\documentstyle{l-aa}
\begin{document}
\begin{table*}
%\hspace*{3.5cm} 
{{\bf Table 1:} H64$\alpha$ line parameters}
\vspace*{0.8mm}
\begin{center}
\vspace*{4mm}
\begin{tabular}{rr|r|r|r|r|r|r}
\hline 
\multicolumn{2}{c|}{{Position}} &
\multicolumn{1}{c|}{\bf {$T_{\rm e}^{\rm *}$}} &
\multicolumn{1}{c|}{\bf $T_{\rm L}/T_{\rm C}$} &
\multicolumn{1}{c|}{$\Delta V_{1/2}$} &
\multicolumn{1}{c|}{$V_{\rm lsr}$} &
\multicolumn{1}{c|}{$V_{\rm turb}$} &
\multicolumn{1}{c}{$\int T_{\rm L}dV$} \\ 
\multicolumn{1}{c}{$\Delta\alpha$ (${''}$)} &
\multicolumn{1}{c|}{$\Delta\delta$ (${''}$)} &
\multicolumn{1}{c|}{(10$^3$ K)} &
\multicolumn{1}{c|}{} &
\multicolumn{1}{c|}{(km s$^{-1}$)} &
\multicolumn{1}{c|}{(km s$^{-1}$)} &
\multicolumn{1}{c|}{(km s$^{-1}$)} &
\multicolumn{1}{c}{(K km s$^{-1}$)} \\ 
\hline
--60& --180&8.10$\pm$1.2&
0.240$\pm$0.040&31.00$\pm$2.0&--4.5$\pm$0.5&22.8$\pm$2.4&10.34$\pm$1.0  \\
--20& --180&8.40$\pm$1.1&
0.250$\pm$0.030&28.70$\pm$0.2&--4.7$\pm$0.2&21.1$\pm$0.4&12.16$\pm$0.6  \\ 
+20& --180&8.30$\pm$0.8&
0.285$\pm$0.028&25.50$\pm$0.5&--2.5$\pm$0.3&18.8$\pm$0.6&16.70$\pm$1.4  \\
+60& --180&8.10$\pm$0.6&
0.275$\pm$0.020&27.40$\pm$0.7&--2.7$\pm$0.2&20.1$\pm$0.8&18.83$\pm$1.5  \\
+100& --180&8.20$\pm$0.8&
0.263$\pm$0.025&26.80$\pm$0.4&--1.7$\pm$0.2&19.7$\pm$0.2&15.22$\pm$1.5  \\
+220& --180&2.50$\pm$1.0&
1.220$\pm$0.400&26.70$\pm$0.5&--3.0$\pm$0.8&19.6$\pm$0.1&9.62$\pm$2.0  \\
&&&&&&&\\
--100& --160&9.50$\pm$1.5&
0.190$\pm$0.036&32.40$\pm$1.6&0.0$\pm$1.5&30.4$\pm$2.0&12.50$\pm$1.3  \\
--80& --160&9.20$\pm$0.9&
0.210$\pm$0.020&30.50$\pm$1.0&1.0$\pm$1.0&22.4$\pm$1.2&13.81$\pm$1.2  \\
--60& --160&10.70$\pm$1.2&
0.150$\pm$0.020&29.40$\pm$0.6&0.0$\pm$0.6&29.4$\pm$0.6&9.78$\pm$1.1  \\
--40& --160&11.00$\pm$1.1&
0.160$\pm$0.020&31.50$\pm$1.5&--1.6$\pm$0.6&23.2$\pm$1.8&13.39$\pm$1.3  \\
--20& --160&9.90$\pm$1.0&
0.195$\pm$0.018&28.90$\pm$1.0&--3.1$\pm$0.4&21.2$\pm$1.3&16.10$\pm$1.5  \\
0& --160&11.30$\pm$1.0&
0.190$\pm$0.015&26.25$\pm$1.3&--3.3$\pm$0.4&19.3$\pm$1.5&16.62$\pm$1.5  \\
+20& --160&9.50$\pm$0.8&
0.220$\pm$0.013&26.65$\pm$1.4&--2.2$\pm$0.3&19.6$\pm$1.6&18.96$\pm$1.5  \\
+40& --160&10.00$\pm$0.8&
0.220$\pm$0.016&25.55$\pm$0.4&--2.7$\pm$0.3&19.5$\pm$0.4&22.10$\pm$1.9  \\
+60& --160&11.20$\pm$0.7&
0.190$\pm$0.010&26.35$\pm$0.7&--1.7$\pm$0.3&19.4$\pm$0.8&17.70$\pm$1.4  \\
+80& --160&10.60$\pm$1.0&
0.210$\pm$0.018&25.90$\pm$0.4&--2.7$\pm$0.3&19.0$\pm$0.4&20.23$\pm$1.9  \\
+100& --160&5.80$\pm$0.4&
0.345$\pm$0.010&28.75$\pm$0.6&--2.7$\pm$0.4&21.2$\pm$0.7&19.25$\pm$1.6  \\
+140& --160&5.00$\pm$0.3&
0.500$\pm$0.030&27.00$\pm$0.6&--0.7$\pm$0.4&19.9$\pm$0.7&14.75$\pm$0.9  \\
+180& --160&7.30$\pm$0.4&
0.330$\pm$0.010&26.10$\pm$0.6&--2.1$\pm$0.6&19.2$\pm$0.7&9.26$\pm$0.5  \\
+200& --160&5.20$\pm$0.8&
0.520$\pm$0.070&24.75$\pm$1.4&--3.0$\pm$0.6&18.2$\pm$1.7&8.40$\pm$1.0  \\
+220& --160&3.50$\pm$1.0&
0.700$\pm$0.300&25.50$\pm$2.5&--2.0$\pm$0.1&19.3$\pm$2.0&10.20$\pm$1.0  \\
+240& --160&1.80$\pm$1.0&
2.000$\pm$1.000&22.90$\pm$0.1&--3.9$\pm$0.7&16.9$\pm$0.2&8.68$\pm$1.0  \\
+260& --160&4.60$\pm$0.9&
0.580$\pm$0.120&25.90$\pm$0.4&--2.5$\pm$0.6&19.0$\pm$0.4&8.45$\pm$1.5  \\
&&&&&&&\\
--60& --140&6.20$\pm$0.6&
0.270$\pm$0.020&36.70$\pm$1.3&0.3$\pm$0.4&27.0$\pm$1.5&26.73$\pm$2.6  \\
--20& --140&7.50$\pm$0.3&
0.260$\pm$0.010&31.25$\pm$0.2&--0.8$\pm$0.4&23.0$\pm$0.1&37.99$\pm$1.9  \\
+20& --140&7.30$\pm$0.6&
0.300$\pm$0.020&26.40$\pm$1.1&--3.4$\pm$0.2&19.4$\pm$1.4&33.00$\pm$3.1  \\
+60& --140&7.90$\pm$0.9&
0.300$\pm$0.030&25.60$\pm$1.1&--4.0$\pm$0.3&18.8$\pm$1.3&27.03$\pm$2.4  \\
+100& --140&8.70$\pm$0.8&
0.290$\pm$0.020&23.90$\pm$1.2&--3.7$\pm$0.2&17.6$\pm$0.3&17.55$\pm$1.7  \\
+220& --140&8.50$\pm$1.3&
0.290$\pm$0.040&24.30$\pm$0.4&--1.8$\pm$0.7&17.9$\pm$0.5&9.68$\pm$1.0  \\
