\tracingmacros=1
\begingroup
\baselineskip=13pt
\font\eightrm=cmr8
\def\hf{\hfil}
\def\Ah{\AA\hfil}
\def\cuad{\hskip 7pt\relax}    % 0.7 x \quad
\def\ccuad{\hskip 13pt\relax}
\def\E#1 {$10^#1$ }
\def\mm{\llap-}             %pone el menos pero n lo considera para centrar
\setbox3=\hbox{-}               % / inserta un espacio en blanco
\def\Menos{\hskip \wd3 \relax}  % \ del tamano de un -
\setbox5=\hbox{0}
\def\Z{\hskip\wd5\relax}
\def\matono#1 {\ifmmode #1 \else $#1$\fi}
\def\sub#1 {\matono _{\rm #1} }
\def\u#1 {\matono ^{\rm #1} }
%%%% Defi8ntion added  at CDS
\def\begtabfullwid{}\def\endtab{}
\def\tabcap#1#2{Table #1: #2 \par}
%%%%%%%%%%%%%%%%%%%%%%%%%
%
\begtabfullwid
\tabcap{4}{Atmospheric parameters for our model for Gl 588}
\vbox{ \tabskip=.5truecm plus1truecm
\halign to 16truecm
{\hf#\hf & \hf# & \hf#\hf & \hf#\hf & \hf#\hf & \hf#\hf & \hf#\hf & \hf# \cr
       \noalign{\hrule\vskip .07cm\hrule\vskip 8pt}
m& T\hf &V\sub t & $\tau$\sub{5000\AA}  & N\sub H & N\sub p & N\sub e  & h\hf\cr
       \noalign{\vskip 3pt}
(g cm\u-2 )&(K)\hf&(km/s)&              &(cm\u-3 )&(cm\u-3 )&(cm\u-3 )&(km)\hf\cr
       \noalign{\vskip 5pt\hrule\vskip 5pt}
1.286E-06 & 145000 &  2.07 & 0.00E+00 & 1.57E+09 & 1.57E+09 & 1.88E+09 & 1125\cr
1.288E-06 & 122300 &  2.07 & 5.47E-10 & 1.86E+09 & 1.86E+09 & 2.24E+09 & 1121\cr
1.290E-06 & 103100 &  2.06 & 1.20E-09 & 2.21E+09 & 2.21E+09 & 2.66E+09 & 1117\cr
1.292E-06 &  86980 &  2.06 & 1.97E-09 & 2.62E+09 & 2.62E+09 & 3.15E+09 & 1113\cr
1.295E-06 &  73360 &  2.06 & 2.88E-09 & 3.12E+09 & 3.12E+09 & 3.74E+09 & 1109\cr
1.298E-06 &  61870 &  2.05 & 3.97E-09 & 3.70E+09 & 3.70E+09 & 4.45E+09 & 1105\cr
1.303E-06 &  50000 &  2.05 & 5.62E-09 & 4.60E+09 & 4.60E+09 & 5.52E+09 & 1100\cr
1.314E-06 &  45590 &  2.04 & 9.49E-09 & 5.08E+09 & 5.08E+09 & 6.11E+09 & 1090\cr
1.333E-06 &  39700 &  2.03 & 1.61E-08 & 5.93E+09 & 5.92E+09 & 7.11E+09 & 1075\cr
1.348E-06 &  36200 &  2.02 & 2.11E-08 & 6.57E+09 & 6.56E+09 & 7.87E+09 & 1065\cr
1.373E-06 &  31250 &  2.00 & 2.96E-08 & 7.78E+09 & 7.75E+09 & 9.25E+09 & 1050\cr
1.429E-06 &  23000 &  1.98 & 4.75E-08 & 1.17E+10 & 1.14E+10 & 1.23E+10 & 1025\cr
