\documentstyle[12pt]{article}
\newcommand{\kms}{km $s^{-1}$}
\begin{document}
\footnotesize
\begin{table}

{\bf Appendix: Basic Data}
\begin{flushleft}

\vspace{0.3cm}

\begin{center}
\begin{tabular}{lllllllll} 
\hline\noalign{\smallskip}
Star & Period & $\pi$ & $\sigma$  & $\mu_{\alpha}cos(\delta)$ & $\sigma$ &  $\mu_{\delta}$ &  $\sigma$ & $V_J$ \\
K  & Ref & E(B-V) & Ref & $V_r$ & $\sigma$ & Ref & [Fe/H] & Ref \\
\hline
  SW And     &  0.442279 &   -0.04 &   1.50 &    -5.09 &   1.49 &   -19.21 &   1.00 &     9.71 \\
  8.54 &  1 &    0.045 &  1 &     -21 &   1 &    4,7,9,10,13     &  -0.24 &    1,2,3,4,5,6     \\
  XX And     &  0.722742 &    1.50 &   2.15 &    58.97 &   1.64 &   -35.46 &   1.47 &    10.68 \\
  9.51 &  2 &    0.060 &  1 &       0 &   1 &    13,14           &  -1.94 &    1,6             \\
  AT And     &  0.616913 &   -2.70 &   2.43 &    -7.05 &   1.70 &   -50.29 &   1.79 &    10.71 \\
  9.06 &  2 &    0.135 &  1 &    -228 &   1 &    9,10,11         &  -1.18 &    1,2,3           \\
  CI And     &  0.484718 &   -6.34 &   4.66 &    -0.35 &   3.63 &    -3.98 &   2.41 &    12.28 \\
      &    &    0.090 &  1 &      24 &   5 &    10,13           &  -0.69 &    2,6             \\
  WY Ant     &  0.574312 &    0.00 &   1.67 &    35.64 &   1.56 &   -48.74 &   1.56 &    10.87 \\
  9.64 &  1 &    0.060 &  1 &     204 &   1 &    1,13,15         &  -1.48 &    6,13            \\
  TY Aps     &  0.501692 &    0.48 &   2.47 &   -35.44 &   1.75 &     8.18 &   2.13 &    11.85 \\
 10.18 &  3 &    0.220 &  2 &      88 &   5 &    9,13,16         &  -0.95 &    3,6,14          \\
  XZ Aps     &  0.587277 &    0.71 &   3.03 &   -17.67 &   2.29 &     9.04 &   2.99 &    12.38 \\
      &    &    0.120 &  1 &     202 &   1 &    9,13            &  -1.06 &    3,6             \\
  SW Aqr     &  0.459303 &    1.15 &   2.46 &   -42.05 &   2.63 &   -58.87 &   1.96 &    11.18 \\
 10.08 &  2 &    0.090 &  1 &     -50 &   7 &    13,16           &  -1.63 &    1,6,14          \\
  SX Aqr     &  0.535714 &   -0.53 &   2.97 &   -39.84 &   3.94 &   -47.04 &   2.11 &    11.78 \\
 10.57 &  2 &    0.060 &  1 &    -165 &   3 &    11,13,16,17     &  -1.87 &    6,9,14          \\
  BR Aqr     &  0.481878 &   -4.01 &   2.38 &     5.57 &   2.42 &    -9.17 &   1.68 &    11.42 \\
 10.37 &  3 &    0.015 &  1 &      30 &   1 &    10,13           &  -0.74 &    2,6,9,12        \\
  BV Aqr     &  0.364414 &    3.74 &   2.13 &    -0.25 &   2.10 &   -21.13 &   1.38 &    10.90 \\
      &    &    0.015 &  1 &    -239 &   3 &    9               &  -1.42 &    3,7             \\
  DN Aqr     &  0.633763 &    4.20 &   2.08 &    50.29 &   2.68 &   -12.83 &   1.64 &    11.20 \\
  9.91 &  2 &    0.015 &  1 &    -220 &   6 &    13,16           &  -1.66 &    6,14            \\
  V341 Aql   &  0.578021 &    7.73 &   5.82 &    34.86 &   7.36 &   -25.02 &   5.42 &    10.85 \\
  9.72 &  2 &    0.105 &  1 &     -79 &   2 &    11,13           &  -1.22 &    1,6             \\
  S Ara      &  0.451888 &    0.51 &   2.15 &   -26.24 &   2.29 &    -8.44 &   1.24 &    10.78 \\
  9.55 &  3 &    0.110 &  2 &     185 &  10 &    15              &  -0.71 &    13              \\
  MS Ara     &  0.524958 &   10.00 &   3.95 &    -2.88 &   4.82 &   -37.39 &   2.93 &    12.07 \\
      &    &    0.120 &  1 &     101 &  14 &    13              &  -1.48 &    6               \\
  X Ari      &  0.651139 &    0.89 &   1.55 &    66.42 &   1.94 &   -88.06 &   1.73 &     9.57 \\
  7.95 &  1 &    0.180 &  1 &     -36 &   1 &    5,13,14         &  -2.43 &    1,4,5,6         \\
  TZ Aur     &  0.391675 &   -1.81 &   3.57 &   -12.47 &   5.18 &    -8.63 &   2.90 &    11.91 \\
 11.07 &  2 &    0.075 &  1 &      45 &   2 &    11,13,18        &  -0.79 &    1,6             \\
  RS Boo     &  0.377337 &    0.77 &   1.57 &     6.56 &   1.32 &     1.06 &   1.13 &    10.37 \\
  9.45 &  1 &    0.015 &  1 &      -7 &   1 &    5,9,10,13,14    &  -0.36 &    1,2,3,4,6,10,12 \\
  ST Boo     &  0.622291 &    0.47 &   1.75 &   -15.87 &   1.32 &   -12.54 &   1.47 &    11.01 \\
  9.82 &  2 &    0.015 &  1 &      13 &   1 &    11,13           &  -1.76 &    5,6,10,11,12    \\
  TV Boo 'c' &  0.312559 &   -0.50 &   1.60 &    -5.80 &   1.33 &   -34.93 &   1.29 &    10.97 \\
 10.22 &  1 &    0.015 &  1 &     -98 &  10 &    4,11            &  -2.44 &    1,7             \\
  TW Boo     &  0.532273 &   -0.52 &   1.77 &    -3.29 &   1.50 &   -54.98 &   1.64 &    11.29 \\
 10.09 &  2 &    0.015 &  1 &     -99 &   1 &    11,13           &  -1.46 &    6,10,11         \\
  UY Boo     &  0.650845 &    2.06 &   1.92 &     2.32 &   1.56 &   -46.73 &   1.15 &    10.94 \\
  9.79 &  2 &    0.015 &  1 &     145 &   2 &    10,13           &  -2.56 &    1,6,12          \\
  AE Boo 'c' &  0.314896 &    1.38 &   1.86 &   -25.63 &   1.68 &   -38.34 &   1.44 &    10.65 \\
  9.71 &  3 &    0.015 &  1 &      79 &   1 &    9,10            &  -1.39 &    2,3,7           \\
  UY Cam 'c' &  0.267042 &   -1.64 &   2.08 &    -3.03 &   1.48 &   -16.65 &   1.90 &    11.53 \\
      &    &    0.030 &  1 &     -46 &   3 &    10              &  -1.33 &    2,7             \\
\hline\noalign{\smallskip}
\end{tabular}
\end{center}
\end{flushleft}
\end{table}