&&&&&&&\\
--100& --120&10.40$\pm$1.0&
0.180$\pm$0.020&28.80$\pm$0.4&--1.2$\pm$0.4&21.0$\pm$0.2&17.43$\pm$1.7  \\
--80& --120&7.50$\pm$1.0&
0.250$\pm$0.034&31.50$\pm$0.5&--1.0$\pm$0.5&23.2$\pm$0.6&27.58$\pm$2.8  \\
--60& --120&8.40$\pm$0.6&
0.200$\pm$0.013&33.30$\pm$0.5&--1.6$\pm$0.3&24.5$\pm$0.6&31.45$\pm$2.6  \\
--40& --120&9.00$\pm$0.5&
0.187$\pm$0.009&34.30$\pm$0.7&0.5$\pm$0.5&25.3$\pm$0.8&47.50$\pm$2.4  \\
--20& --120&10.50$\pm$0.5&
0.160$\pm$0.006&31.50$\pm$0.2&0.8$\pm$0.2&23.1$\pm$0.2&49.89$\pm$2.5  \\
0& --120&8.70$\pm$0.6&
0.220$\pm$0.010&30.10$\pm$0.6&--1.2$\pm$0.2&22.1$\pm$0.7&71.06$\pm$2.8  \\
+20& --120&10.10$\pm$0.4&
0.220$\pm$0.008&25.25$\pm$0.3&--2.3$\pm$0.3&18.6$\pm$0.3&53.08$\pm$2.3  \\
+40& --120&7.50$\pm$0.3&
0.316$\pm$0.012&26.00$\pm$0.4&--2.5$\pm$0.2&19.1$\pm$0.5&65.92$\pm$3.0  \\
+60& --120&8.50$\pm$0.6&
0.245$\pm$0.015&26.65$\pm$1.0&--2.8$\pm$0.2&19.6$\pm$1.3&35.25$\pm$3.1  \\
+80& --120&6.10$\pm$0.6&
0.376$\pm$0.036&27.30$\pm$0.5&--3.9$\pm$0.5&20.1$\pm$0.6&37.57$\pm$3.7  \\
+100& --120&7.80$\pm$0.7&
0.266$\pm$0.010&25.70$\pm$1.6&--4.3$\pm$1.0&18.9$\pm$2.0&21.05$\pm$2.0  \\
\hline
\end{tabular}
\end{center}
\end{table*}
%\clearpage

\begin{table*}
%\hspace*{3.5cm} 
{{\bf Table 1:} {\rm continued}}
\begin{center}
\begin{tabular}{rr|r|r|r|r|r|r}
\hline 
\multicolumn{2}{c|}{{Position}} &
\multicolumn{1}{c|}{\bf {$T_{\rm e}^{\rm *}$}} &
\multicolumn{1}{c|}{\bf $T_{\rm L}/T_{\rm C}$} &
\multicolumn{1}{c|}{$\Delta V_{1/2}$} &
\multicolumn{1}{c|}{$V_{\rm lsr}$} &
\multicolumn{1}{c|}{$V_{\rm turb}$} &
\multicolumn{1}{c}{$\int T_{\rm L}dV$} \\ 
\multicolumn{1}{c}{$\Delta\alpha$ (${''}$)} &
\multicolumn{1}{c|}{$\Delta\delta$ (${''}$)} &
\multicolumn{1}{c|}{(10$^3$ K)} &
\multicolumn{1}{c|}{} &
\multicolumn{1}{c|}{(km s$^{-1}$)} &
\multicolumn{1}{c|}{(km s$^{-1}$)} &
\multicolumn{1}{c|}{(km s$^{-1}$)} &
\multicolumn{1}{c}{(K km s$^{-1}$)} \\ 
\hline
+140&--120&7.05$\pm$0.3&
0.350$\pm$0.010&25.17$\pm$0.5&--2.8$\pm$0.3&18.5$\pm$0.6&15.11$\pm$0.9  \\
+180&--120&8.20$\pm$0.6&
0.297$\pm$0.020&24.90$\pm$0.1&--2.5$\pm$0.5&18.3$\pm$0.1&12.60$\pm$0.5  \\
+220&--120&7.80$\pm$0.7&
0.368$\pm$0.010&21.40$\pm$1.6&--2.9$\pm$0.5&15.7$\pm$2.0&8.45$\pm$0.7  \\
+260&--120&8.50$\pm$0.6&
0.336$\pm$0.020&21.10$\pm$0.5&--2.1$\pm$0.6&15.5$\pm$0.6&7.77$\pm$0.7  \\
&&&&&&&\\
--180&--100&9.60$\pm$1.2&
0.200$\pm$0.020&30.30$\pm$1.5&--5.4$\pm$1.0&22.3$\pm$2.0&11.50$\pm$1.1  \\
--140&--100&9.30$\pm$0.7&
0.233$\pm$0.015&27.30$\pm$0.5&--4.6$\pm$0.6&20.1$\pm$1.0&15.84$\pm$1.2  \\
--100&--100&9.00$\pm$0.5&
0.230$\pm$0.010&27.50$\pm$0.2&--5.2$\pm$0.3&20.2$\pm$0.2&24.34$\pm$1.2  \\
--60&--100&8.20$\pm$1.1&
0.230$\pm$0.050&30.60$\pm$0.5&--3.0$\pm$1.0&22.6$\pm$0.5&50.00$\pm$4.7  \\
--20&--100&8.70$\pm$0.5&
0.220$\pm$0.020&30.50$\pm$1.1&--1.2$\pm$0.2&22.4$\pm$1.0&82.50$\pm$6.1  \\
+20&--100&8.10$\pm$0.3&
0.290$\pm$0.010&25.40$\pm$0.2&--2.6$\pm$0.2&18.7$\pm$0.2&81.30$\pm$3.6  \\
+60&--100&9.20$\pm$0.5&
0.230$\pm$0.010&26.55$\pm$0.3&--0.9$\pm$0.2&19.5$\pm$0.3&54.50$\pm$2.6  \\
+100&--100&10.50$\pm$1.2&
0.210$\pm$0.020&26.10$\pm$2.0&--2.2$\pm$0.3&19.2$\pm$2.0&26.98$\pm$4.1  \\
&&&&&&&\\
--100&--80&7.10$\pm$0.5&
0.320$\pm$0.020&26.65$\pm$1.0&--5.8$\pm$0.3&19.6$\pm$1.3&25.84$\pm$2.2  \\
--80&--80&7.60$\pm$0.9&
0.300$\pm$0.040&26.75$\pm$0.3&--6.9$\pm$0.3&19.7$\pm$0.3&31.45$\pm$3.4  \\
--60&--80&7.50$\pm$0.6&
0.286$\pm$0.020&28.25$\pm$0.3&--6.1$\pm$0.1&20.8$\pm$0.2&57.50$\pm$5.2  \\
--40&--80&7.20$\pm$0.4&
0.306$\pm$0.016&27.30$\pm$0.4&--7.0$\pm$0.2&20.1$\pm$0.5&68.38$\pm$4.1  \\
--20&--80&7.30$\pm$0.3&
0.280$\pm$0.010&28.25$\pm$0.3&--5.0$\pm$0.2&20.8$\pm$0.3&84.11$\pm$3.2  \\
0&--80&7.80$\pm$0.7&
0.296$\pm$0.025&26.20$\pm$0.5&--6.3$\pm$0.2&19.3$\pm$0.6&81.35$\pm$7.1  \\