1.513E-06 &  18000 &  1.97 & 7.04E-08 & 1.71E+10 & 1.48E+10 & 1.51E+10 & 1000\cr
1.908E-06 &  14000 &  1.97 & 1.69E-07 & 2.92E+10 & 2.25E+10 & 2.27E+10 &  926\cr
2.832E-06 &  12000 &  1.96 & 4.20E-07 & 5.24E+10 & 3.69E+10 & 3.71E+10 &  826\cr
3.946E-06 &  10830 &  1.95 & 7.51E-07 & 8.75E+10 & 4.93E+10 & 4.95E+10 &  756\cr
6.493E-06 &   9499 &  1.94 & 1.33E-06 & 2.05E+11 & 4.58E+10 & 4.61E+10 &  676\cr
1.124E-05 &   8415 &  1.93 & 1.72E-06 & 4.54E+11 & 2.64E+10 & 2.72E+10 &  611\cr
2.641E-05 &   7064 &  1.92 & 2.03E-06 & 1.32E+12 & 1.30E+10 & 1.47E+10 &  530\cr
4.552E-05 &   6330 &  1.90 & 2.18E-06 & 2.54E+12 & 9.76E+09 & 1.21E+10 &  486\cr
6.850E-05 &   5830 &  1.88 & 2.30E-06 & 4.15E+12 & 8.24E+09 & 1.04E+10 &  456\cr
1.058E-04 &   5600 &  1.82 & 2.45E-06 & 6.69E+12 & 6.26E+09 & 9.11E+09 &  426\cr
1.664E-04 &   5400 &  1.76 & 2.63E-06 & 1.09E+13 & 4.37E+09 & 8.44E+09 &  396\cr
2.541E-04 &   5200 &  1.72 & 2.86E-06 & 1.73E+13 & 3.21E+09 & 8.52E+09 &  369\cr
4.211E-04 &   5000 &  1.67 & 3.25E-06 & 2.99E+13 & 3.27E+09 & 9.51E+09 &  338\cr
7.007E-04 &   4800 &  1.65 & 3.84E-06 & 5.18E+13 & 2.30E+09 & 9.69E+09 &  308\cr
1.099E-03 &   4400 &  1.61 & 4.56E-06 & 8.85E+13 & 9.70E+08 & 1.11E+10 &  283\cr
1.804E-03 &   3956 &  1.59 & 5.82E-06 & 1.61E+14 & 4.06E+08 & 1.51E+10 &  258\cr
2.794E-03 &   3600 &  1.57 & 7.87E-06 & 2.73E+14 & 1.70E+08 & 1.96E+10 &  238\cr
7.087E-03 &   3000 &  1.53 & 2.41E-05 & 8.34E+14 & 2.76E+07 & 3.18E+10 &  201\cr
3.359E-02 &   2780 &  1.48 & 1.69E-04 & 4.83E+15 & 1.76E+05 & 3.55E+10 &  150\cr
2.310E-01 &   2700 &  1.44 & 1.35E-03 & 4.33E+16 & 1.15E+02 & 8.74E+10 &  100\cr
8.925E-01 &   2800 &  1.40 & 7.03E-03 & 1.70E+17 & 4.42E+01 & 2.62E+11 &   70\cr
2.083E+00 &   3014 &  1.37 & 2.81E-02 & 3.57E+17 & 1.07E+03 & 6.23E+11 &   50\cr
5.360E+00 &   3282 &  1.31 & 1.75E-01 & 8.14E+17 & 8.42E+04 & 1.90E+12 &   25\cr
1.242E+01 &   3550 &  1.29 & 1.00E+00 & 1.68E+18 & 3.13E+06 & 5.63E+12 &    0\cr
2.593E+01 &   3900 &  1.23 & 4.94E+00 & 3.00E+18 & 1.61E+08 & 1.57E+13 &  -25\cr
4.773E+01 &   4400 &  1.18 & 2.18E+01 & 4.46E+18 & 1.24E+10 & 4.89E+13 &  -50\cr
