{q}43 & 0.80 &   69.3 &
 -24.6 & 32.9 \nl
09\phantom{q}47\phantom{q}04.5 &  47\phantom{q}21\phantom{q}43 & 0.54 &    4.0 &
 -24.2 & 31.3 \nl
09\phantom{q}47\phantom{q}56.0 &  53\phantom{q}50\phantom{q}01 & 0.49 &   23.1 &
 -25.2 & 32.0 \nl
09\phantom{q}48\phantom{q}35.9 &  43\phantom{q}23\phantom{q}02 & 1.89 &    2.8 &
 -26.7 & 32.2 \nl
09\phantom{q}52\phantom{q}27.2 &  50\phantom{q}48\phantom{q}51 & 1.55 &   72.3 &
 -26.7 & 33.5 \nl
09\phantom{q}55\phantom{q}38.0 &  33\phantom{q}35\phantom{q}04 & 2.50 &   34.1 &
 -28.5 & 33.5 \nl
10\phantom{q}02\phantom{q}54.6 &  32\phantom{q}40\phantom{q}39 & 0.83 &   11.5 &
 -26.6 & 32.1 \nl
10\phantom{q}17\phantom{q}03.4 &  59\phantom{q}24\phantom{q}29 & 0.85 &  340.5 &
 -25.9 & 33.6 \nl
10\phantom{q}28\phantom{q}09.6 & -26\phantom{q}44\phantom{q}18 & 2.90 &  933.8 &
 -28.3 & 35.1 \nl
10\phantom{q}38\phantom{q}08.1 &  47\phantom{q}31\phantom{q}36 & 2.96 &    8.6 &
 -25.7 & 33.1 \nl
10\phantom{q}53\phantom{q}33.4 & -27\phantom{q}39\phantom{q}07 & 0.16 &   12.9 &
 -23.8 & 30.8 \nl
11\phantom{q}03\phantom{q}25.3 & -26\phantom{q}45\phantom{q}15 & 2.15 &   15.8 &
 -28.9 & 33.1 \nl
11\phantom{q}22\phantom{q}41.5 &  30\phantom{q}35\phantom{q}35 & 1.81 &   10.4 &
 -27.7 & 32.7 \nl
11\phantom{q}27\phantom{q}36.4 &  26\phantom{q}54\phantom{q}50 & 0.38 &    3.2 &
 -24.7 & 30.9 \nl
11\phantom{q}30\phantom{q}04.8 &  41\phantom{q}16\phantom{q}19 & 0.72 &    3.4 &
 -26.0 & 31.5 \nl
11\phantom{q}33\phantom{q}14.8 &  28\phantom{q}12\phantom{q}00 & 0.51 &   12.9 &
 -24.6 & 31.8 \nl
11\phantom{q}41\phantom{q}16.1 &  21\phantom{q}56\phantom{q}22 & 0.06 &    6.1 &
 -23.0 & 29.6 \nl
11\phantom{q}48\phantom{q}00.0 &  26\phantom{q}35\phantom{q}44 & 0.87 &  351.4 &
 -25.3 & 33.7 \nl
11\phantom{q}48\phantom{q}18.8 &  31\phantom{q}54\phantom{q}11 & 0.55 &   94.7 &
 -25.0 & 32.7 \nl
11\phantom{q}52\phantom{q}27.5 &  32\phantom{q}09\phantom{q}59 & 0.37 &   41.7 &
 -23.6 & 32.0 \nl
11\phantom{q}57\phantom{q}34.7 &  73\phantom{q}10\phantom{q}37 & 0.51 &    9.5 &
 -25.7 & 31.6 \nl
12\phantom{q}02\phantom{q}43.3 &  37\phantom{q}35\phantom{q}50 & 0.50 &   16.7 &
 -24.2 & 31.9 \nl
12\phantom{q}12\phantom{q}09.4 &  46\phantom{q}23\phantom{q}46 & 2.29 &    4.8 &
 -25.6 & 32.6 \nl
12\phantom{q}17\phantom{q}21.3 &  30\phantom{q}56\phantom{q}31 & 0.31 &    8.4 &
 -24.2 & 31.1 \nl
12\phantom{q}17\phantom{q}36.6 &  51\phantom{q}55\phantom{q}11 & 2.23 &   85.2 &
 -28.6 & 33.8 \nl
12\phantom{q}19\phantom{q}43.6 &  54\phantom{q}08\phantom{q}35 & 1.66 &   45.0 &
 -26.1 & 33.3 \nl
12\phantom{q}33\phantom{q}22.9 &  47\phantom{q}38\phantom{q}43 & 2.23 &   24.3 &
 -25.0 & 33.3 \nl
12\phantom{q}37\phantom{q}14.4 &  26\phantom{q}19\phantom{q}00 & 2.20 &    3.9 &
 -23.4 & 32.5 \nl
13\phantom{q}10\phantom{q}21.1 &  47\phantom{q}34\phantom{q}03 & 3.58 &    9.2 &
 -24.2 & 33.3 \nl
13\phantom{q}11\phantom{q}04.3 &  29\phantom{q}26\phantom{q}13 & 1.82 &   10.4 &
 -27.4 & 32.8 \nl
13\phantom{q}12\phantom{q}11.0 &  48\phantom{q}09\phantom{q}25 & 0.72 &   45.0 &