+20&--80&7.80$\pm$0.3&
0.280$\pm$0.010&26.00$\pm$0.2&--3.9$\pm$0.2&19.1$\pm$0.2&93.84$\pm$3.8  \\
+40&--80&8.60$\pm$0.4&
0.250$\pm$0.010&26.70$\pm$0.5&--3.3$\pm$0.2&19.6$\pm$0.6&90.86$\pm$4.0  \\
+60&--80&8.50$\pm$0.4&
0.240$\pm$0.010&27.60$\pm$0.4&--1.0$\pm$0.1&20.3$\pm$0.5&91.89$\pm$3.9  \\
+80&--80&7.30$\pm$0.4&
0.325$\pm$0.018&26.15$\pm$0.2&--0.9$\pm$0.1&19.2$\pm$0.2&102.08$\pm$5.7  \\
+100&--80&8.70$\pm$0.6&
0.246$\pm$0.016&26.05$\pm$0.6&--0.9$\pm$0.2&19.2$\pm$0.7&43.00$\pm$1.9  \\
+140&--80&8.30$\pm$0.5&
0.285$\pm$0.010&25.75$\pm$0.9&--3.0$\pm$0.3&18.9$\pm$1.0&18.32$\pm$0.6  \\
+180&--80&7.00$\pm$0.5&
0.300$\pm$0.010&29.70$\pm$1.5&--3.4$\pm$0.4&21.8$\pm$2.0&17.76$\pm$0.9  \\
+220&--80&4.40$\pm$0.5&
0.573$\pm$0.060&27.85$\pm$0.4&--1.8$\pm$0.5&20.5$\pm$0.1&14.47$\pm$1.2  \\
+260&--80&7.00$\pm$0.3&
0.355$\pm$0.010&25.00$\pm$0.5&--1.4$\pm$0.5&18.4$\pm$0.6&11.66$\pm$0.4  \\
&&&&&&&\\
--180&--60&9.20$\pm$2.0&
0.260$\pm$0.050&24.80$\pm$2.0&--4.8$\pm$0.9&18.2$\pm$2.7&8.70$\pm$1.7  \\
--140&--60&9.60$\pm$2.0&
0.238$\pm$0.050&25.65$\pm$2.0&--6.0$\pm$0.6&18.9$\pm$2.5&14.08$\pm$2.9  \\
--100&--60&8.20$\pm$1.0&
0.270$\pm$0.030&27.11$\pm$1.7&--6.9$\pm$0.6&20.0$\pm$2.0&24.28$\pm$2.8  \\
--60&--60&7.60$\pm$0.8&
0.270$\pm$0.040&28.00$\pm$0.2&--6.3$\pm$0.2&20.6$\pm$0.3&45.85$\pm$2.1  \\
--20&--60&8.40$\pm$0.8&
0.260$\pm$0.020&27.30$\pm$0.3&--6.9$\pm$0.3&20.0$\pm$0.3&88.20$\pm$2.5  \\
+20&--60&8.30$\pm$0.4&
0.250$\pm$0.010&27.80$\pm$0.2&--4.0$\pm$0.2&20.5$\pm$0.2&94.18$\pm$4.7  \\
+60&--60&7.80$\pm$0.3&
0.280$\pm$0.010&27.20$\pm$0.2&--1.4$\pm$0.2&20.0$\pm$0.3&117.84$\pm$5.1  \\
+100&--60&8.20$\pm$0.3&
0.260$\pm$0.007&27.40$\pm$0.5&0.9$\pm$0.2&20.2$\pm$0.5&77.78$\pm$2.6  \\
&&&&&&&\\
--100&--40&6.20$\pm$0.5&
0.350$\pm$0.030&28.10$\pm$0.7&--5.2$\pm$0.3&20.7$\pm$0.9&29.12$\pm$2.8  \\
--80&--40&8.00$\pm$0.7&
0.250$\pm$0.020&28.50$\pm$0.8&--4.2$\pm$0.2&21.0$\pm$0.6&35.30$\pm$2.3  \\
--60&--40&8.00$\pm$0.4&
0.230$\pm$0.010&31.90$\pm$0.4&--3.3$\pm$0.2&23.5$\pm$0.5&63.15$\pm$3.1  \\
--40&--40&8.40$\pm$0.7&
0.220$\pm$0.010&31.70$\pm$0.2&--3.4$\pm$0.2&23.3$\pm$0.3&81.20$\pm$3.6  \\
--20&--40&9.00$\pm$0.2&
0.230$\pm$0.005&27.50$\pm$0.2&--3.7$\pm$0.1&20.2$\pm$0.2&110.40$\pm$2.7  \\
0&--40&8.35$\pm$0.1&
0.260$\pm$0.005&26.40$\pm$0.3&--2.7$\pm$0.3&19.5$\pm$0.5&121.50$\pm$3.2  \\
\hline
\end{tabular}
\end{center}
\end{table*}
%\clearpage

\begin{table*}
%\hspace*{3.5cm} 
{{\bf Table 1:} {\rm continued}}
\begin{center}
\begin{tabular}{rr|r|r|r|r|r|r}
\hline 
\multicolumn{2}{c|}{{Position}} &
\multicolumn{1}{c|}{\bf {$T_{\rm e}^{\rm *}$}} &
\multicolumn{1}{c|}{\bf $T_{\rm L}/T_{\rm C}$} &
\multicolumn{1}{c|}{$\Delta V_{1/2}$} &
\multicolumn{1}{c|}{$V_{\rm lsr}$} &
\multicolumn{1}{c|}{$V_{\rm turb}$} &
\multicolumn{1}{c}{$\int T_{\rm L}dV$} \\ 
\multicolumn{1}{c}{$\Delta\alpha$ (${''}$)} &
\multicolumn{1}{c|}{$\Delta\delta$ (${''}$)} &
\multicolumn{1}{c|}{(10$^3$ K)} &
\multicolumn{1}{c|}{} &
\multicolumn{1}{c|}{(km s$^{-1}$)} &
\multicolumn{1}{c|}{(km s$^{-1}$)} &
\multicolumn{1}{c|}{(km s$^{-1}$)} &
\multicolumn{1}{c}{(K km s$^{-1}$)} \\ 
\hline
+20&--40&8.40$\pm$0.2&
0.250$\pm$0.005&27.10$\pm$0.2&--1.1$\pm$0.1&19.9$\pm$0.2&118.70$\pm$3.3  \\
+40&--40&7.60$\pm$0.3&
0.290$\pm$0.005&27.00$\pm$0.2&--0.5$\pm$0.1&19.8$\pm$0.3&123.25$\pm$5.6  \\
+60&--40&7.20$\pm$0.3&
0.300$\pm$0.010&27.10$\pm$0.2&--0.9$\pm$0.1&19.9$\pm$0.2&113.70$\pm$4.8  \\
+80&--40&7.50$\pm$0.3&
0.310$\pm$0.010&26.40$\pm$0.1&--0.4$\pm$0.1&19.4$\pm$0.1&110.50$\pm$5.3  \\
+100&--40&7.40$\pm$0.2&
0.295$\pm$0.005&26.70$\pm$0.2&0.8$\pm$0.1&19.6$\pm$0.2&105.26$\pm$3.1  \\
+120&--40&10.60$\pm$1.0&
0.190$\pm$0.020&28.20$\pm$0.1&0.4$\pm$0.1&20.7$\pm$0.2&59.63$\pm$5.6  \\