7.981E+01 &   4800 &  1.18 & 7.88E+01 & 6.57E+18 & 1.85E+11 & 1.22E+14 &  -75\cr
1.253E+02 &   5300 &  1.18 & 2.45E+02 & 9.03E+18 & 2.84E+12 & 3.08E+14 & -100\cr
1.866E+02 &   5852 &  1.18 & 6.56E+02 & 1.19E+19 & 3.37E+13 & 6.96E+14 & -125\cr
\noalign{\vskip 4pt\hrule\vskip 4pt}
}}
\endtab
%
\hskip.5truecm
\vfill\eject
%
\begtabfullwid
\tabcap{5}{Atmospheric parameters for our model for Gl 628}

\vbox{ \tabskip=.5truecm plus1truecm
\halign to 16truecm
{\hf#\hf & \hf# & \hf#\hf & \hf#\hf & \hf#\hf & \hf#\hf & \hf#\hf & \hf# \cr
       \noalign{\hrule\vskip .07cm\hrule\vskip 8pt}
m& T\hf &V\sub t & $\tau$\sub{5000\AA}  & N\sub H & N\sub p & N\sub e  & h\hf\cr
       \noalign{\vskip 3pt}
(g cm\u-2 )&(K)\hf&(km/s)&              &(cm\u-3 )&(cm\u-3 )&(cm\u-3 )&(km)\hf\cr
       \noalign{\vskip 5pt\hrule\vskip 5pt}
1.288E-06 & 145000 &  2.07 & 0.00E+00 & 1.57E+09 & 1.57E+09 & 1.89E+09 & 1125\cr
1.289E-06 & 122300 &  2.07 & 5.47E-10 & 1.86E+09 & 1.86E+09 & 2.24E+09 & 1121\cr
1.291E-06 & 103100 &  2.06 & 1.20E-09 & 2.21E+09 & 2.21E+09 & 2.66E+09 & 1117\cr
1.293E-06 &  86980 &  2.06 & 1.97E-09 & 2.63E+09 & 2.63E+09 & 3.16E+09 & 1113\cr
1.296E-06 &  73360 &  2.06 & 2.89E-09 & 3.12E+09 & 3.12E+09 & 3.75E+09 & 1109\cr
1.299E-06 &  61870 &  2.05 & 3.97E-09 & 3.71E+09 & 3.71E+09 & 4.45E+09 & 1105\cr
1.304E-06 &  50000 &  2.05 & 5.63E-09 & 4.60E+09 & 4.60E+09 & 5.53E+09 & 1100\cr
1.315E-06 &  45590 &  2.04 & 9.50E-09 & 5.09E+09 & 5.09E+09 & 6.11E+09 & 1090\cr
1.335E-06 &  39700 &  2.03 & 1.61E-08 & 5.93E+09 & 5.93E+09 & 7.12E+09 & 1075\cr
1.349E-06 &  36200 &  2.02 & 2.11E-08 & 6.58E+09 & 6.57E+09 & 7.88E+09 & 1065\cr
1.375E-06 &  31250 &  2.00 & 2.96E-08 & 7.79E+09 & 7.77E+09 & 9.26E+09 & 1050\cr
1.431E-06 &  23000 &  1.98 & 4.75E-08 & 1.17E+10 & 1.14E+10 & 1.23E+10 & 1025\cr
1.515E-06 &  18000 &  1.97 & 7.04E-08 & 1.72E+10 & 1.48E+10 & 1.51E+10 & 1000\cr
1.808E-06 &  14000 &  1.97 & 1.41E-07 & 2.80E+10 & 2.10E+10 & 2.11E+10 &  944\cr
2.694E-06 &  12000 &  1.96 & 3.71E-07 & 5.02E+10 & 3.46E+10 & 3.48E+10 &  844\cr
3.761E-06 &  10830 &  1.95 & 6.72E-07 & 8.39E+10 & 4.64E+10 & 4.66E+10 &  774\cr