 -25.4 & 32.6 \nl
13\phantom{q}18\phantom{q}01.9 &  47\phantom{q}06\phantom{q}27 & 2.59 &    2.8 &
 -27.3 & 32.5 \nl
13\phantom{q}18\phantom{q}50.9 &  26\phantom{q}41\phantom{q}42 & 1.91 &   23.1 &
 -23.8 & 33.1 \nl
13\phantom{q}19\phantom{q}13.8 &  26\phantom{q}47\phantom{q}54 & 2.26 &    8.2 &
 -25.1 & 32.8 \nl
13\phantom{q}22\phantom{q}50.7 &  47\phantom{q}39\phantom{q}37 & 1.11 &    8.1 &
 -25.0 & 32.2 \nl
13\phantom{q}36\phantom{q}02.8 &  27\phantom{q}27\phantom{q}47 & 1.12 &   75.5 &
 -24.5 & 33.2 \nl
13\phantom{q}42\phantom{q}08.3 &  27\phantom{q}09\phantom{q}23 & 1.19 &  270.8 &
 -25.0 & 33.8 \nl
13\phantom{q}44\phantom{q}25.6 &  26\phantom{q}14\phantom{q}10 & 1.18 &   11.2 &
 -24.5 & 32.4 \nl
13\phantom{q}45\phantom{q}43.8 &  26\phantom{q}25\phantom{q}07 & 2.03 &    9.5 &
 -24.6 & 32.8 \nl
13\phantom{q}45\phantom{q}44.5 &  26\phantom{q}25\phantom{q}06 & 2.03 &    9.5 &
 -25.0 & 32.8 \nl
14\phantom{q}23\phantom{q}14.3 &  50\phantom{q}55\phantom{q}39 & 0.28 &  180.5 &
 -24.3 & 32.4 \nl
14\phantom{q}43\phantom{q}00.6 &  52\phantom{q}01\phantom{q}37 & 1.57 & 2550.8 &
 -24.5 & 35.0 \nl
14\phantom{q}49\phantom{q}20.7 &  42\phantom{q}21\phantom{q}02 & 0.18 &  160.1 &
 -23.1 & 31.9 \nl
14\phantom{q}50\phantom{q}05.0 &  46\phantom{q}35\phantom{q}19 & 0.29 &    4.6 &
 -23.1 & 30.8 \nl
15\phantom{q}19\phantom{q}07.5 &  52\phantom{q}06\phantom{q}05 & 0.14 &   11.1 &
 -23.3 & 30.6 \nl
15\phantom{q}20\phantom{q}43.6 &  47\phantom{q}32\phantom{q}49 & 2.81 &   87.5 &
 -26.2 & 34.0 \nl
15\phantom{q}29\phantom{q}07.4 &  56\phantom{q}16\phantom{q}07 & 0.10 &    6.0 &
 -23.0 & 30.0 \nl
15\phantom{q}29\phantom{q}17.6 &  47\phantom{q}38\phantom{q}38 & 3.07 &   55.5 &
 -26.2 & 33.9 \nl
15\phantom{q}30\phantom{q}45.8 &  38\phantom{q}39\phantom{q}53 & 2.02 &    3.0 &
 -28.0 & 32.3 \nl
15\phantom{q}34\phantom{q}57.2 &  58\phantom{q}39\phantom{q}24 & 1.90 &  129.5 &
 -25.9 & 33.9 \nl
15\phantom{q}40\phantom{q}58.6 &  47\phantom{q}38\phantom{q}28 & 2.56 &  230.0 &
 -26.0 & 34.4 \nl
15\phantom{q}56\phantom{q}10.6 &  37\phantom{q}40\phantom{q}40 & 2.66 &    9.2 &
 -26.9 & 33.0 \nl
16\phantom{q}25\phantom{q}48.8 &  26\phantom{q}46\phantom{q}59 & 2.52 &    6.9 &
 -29.6 & 32.8 \nl
16\phantom{q}30\phantom{q}20.8 &  37\phantom{q}56\phantom{q}56 & 0.39 &   23.8 &
 -24.8 & 31.8 \nl
16\phantom{q}32\phantom{q}49.6 &  37\phantom{q}16\phantom{q}31 & 2.94 &    3.2 &
 -27.6 & 32.6 \nl
16\phantom{q}45\phantom{q}01.8 &  39\phantom{q}25\phantom{q}48 & 2.15 &    3.0 &
 -26.0 & 32.3 \nl
16\phantom{q}50\phantom{q}05.5 &  41\phantom{q}40\phantom{q}33 & 0.59 &  234.7 &
 -25.2 & 33.1 \nl
16\phantom{q}56\phantom{q}41.1 &  59\phantom{q}15\phantom{q}39 & 0.50 &   13.0 &
 -23.7 & 31.8 \nl
17\phantom{q}51\phantom{q}05.5 &  26\phantom{q}59\phantom{q}02 & 0.14 &  146.4 &
 -24.5 & 31.7 \nl
18\phantom{q}30\phantom{q}23.3 &  73\phantom{q}13\phantom{q}10 & 0.12 &    9.1 &
 -23.8 & 30.4 \nl

\enddata
\end{deluxetable}
\end{document}