+140&--40&6.80$\pm$0.2&
0.292$\pm$0.007&30.20$\pm$0.4&--0.9$\pm$0.3&22.2$\pm$0.5&40.14$\pm$1.4  \\
+160&--40&11.60$\pm$1.2&
0.174$\pm$0.020&27.94$\pm$0.5&--3.3$\pm$0.5&20.6$\pm$0.7&22.54$\pm$2.2  \\
+180&--40&7.30$\pm$0.3&
0.286$\pm$0.005&29.80$\pm$1.0&--2.5$\pm$1.5&21.9$\pm$1.0&22.76$\pm$0.8  \\
+200&--40&7.50$\pm$0.9&
0.320$\pm$0.040&25.40$\pm$0.8&--3.5$\pm$0.4&18.7$\pm$0.7&15.90$\pm$1.0  \\
+220&--40&4.00$\pm$0.2&
0.633$\pm$0.030&28.15$\pm$0.3&--2.6$\pm$0.5&20.7$\pm$0.4&18.36$\pm$0.9  \\
+240&--40&6.90$\pm$1.0&
0.397$\pm$0.050&23.05$\pm$0.4&--0.2$\pm$0.4&17.0$\pm$0.4&13.30$\pm$2.1  \\
+260&--40&6.50$\pm$0.3&
0.378$\pm$0.010&25.50$\pm$0.6&0.2$\pm$0.5&18.8$\pm$0.7&13.07$\pm$0.6  \\
+280&--40&8.30$\pm$2.0&
0.342$\pm$0.080&21.20$\pm$0.2&2.9$\pm$0.6&15.6$\pm$0.3&7.80$\pm$1.7  \\
&&&&&&&\\
--180&--20&7.90$\pm$2.0&
0.287$\pm$0.080&26.95$\pm$1.1&--5.5$\pm$0.8&19.8$\pm$1.4&10.33$\pm$2.5  \\
--140&--20&8.70$\pm$3.0&
0.281$\pm$0.090&24.34$\pm$0.8&--4.6$\pm$0.5&17.9$\pm$1.0&16.10$\pm$6.1  \\
--100&--20&8.95$\pm$0.4&
0.220$\pm$0.020&28.55$\pm$0.3&--5.3$\pm$0.6&21.0$\pm$0.5&24.20$\pm$2.2  \\
--80&--20&&&
28.80$\pm$1.2&--4.9$\pm$0.4&&28.4$\pm$3.5  \\
--60&--20&8.6$\pm$0.2&
0.220$\pm$0.010&31.20$\pm$1.1&--3.2$\pm$0.5&22.8$\pm$1.0&77.80$\pm$7.9  \\
--40&--20&&&28.30$\pm$0.8&--2.6$\pm$0.2&&
77.70$\pm$5.3  \\
--20&--20&8.40$\pm$0.7&
0.250$\pm$0.020&27.10$\pm$0.3&--3.0$\pm$0.1&19.9$\pm$0.2&151.10$\pm$9.4  \\
0&--20&&& 26.40$\pm$0.5&--1.4$\pm$0.2&&
132.30$\pm$6.5  \\
+20&--20&7.80$\pm$0.3&
0.300$\pm$0.008&25.26$\pm$0.2&0.6$\pm$0.1&18.6$\pm$0.1&127.60$\pm$7.4  \\
+40&--20&&&27.40$\pm$0.6&1.6$\pm$0.2&&
103.20$\pm$3.5  \\
+60&--20&8.10$\pm$0.4&
0.266$\pm$0.010&27.74$\pm$0.1&0.8$\pm$0.1&20.4$\pm$0.2&94.00$\pm$6.7  \\
+80&--20&&&27.30$\pm$0.4&0.6$\pm$0.2&&
80.50$\pm$4.1  \\
+100&--20&7.60$\pm$0.2&
0.287$\pm$0.005&26.70$\pm$0.2&0.3$\pm$0.1&19.6$\pm$0.3&84.30$\pm$5.3  \\
+120&--20&8.20$\pm$0.4&
0.264$\pm$0.010&27.53$\pm$0.2&--0.1$\pm$0.1&20.2$\pm$0.3&62.83$\pm$3.1  \\
+140&--20&7.00$\pm$0.2&
0.300$\pm$0.005&28.20$\pm$0.1&--0.8$\pm$0.2&20.7$\pm$0.1&55.42$\pm$2.1  \\
+160&--20&9.00$\pm$0.8&
0.235$\pm$0.020&26.67$\pm$0.4&--2.7$\pm$0.3&19.6$\pm$0.5&30.23$\pm$2.9  \\
+180&--20&7.85$\pm$0.2&
0.290$\pm$0.010&26.50$\pm$0.2&--3.6$\pm$0.1&19.5$\pm$0.1&28.30$\pm$0.3  \\
+200&--20&6.90$\pm$0.5&
0.350$\pm$0.020&25.00$\pm$1.5&--3.3$\pm$0.1&18.0$\pm$0.9&21.56$\pm$5.3  \\
+220&--20&6.80$\pm$1.3&
0.380$\pm$0.100&25.20$\pm$0.5&--2.3$\pm$0.2&18.5$\pm$0.5&17.33$\pm$1.6  \\
+240&--20&8.30$\pm$0.7&
0.350$\pm$0.030&21.07$\pm$1.4&--0.7$\pm$0.5&15.5$\pm$2.0&10.30$\pm$2.5  \\
+260&--20&9.50$\pm$0.7&
0.290$\pm$0.020&21.10$\pm$0.6&2.1$\pm$0.4&15.5$\pm$0.7&9.09$\pm$1.6  \\
+280&--20&4.30$\pm$2.0&
0.615$\pm$0.200&22.90$\pm$1.5&2.0$\pm$0.6&16.8$\pm$1.7&7.66$\pm$3.5  \\
&&&&&&&\\
--100&0&&&28.00$\pm$0.7&--5.0$\pm$0.3&&
16.15$\pm$1.0  \\
--80&0&8.60$\pm$0.7&
0.249$\pm$0.010&27.95$\pm$0.5&--5.7$\pm$0.2&20.6$\pm$0.5&41.27$\pm$3.2  \\
--60&0&&&26.30$\pm$0.2&--4.5$\pm$0.2&&
51.36$\pm$4.5  \\
--40&0&8.40$\pm$0.3&
0.274$\pm$0.008&25.15$\pm$0.2&--3.4$\pm$0.1&18.5$\pm$0.2&130.00$\pm$5.5  \\
--20&0&&&24.75$\pm$0.2&--2.8$\pm$0.2&&
130.80$\pm$5.3  \\
0&0&8.10$\pm$0.2&
0.286$\pm$0.005&25.38$\pm$0.1&0.1$\pm$0.1&18.7$\pm$0.1&184.30$\pm$3.7  \\
+20&0&&&24.70$\pm$0.1&1.2$\pm$0.2&&
143.70$\pm$3.5  \\
\hline
\end{tabular}
\end{center}
\end{table*}
%\clearpage

\begin{table*}
%\hspace*{3.5cm} 
{{\bf Table 1:} {\rm continued}}
\begin{center}
\begin{tabular}{rr|r|r|r|r|r|r}
\hline 
\multicolumn{2}{c|}{{Position}} &
\multicolumn{1}{c|}{\bf {$T_{\rm e}^{\rm *}$}} &
\multicolumn{1}{c|}{\bf $T_{\rm L}/T_{\rm C}$} &
\multicolumn{1}{c|}{$\Delta V_{1/2}$} &
\multicolumn{1}{c|}{$V_{\rm lsr}$} &
\multicolumn{1}{c|}{$V_{\rm turb}$} &