6.203E-06 &   9499 &  1.94 & 1.19E-06 & 1.96E+11 & 4.31E+10 & 4.35E+10 &  694\cr
1.074E-05 &   8415 &  1.93 & 1.55E-06 & 4.34E+11 & 2.51E+10 & 2.58E+10 &  629\cr
2.525E-05 &   7064 &  1.92 & 1.83E-06 & 1.26E+12 & 1.24E+10 & 1.41E+10 &  548\cr
4.352E-05 &   6330 &  1.90 & 1.97E-06 & 2.43E+12 & 9.49E+09 & 1.18E+10 &  504\cr
6.549E-05 &   5830 &  1.88 & 2.08E-06 & 3.97E+12 & 8.12E+09 & 1.02E+10 &  474\cr
1.012E-04 &   5600 &  1.82 & 2.22E-06 & 6.39E+12 & 6.32E+09 & 9.08E+09 &  444\cr
1.591E-04 &   5400 &  1.76 & 2.39E-06 & 1.04E+13 & 4.40E+09 & 8.33E+09 &  414\cr
2.429E-04 &   5200 &  1.72 & 2.59E-06 & 1.66E+13 & 2.84E+09 & 8.00E+09 &  387\cr
7.240E-04 &   5000 &  1.67 & 3.90E-06 & 5.14E+13 & 5.76E+09 & 1.63E+10 &  320\cr
9.337E-04 &   4800 &  1.65 & 4.42E-06 & 6.90E+13 & 2.50E+09 & 1.25E+10 &  305\cr
1.466E-03 &   4400 &  1.61 & 5.44E-06 & 1.18E+14 & 8.92E+08 & 1.47E+10 &  280\cr
2.407E-03 &   3956 &  1.59 & 7.39E-06 & 2.15E+14 & 3.78E+08 & 2.09E+10 &  255\cr
3.727E-03 &   3600 &  1.57 & 1.08E-05 & 3.64E+14 & 1.90E+08 & 2.87E+10 &  235\cr
9.433E-03 &   3020 &  1.53 & 4.22E-05 & 1.10E+15 & 3.05E+07 & 5.23E+10 &  198\cr
4.333E-02 &   2800 &  1.48 & 3.30E-04 & 6.24E+15 & 1.09E+05 & 6.01E+10 &  148\cr
2.754E-01 &   2720 &  1.44 & 2.47E-03 & 5.14E+16 & 2.12E+02 & 1.44E+11 &  100\cr
9.679E-01 &   2936 &  1.40 & 1.14E-02 & 1.66E+17 & 4.71E+02 & 3.26E+11 &   70\cr
2.118E+00 &   3080 &  1.37 & 3.74E-02 & 3.45E+17 & 3.54E+03 & 6.88E+11 &   50\cr
5.282E+00 &   3310 &  1.31 & 1.92E-01 & 7.84E+17 & 1.29E+05 & 1.95E+12 &   25\cr
1.211E+01 &   3550 &  1.29 & 1.00E+00 & 1.63E+18 & 3.14E+06 & 5.51E+12 &    0\cr
2.527E+01 &   3900 &  1.23 & 4.78E+00 & 2.92E+18 & 1.62E+08 & 1.54E+13 &  -25\cr
4.644E+01 &   4400 &  1.18 & 2.09E+01 & 4.33E+18 & 1.24E+10 & 4.80E+13 &  -50\cr
7.756E+01 &   4800 &  1.18 & 7.55E+01 & 6.37E+18 & 1.84E+11 & 1.20E+14 &  -75\cr
1.217E+02 &   5300 &  1.18 & 2.34E+02 & 8.75E+18 & 2.83E+12 & 3.02E+14 & -100\cr
1.811E+02 &   5852 &  1.18 & 6.25E+02 & 1.16E+19 & 3.35E+13 & 6.81E+14 & -125\cr
\noalign{\vskip 4pt\hrule\vskip 4pt}
}}
\endtab
\hskip.5truecm
%\vskip15truecm
\vfill\eject
%\endgroup
%\bye
%
\endgroup
\bye