\multicolumn{1}{c}{$\int T_{\rm L}dV$} \\ 
\multicolumn{1}{c}{$\Delta\alpha$ (${''}$)} &
\multicolumn{1}{c|}{$\Delta\delta$ (${''}$)} &
\multicolumn{1}{c|}{(10$^3$ K)} &
\multicolumn{1}{c|}{} &
\multicolumn{1}{c|}{(km s$^{-1}$)} &
\multicolumn{1}{c|}{(km s$^{-1}$)} &
\multicolumn{1}{c|}{(km s$^{-1}$)} &
\multicolumn{1}{c}{(K km s$^{-1}$)} \\ 
\hline
+40&0&8.20$\pm$0.3&
0.293$\pm$0.009&24.33$\pm$0.1&2.3$\pm$0.1&17.9$\pm$0.1&127.67$\pm$4.7  \\
+60&0&&&23.85$\pm$0.2&2.1$\pm$0.2&&94.20$\pm$3.5  \\
+80&0&7.60$\pm$0.3&
0.295$\pm$0.010&26.52$\pm$0.1&0.3$\pm$0.1&19.5$\pm$0.1&95.41$\pm$4.0  \\
+120&0&9.20$\pm$0.5&
0.224$\pm$0.010&28.80$\pm$0.4&--0.7$\pm$0.2&21.2$\pm$0.5&61.11$\pm$3.2  \\
+160&0&9.70$\pm$0.6&
0.207$\pm$0.010&28.15$\pm$0.1&--3.2$\pm$0.3&20.7$\pm$0.1&33.70$\pm$1.8  \\
+200&0&7.90$\pm$0.8&
0.300$\pm$0.030&25.54$\pm$0.6&--3.6$\pm$0.3&18.8$\pm$0.7&25.20$\pm$4.8  \\
+240&0&&
&24.35$\pm$0.5&1.7$\pm$0.4&
&
12.90$\pm$5.0  \\
+280&0&&
&25.05$\pm$0.4&1.9$\pm$0.7&
&
8.66$\pm$4.2  \\
&&&&&&&\\
--180&+20&10.70$\pm$3.0&
0.213$\pm$0.070&24.95$\pm$1.5&--6.2$\pm$0.9&18.3$\pm$2.0&8.44$\pm$3.6  \\
--140&+20&8.60$\pm$3.0&
0.221$\pm$0.100&31.40$\pm$2.5&--6.7$\pm$0.6&23.1$\pm$3.0&21.07$\pm$2.8  \\
--100&+20&10.40$\pm$0.3&
0.200$\pm$0.020&27.50$\pm$0.6&--5.8$\pm$0.3&20.2$\pm$0.8&24.80$\pm$1.3  \\
--80&+20&&
&24.40$\pm$0.5&--5.5$\pm$0.2&
&
27.52$\pm$2.2  \\
--60&+20&10.80$\pm$0.7&
0.210$\pm$0.020&24.70$\pm$0.5&--4.9$\pm$0.3&18.2$\pm$0.5&64.90$\pm$2.5  \\
--40&+20&&
&23.20$\pm$0.2&--3.8$\pm$0.1&
&
90.00$\pm$3.5  \\
--20&+20&9.15$\pm$0.2&
0.267$\pm$0.008&23.70$\pm$0.1&--2.9$\pm$0.1&17.4$\pm$0.1&171.10$\pm$6.1  \\
0&+20&&
&24.60$\pm$0.1&--1.1$\pm$0.1&
&
142.70$\pm$5.8  \\
+20&+20&7.50$\pm$0.3&
0.329$\pm$0.010&24.26$\pm$0.1&1.3$\pm$0.1&17.8$\pm$0.1&150.75$\pm$5.5  \\
+40&+20&&
&23.60$\pm$0.1&1.3$\pm$0.1&
&
109.07$\pm$3.7  \\
+60&+20&7.90$\pm$0.3&
0.328$\pm$0.010&22.97$\pm$0.3&1.7$\pm$0.1&16.9$\pm$0.4&99.66$\pm$2.9  \\
+80&+20&&
&23.90$\pm$0.1&0.9$\pm$0.2&
&
70.50$\pm$3.2  \\
+100&+20&7.30$\pm$0.7&
0.275$\pm$0.030&27.50$\pm$0.3&0.3$\pm$0.1&20.2$\pm$0.3&75.15$\pm$6.1  \\
+120&+20&7.90$\pm$0.2&
0.255$\pm$0.030&29.17$\pm$0.3&--0.9$\pm$0.2&21.5$\pm$0.4&43.56$\pm$2.1  \\
+140&+20&7.60$\pm$0.2&
0.250$\pm$0.007&30.70$\pm$0.1&--2.0$\pm$0.7&22.6$\pm$0.1&46.46$\pm$1.6  \\
+160&+20&6.00$\pm$0.3&
0.366$\pm$0.010&29.40$\pm$0.8&--4.0$\pm$0.3&21.6$\pm$0.9&37.95$\pm$1.6  \\
+180&+20&7.50$\pm$0.3&
0.290$\pm$0.010&27.50$\pm$0.2&--4.5$\pm$0.2&20.2$\pm$0.2&34.37$\pm$1.5  \\
+200&+20&5.00$\pm$0.4&
0.498$\pm$0.030&27.10$\pm$0.7&--3.8$\pm$0.4&19.9$\pm$0.9&23.98$\pm$2.2  \\
+220&+20&4.60$\pm$0.2&
0.485$\pm$0.020&29.40$\pm$0.6&0.3$\pm$0.3&21.6$\pm$0.7&24.17$\pm$0.9  \\
+240&+20&7.00$\pm$0.5&
0.343$\pm$0.020&26.05$\pm$1.0&1.8$\pm$0.5&19.2$\pm$1.3&13.96$\pm$1.1  \\
+260&+20&9.10$\pm$1.5&
0.270$\pm$0.033&24.15$\pm$2.3&3.4$\pm$0.5&17.8$\pm$2.7&12.25$\pm$1.6  \\
+280&+20&9.10$\pm$0.9&
0.246$\pm$0.020&26.60$\pm$1.4&2.4$\pm$0.8&19.6$\pm$1.7&8.17$\pm$1.2  \\
&&&&&&&\\
--100&+40&&
&27.00$\pm$0.2&--4.4$\pm$0.2&
&
21.45$\pm$2.6  \\
--80&+40&7.90$\pm$0.4&
0.291$\pm$0.010&25.52$\pm$0.2&--4.4$\pm$0.2&18.8$\pm$0.2&45.52$\pm$2.3  \\
--60&+40&&
&25.00$\pm$0.6&--4.3$\pm$0.2&
&
48.58$\pm$2.0  \\
--40&+40&8.40$\pm$0.3&
0.296$\pm$0.008&23.16$\pm$0.1&--3.3$\pm$0.1&17.0$\pm$0.1&107.85$\pm$4.6  \\
--20&+40&&
&24.00$\pm$0.1&--2.6$\pm$0.2&
&
112.67$\pm$4.7  \\
0&+40&8.60$\pm$0.3&
0.285$\pm$0.007&24.14$\pm$0.1&--1.4$\pm$0.1&17.8$\pm$0.1&154.83$\pm$3.8  \\
+20&+40&&
&24.30$\pm$0.1&--1.3$\pm$0.1&
&
127.63$\pm$2.9  \\
+40&+40&8.50$\pm$0.2&
0.298$\pm$0.007&23.24$\pm$0.1&0.3$\pm$0.1&17.1$\pm$0.2&123.72$\pm$3.0  \\
+60&+40&&
&24.00$\pm$0.1&0.2$\pm$0.1&
&
81.20$\pm$4.2  \\
+80&+40&7.10$\pm$0.2&
0.284$\pm$0.010&30.93$\pm$0.2&--1.3$\pm$0.2&22.8$\pm$0.2&53.43$\pm$1.7  \\
+120&+40&6.70$\pm$0.3&
0.332$\pm$0.010&28.00$\pm$0.1&--3.7$\pm$0.2&20.6$\pm$0.1&41.85$\pm$1.7  \\
+160&+40&6.70$\pm$0.3&
0.339$\pm$0.030&27.60$\pm$1.2&--3.2$\pm$0.3&20.3$\pm$1.4&25.51$\pm$0.8  \\
+200&+40&4.00$\pm$0.6&
0.660$\pm$0.090&26.90$\pm$0.5&1.2$\pm$0.5&19.8$\pm$0.6&14.78$\pm$2.2  \\
\hline
\end{tabular}
\end{center}
\end{table*}
%\clearpage

\begin{table*}
%\hspace*{3.5cm} 
{{\bf Table 1:} {\rm continued}}
\begin{center}
\begin{tabular}{rr|r|r|r|r|r|r}
\hline 
\multicolumn{2}{c|}{{Position}} &
\multicolumn{1}{c|}{\bf {$T_{\rm e}^{\rm *}$}} &
\multicolumn{1}{c|}{\bf $T_{\rm L}/T_{\rm C}$} &
\multicolumn{1}{c|}{$\Delta V_{1/2}$} &
\multicolumn{1}{c|}{$V_{\rm lsr}$} &
\multicolumn{1}{c|}{$V_{\rm turb}$} &
\multicolumn{1}{c}{$\int T_{\rm L}dV$} \\ 
\multicolumn{1}{c}{$\Delta\alpha$ (${''}$)} &
\multicolumn{1}{c|}{$\Delta\delta$ (${''}$)} &
\multicolumn{1}{c|}{(10$^3$ K)} &
\multicolumn{1}{c|}{} &
\multicolumn{1}{c|}{(km s$^{-1}$)} &
\multicolumn{1}{c|}{(km s$^{-1}$)} &
\multicolumn{1}{c|}{(km s$^{-1}$)} &
\multicolumn{1}{c}{(K km s$^{-1}$)} \\ 
\hline
+240&+40&4.40$\pm$1.2&
0.640$\pm$0.200&24.80$\pm$0.3&3.5$\pm$0.7&18.2$\pm$0.4&9.60$\pm$1.9  \\
+280&+40&4.40$\pm$1.2&
0.720$\pm$0.030&25.90$\pm$0.5&3.5$\pm$0.5&18.2$\pm$0.4&9.50$\pm$2.5  \\
&&&&&&&\\
--180&+60&6.40$\pm$1.0&
0.354$\pm$0.060&28.10$\pm$1.0&--4.8$\pm$0.9&20.7$\pm$1.1&11.08$\pm$6.0  \\
--140&+60&10.20$\pm$2.0&
0.222$\pm$0.040&25.50$\pm$0.4&--4.1$\pm$0.6&18.8$\pm$0.5&14.91$\pm$3.3  \\
--100&+60&9.10$\pm$0.6&
0.250$\pm$0.010&25.60$\pm$0.4&--3.5$\pm$0.&18.8$\pm$0.2&26.70$\pm$1.4  \\
--80&+60&&
&26.10$\pm$0.3&--3.9$\pm$0.4&
&
36.80$\pm$2.2  \\
--60&+60&9.35$\pm$0.2&
0.245$\pm$0.005&24.70$\pm$0.2&--4.2$\pm$0.1&18.2$\pm$0.2&57.40$\pm$4.1  \\
--40&+60&&
&24.50$\pm$0.1&--3.5$\pm$0.1&
&
78.73$\pm$3.9  \\
--20&+60&8.90$\pm$0.5&
0.270$\pm$0.020&24.00$\pm$0.2&--2.6$\pm$0.1&17.7$\pm$0.2&129.70$\pm$7.4  \\
0&+60&&
&24.50$\pm$0.1&--1.9$\pm$0.1&
&
121.50$\pm$4.7  \\
+20&+60&7.90$\pm$0.4&
0.312$\pm$0.010&24.00$\pm$0.2&--1.6$\pm$0.1&17.6$\pm$0.2&132.05$\pm$5.5  \\
+40&+60&&
&24.40$\pm$0.1&--0.9$\pm$0.1&
&
108.29$\pm$5.0  \\
+60&+60&7.30$\pm$0.4&
0.335$\pm$0.010&24.30$\pm$0.1&0.1$\pm$0.1&17.9$\pm$0.1&106.60$\pm$6.1  \\
+80&+60&&
&25.60$\pm$0.2&1.0$\pm$0.1&
&
78.18$\pm$3.6  \\
+100&+60&7.20$\pm$0.3&
0.300$\pm$0.010&27.50$\pm$0.1&--0.5$\pm$0.2&20.2$\pm$0.1&68.92$\pm$2.2  \\
+120&+60&8.30$\pm$0.4&
0.257$\pm$0.010&27.30$\pm$0.1&--2.1$\pm$0.3&20.1$\pm$0.1&45.63$\pm$2.3  \\
+140&+60&7.20$\pm$0.3&
0.300$\pm$0.010&27.10$\pm$0.3&--1.2$\pm$0.2&19.9$\pm$0.4&49.15$\pm$1.8  \\
+160&+60&8.30$\pm$0.5&
0.290$\pm$0.020&24.85$\pm$0.2&--2.1$\pm$0.2&18.3$\pm$0.2&29.52$\pm$1.9  \\
+180&+60&8.60$\pm$0.4&
0.285$\pm$0.015&23.20$\pm$0.2&--2.2$\pm$0.2&17.1$\pm$0.2&24.60$\pm$1.1  \\
+200&+60&9.10$\pm$0.4&
0.282$\pm$0.010&23.40$\pm$0.1&--1.7$\pm$0.3&17.2$\pm$0.1&17.59$\pm$0.7  \\
+220&+60&7.40$\pm$0.5&
0.377$\pm$0.020&22.10$\pm$0.7&--1.3$\pm$0.3&16.2$\pm$0.9&14.56$\pm$1.0  \\
+240&+60&8.00$\pm$0.6&
0.337$\pm$0.020&22.73$\pm$0.4&--0.7$\pm$0.5&16.7$\pm$0.5&10.22$\pm$0.7  \\
+260&+60&11.30$\pm$2.0&
0.230$\pm$0.015&21.70$\pm$0.8&1.9$\pm$0.5&16.0$\pm$0.9&8.33$\pm$1.0  \\
+280&+60&7.00$\pm$0.5&
0.350$\pm$0.020&25.75$\pm$1.3&1.8$\pm$0.8&18.9$\pm$1.5&7.14$\pm$0.4  \\
&&&&&&&\\
--100&+80&&
&25.20$\pm$0.4&--4.9$\pm$0.5&
&
20.33$\pm$1.3  \\
--80&+80&8.00$\pm$0.6&
0.299$\pm$0.020&25.44$\pm$0.8&--3.8$\pm$0.3&18.7$\pm$1.0&33.81$\pm$1.7  \\
--60&+80&&
&26.20$\pm$0.2&--4.2$\pm$0.3&
&
38.52$\pm$1.9  \\
--40&+80&8.20$\pm$0.3&
0.300$\pm$0.010&24.70$\pm$0.3&--3.6$\pm$0.1&18.2$\pm$0.4&75.20$\pm$2.6  \\
--20&+80&&
&24.80$\pm$0.1&--3.0$\pm$0.1&
&
74.77$\pm$2.0  \\
0&+80&8.20$\pm$0.2&
0.295$\pm$0.010&24.75$\pm$0.1&--2.3$\pm$0.1&18.2$\pm$0.1&119.43$\pm$3.2  \\
+20&+80&&
&25.00$\pm$0.2&--1.8$\pm$0.1&
&
93.10$\pm$2.9  \\
+40&+80&8.00$\pm$0.2&
0.293$\pm$0.008&25.43$\pm$0.1&--0.5$\pm$0.1&18.7$\pm$0.1&120.55$\pm$2.2  \\
+60&+80&&
&26.20$\pm$0.3&--1.1$\pm$0.2&
&
81.66$\pm$3.5  \\
+80&+80&7.20$\pm$0.3&
0.321$\pm$0.010&26.70$\pm$0.2&--0.3$\pm$0.4&19.6$\pm$0.3&85.03$\pm$2.2  \\
+120&+80&7.90$\pm$0.3&
0.284$\pm$0.007&26.40$\pm$0.4&--2.0$\pm$0.2&19.4$\pm$0.5&46.49$\pm$1.0  \\
+160&+80&8.90$\pm$0.5&
0.279$\pm$0.010&23.84$\pm$0.6&--1.1$\pm$0.3&17.5$\pm$0.8&22.27$\pm$0.6  \\
+200&+80&7.80$\pm$0.4&
0.293$\pm$0.010&26.75$\pm$1.0&--0.4$\pm$0.4&19.7$\pm$1.1&18.72$\pm$0.8  \\
+240&+80&5.40$\pm$0.7&
0.426$\pm$0.050&29.00$\pm$1.0&--0.4$\pm$0.6&21.3$\pm$1.2&13.14$\pm$0.5  \\
+280&+80&4.40$\pm$1.2&
0.527$\pm$0.150&30.00$\pm$3.0&--2.8$\pm$2.0&22.1$\pm$2.8&6.67$\pm$4.0  \\
&&&&&&&\\
--100&+100&7.10$\pm$1.3&
0.300$\pm$0.040&28.48$\pm$3.0&--3.1$\pm$0.7&20.9$\pm$3.5&20.76$\pm$2.6  \\
--80&+100&&
&26.50$\pm$0.4&--4.3$\pm$0.4&
&
27.13$\pm$2.1  \\
--60&+100&9.10$\pm$1.5&
0.244$\pm$0.040&26.66$\pm$0.2&--3.6$\pm$0.4&19.6$\pm$0.2&33.93$\pm$3.5  \\
--40&+100&&
&25.10$\pm$0.3&--3.0$\pm$0.2&
&
47.45$\pm$4.0  \\
\hline
\end{tabular}
\end{center}
\end{table*}
%\clearpage

\begin{table*}
%\hspace*{3.5cm} 
{{\bf Table 1:} {\rm continued}}
\begin{center}
\begin{tabular}{rr|r|r|r|r|r|r}
\hline 
\multicolumn{2}{c|}{{Position}} &
\multicolumn{1}{c|}{\bf {$T_{\rm e}^{\rm *}$}} &
\multicolumn{1}{c|}{\bf $T_{\rm L}/T_{\rm C}$} &
\multicolumn{1}{c|}{$\Delta V_{1/2}$} &
\multicolumn{1}{c|}{$V_{\rm lsr}$} &
\multicolumn{1}{c|}{$V_{\rm turb}$} &
\multicolumn{1}{c}{$\int T_{\rm L}dV$} \\ 
\multicolumn{1}{c}{$\Delta\alpha$ (${''}$)} &
\multicolumn{1}{c|}{$\Delta\delta$ (${''}$)} &
\multicolumn{1}{c|}{(10$^3$ K)} &
\multicolumn{1}{c|}{} &
\multicolumn{1}{c|}{(km s$^{-1}$)} &
\multicolumn{1}{c|}{(km s$^{-1}$)} &
\multicolumn{1}{c|}{(km s$^{-1}$)} &
\multicolumn{1}{c}{(K km s$^{-1}$)} \\ 
\hline
--20&+100&8.7$\pm$1.2&
0.266$\pm$0.040&25.66$\pm$0.3&--3.4$\pm$0.2&18.9$\pm$0.4&57.40$\pm$5.2  \\
0&+100&&
&25.90$\pm$0.2&--2.5$\pm$0.2&
&
61.23$\pm$4.6  \\
+20&+100&8.20$\pm$1.5&
0.279$\pm$0.050&26.60$\pm$1.1&--2.5$\pm$0.2&19.6$\pm$0.1&83.13$\pm$6.5  \\
+40&+100&&
&25.70$\pm$0.2&--2.6$\pm$0.2&
&
68.28$\pm$4.5  \\
+60&+100&7.60$\pm$1.1&
0.290$\pm$0.040&27.18$\pm$0.1&--1.9$\pm$0.2&20.0$\pm$0.1&83.31$\pm$8.4  \\
+80&+100&&
&25.30$\pm$0.3&--3.5$\pm$0.2&
&
52.30$\pm$5.0  \\
+100&+100&7.30$\pm$0.5&
0.323$\pm$0.020&25.00$\pm$0.3&--3.6$\pm$0.1&18.4$\pm$0.4&55.60$\pm$4.4  \\
+120&+100&8.90$\pm$0.2&
0.256$\pm$0.005&25.03$\pm$0.1&--2.5$\pm$0.2&18.4$\pm$0.1&38.92$\pm$0.8  \\
+140&+100&7.20$\pm$0.2&
0.336$\pm$0.010&24.70$\pm$0.2&--0.2$\pm$0.2&18.1$\pm$0.2&33.69$\pm$0.8  \\
+160&+100&8.60$\pm$0.2&
0.288$\pm$0.010&23.60$\pm$0.4&--0.2$\pm$0.3&17.3$\pm$0.4&22.62$\pm$0.5  \\
+180&+100&7.40$\pm$0.5&
0.340$\pm$0.020&23.60$\pm$0.2&0.6$\pm$0.2&17.4$\pm$0.2&19.68$\pm$0.6  \\
+200&+100&8.40$\pm$0.3&
0.286$\pm$0.010&23.95$\pm$0.3&1.9$\pm$0.4&17.6$\pm$0.3&13.56$\pm$0.3  \\
+220&+100&8.10$\pm$0.5&
0.327$\pm$0.020&23.00$\pm$0.4&1.3$\pm$0.2&16.9$\pm$0.4&13.32$\pm$0.3  \\
+240&+100&5.40$\pm$0.5&
0.463$\pm$0.040&26.50$\pm$0.6&2.2$\pm$0.6&19.5$\pm$0.7&12.48$\pm$1.2  \\
+260&+100&9.00$\pm$1.2&
0.300$\pm$0.030&22.10$\pm$2.0&1.8$\pm$0.5&16.3$\pm$2.0&7.43$\pm$0.7  \\
+280&+100&4.70$\pm$2.0&
0.660$\pm$0.300&21.80$\pm$1.3&3.3$\pm$1.0&16.1$\pm$1.6&4.72$\pm$2.3  \\
&&&&&&&\\
--100&+120&&
&25.80$\pm$0.4&--6.0$\pm$0.5&
&
16.87$\pm$2.0  \\
--80&+120&7.70$\pm$1.0&
0.288$\pm$0.040&27.00$\pm$0.1&--4.9$\pm$0.3&19.9$\pm$0.1&27.63$\pm$3.1  \\
--60&+120&&
&26.60$\pm$0.5&--4.5$\pm$0.3&
&
28.93$\pm$3.5  \\
--40&+120&9.00$\pm$0.5&
0.259$\pm$0.010&25.60$\pm$0.7&--4.1$\pm$0.2&18.8$\pm$0.9&41.44$\pm$2.7  \\
--20&+120&&
&25.80$\pm$0.2&--4.0$\pm$0.2&
&
46.30$\pm$2.9  \\
0&+120&7.80$\pm$0.3&
0.293$\pm$0.010&26.10$\pm$0.24&--3.9$\pm$0.2&19.2$\pm$0.3&64.09$\pm$2.9  \\
+20&+120&&
&26.00$\pm$0.1&--3.8$\pm$0.2&
&
54.90$\pm$5.0  \\
+40&+120&7.30$\pm$0.3&
0.319$\pm$0.010&26.35$\pm$0.6&--5.0$\pm$1.0&19.4$\pm$0.7&70.91$\pm$3.3  \\
+60&+120&&
&25.20$\pm$0.3&--3.7$\pm$0.2&
&
50.42$\pm$4.1  \\
+80&+120&7.20$\pm$0.4&
0.335$\pm$0.010&25.72$\pm$0.4&--4.0$\pm$0.2&18.9$\pm$0.5&57.10$\pm$4.0  \\
+120&+120&7.70$\pm$0.2&
0.306$\pm$0.010&24.70$\pm$0.1&--0.8$\pm$0.2&18.2$\pm$0.1&31.71$\pm$1.2  \\
+160&+120&8.40$\pm$0.4&
0.291$\pm$0.010&24.80$\pm$0.8&1.3$\pm$0.3&18.2$\pm$1.0&20.75$\pm$0.5  \\
+200&+120&10.00$\pm$1.5&
0.237$\pm$0.050&24.55$\pm$0.3&2.5$\pm$0.5&18.1$\pm$0.3&11.43$\pm$1.3  \\
+240&+120&12.00$\pm$2.0&
0.203$\pm$0.030&23.60$\pm$0.9&2.4$\pm$0.8&17.4$\pm$1.1&6.16$\pm$2.0  \\
+280&+120&10.00$\pm$1.2&
0.180$\pm$0.030&23.53$\pm$1.5&2.4$\pm$1.8&23.5$\pm$1.5&4.68$\pm$1.3  \\
&&&&&&&\\
--100&+140&5.40$\pm$1.8&
0.400$\pm$0.100&30.90$\pm$0.1&--2.1$\pm$1.0&22.7$\pm$0.1&16.95$\pm$6.5  \\
--80&+140&&
&25.20$\pm$0.6&--5.6$\pm$0.6&
&
18.98$\pm$6.2  \\
--60&+140&6.30$\pm$1.7&
0.373$\pm$0.100&27.17$\pm$1.0&--3.7$\pm$0.7&20.0$\pm$1.2&22.65$\pm$5.6  \\
--40&+140&&
&26.70$\pm$0.4&--4.4$\pm$0.3&
&
33.43$\pm$6.9  \\
--20&+140&7.20$\pm$1.8&
0.310$\pm$0.100&27.70$\pm$0.2&--4.1$\pm$0.5&20.4$\pm$0.2&29.86$\pm$5.5  \\
0&+140&&
&26.80$\pm$0.2&--4.9$\pm$0.3&
&
36.80$\pm$3.3  \\
+20&+140&7.00$\pm$1.6&
0.325$\pm$0.100&26.50$\pm$0.2&--4.9$\pm$0.4&19.5$\pm$0.2&37.75$\pm$4.7  \\
+40&+140&&
&24.90$\pm$0.2&--4.6$\pm$0.2&
&
36.25$\pm$4.0  \\
+60&+140&7.50$\pm$2.0&
0.305$\pm$0.100&25.42$\pm$0.2&--3.4$\pm$0.3&18.7$\pm$0.2&37.06$\pm$7.5  \\
+80&+140&&
&24.50$\pm$0.5&--4.0$\pm$0.4&
&
28.20$\pm$4.5  \\
+100&+140&7.80$\pm$0.4&
0.296$\pm$0.016&24.80$\pm$0.2&--0.9$\pm$0.2&18.3$\pm$0.2&31.68$\pm$2.6  \\
\hline
\end{tabular}
\end{center}
\end{table*}
%*\clearpage

\begin{table*}
%\hspace*{3.5cm} 
{{\bf Table 1:} {\rm continued}}
\vspace*{0.8mm}
\begin{center}
\vspace*{4mm}
\begin{tabular}{rr|r|r|r|r|r|r}
\hline 
\multicolumn{2}{c|}{{Position}} &
\multicolumn{1}{c|}{\bf {$T_{\rm e}^{\rm *}$}} &
\multicolumn{1}{c|}{\bf $T_{\rm L}/T_{\rm C}$} &
\multicolumn{1}{c|}{$\Delta V_{1/2}$} &
\multicolumn{1}{c|}{$V_{\rm lsr}$} &
\multicolumn{1}{c|}{$V_{\rm turb}$} &
\multicolumn{1}{c}{$\int T_{\rm L}dV$} \\ 
\multicolumn{1}{c}{$\Delta\alpha$ (${''}$)} &
\multicolumn{1}{c|}{$\Delta\delta$ (${''}$)} &
\multicolumn{1}{c|}{(10$^3$ K)} &
\multicolumn{1}{c|}{} &
\multicolumn{1}{c|}{(km s$^{-1}$)} &
\multicolumn{1}{c|}{(km s$^{-1}$)} &
\multicolumn{1}{c|}{(km s$^{-1}$)} &
\multicolumn{1}{c}{(K km s$^{-1}$)} \\ 
\hline
+120&+140&7.40$\pm$0.2&0.319$\pm$0.030&26.40$\pm$0.2&0.7$\pm$0.3&19.4$\pm$0.2&22.39$\pm$1.0  \\
+140&+140&9.10$\pm$0.4&0.250$\pm$0.010&24.70$\pm$0.5&0.7$\pm$0.2&18.2$\pm$0.6&19.21$\pm$0.9  \\
+160&+140&7.00$\pm$0.2&0.342$\pm$0.005&25.10$\pm$0.1&2.2$\pm$0.4&18.4$\pm$0.1&16.65$\pm$0.8  \\
+180&+140&8.10$\pm$0.8&0.280$\pm$0.024&26.40$\pm$0.6&2.1$\pm$0.4&19.4$\pm$0.7&14.90$\pm$1.1  \\
+200&+140&7.30$\pm$0.4&0.321$\pm$0.010&26.70$\pm$0.6&4.6$\pm$0.5&19.6$\pm$0.7&12.68$\pm$0.7  \\
+220&+140&7.70$\pm$0.5&0.260$\pm$0.015&30.30$\pm$0.3&2.0$\pm$1.0&22.3$\pm$0.4&9.44$\pm$1.0  \\
+240&+140&5.70$\pm$0.4&0.354$\pm$0.020&32.15$\pm$0.5&4.1$\pm$1.0&23.6$\pm$0.7&7.80$\pm$0.5  \\
+260&+140&10.10$\pm$3.0&0.214$\pm$0.030&26.60$\pm$3.0&0.6$\pm$2.0&19.6$\pm$4.0&3.29$\pm$1.0  \\
+280&+140&5.00$\pm$0.6&0.404$\pm$0.004&33.20$\pm$0.2&4.0$\pm$2.0&24.4$\pm$0.1&5.07$\pm$0.5  \\
\hline
\end{tabular}
\end{center}
\end{table*}
%*\clearpage
%
\end{document}