\begin{table}

{\bf Appendix: Basic Data (cont)}
\begin{flushleft}

\vspace{0.3cm}

\begin{center}
\begin{tabular}{lllllllll} 
\hline\noalign{\smallskip}
Star & Period & $\pi$ & $\sigma$  & $\mu_{\alpha}cos(\delta)$ & $\sigma$ &  $\mu_{\delta}$ &  $\sigma$ & $V_J$ \\
K  & Ref & E(B-V) & Ref & $V_r$ & $\sigma$ & Ref & [Fe/H] & Ref \\
\hline
  RV CrB 'c' &  0.331593 &   -0.26 &   2.02 &   -22.25 &   1.43 &   -27.43 &   1.87 &    11.41 \\
 10.49 &  2 &    0.015 &  1 &    -125 &   5 &    11              &  -1.69 &    7               \\
  TV CrB     &  0.584611 &   -1.67 &   3.49 &    -2.44 &   3.40 &    -3.62 &   3.59 &    11.87 \\
 10.73 &  3 &    0.030 &  1 &    -126 &   7 &    9,13            &  -2.33 &    6               \\
  W Crt      &  0.412013 &   -0.27 &   2.62 &   -22.26 &   2.52 &    -8.02 &   1.78 &    11.54 \\
 10.56 &  1 &    0.030 &  1 &      60 &   1 &    1,13,16         &  -0.54 &    1,6,14          \\
  X Crt      &  0.732833 &   -0.31 &   2.58 &    -1.17 &   2.07 &   -41.63 &   1.58 &    11.48 \\
 10.19 &  2 &    0.015 &  1 &      80 &   2 &    11,13,16        &  -2.00 &    6,10,14         \\
  UY Cyg     &  0.560705 &    0.42 &   2.06 &    -3.73 &   1.43 &   -11.33 &   1.56 &    11.11 \\
  9.73 &  2 &    0.090 &  2 &       3 &  10 &    11              &  -0.80 &    1               \\
  XZ Cyg     &  0.466579 &    2.28 &   0.86 &    83.51 &   1.00 &   -24.17 &   0.92 &     9.68 \\
  8.80 &  2 &    0.105 &  1 &    -162 &   7 &    12,13           &  -1.44 &    1,4,6           \\
  DX Del     &  0.472617 &    1.55 &   1.54 &    14.75 &   1.56 &     8.69 &   0.97 &     9.94 \\
  8.71 &  1 &    0.090 &  1 &     -52 &   3 &    3,9,13          &  -0.39 &    1,3,4,6         \\
  RW Dra     &  0.442898 &    1.80 &   2.04 &   -11.75 &   3.56 &    -5.08 &   3.29 &    11.71 \\
 10.69 &  2 &    0.015 &  1 &    -112 &   1 &    12,13           &  -1.55 &    1,6,11          \\
  SU Dra     &  0.660419 &    1.11 &   1.15 &   -46.30 &   0.97 &   -77.87 &   1.01 &     9.78 \\
  8.68 &  1 &    0.030 &  1 &    -167 &   1 &    4,9,10,13       &  -1.80 &    1,2,3,4,6,10    \\
  SW Dra     &  0.569670 &    0.21 &   1.15 &   -25.59 &   1.04 &    -8.81 &   0.98 &    10.48 \\
  9.33 &  1 &    0.015 &  1 &     -29 &   1 &    5,7,9,10,11,13  &  -1.12 &    1,2,3,6,11,12   \\
  XZ Dra     &  0.476494 &    2.00 &   0.97 &    11.89 &   1.01 &     4.84 &   1.19 &    10.25 \\
  9.19 &  2 &    0.090 &  1 &     -30 &   1 &    13,14           &  -0.79 &    1,4,6           \\
  BC Dra     &  0.719576 &    1.68 &   1.57 &   -17.33 &   1.48 &    34.36 &   1.80 &    11.60 \\
   &   &    0.060 &  1 &    -141 &   2 &    9,13            &  -2.00 &    6               \\
  BK Dra     &  0.592081 &    1.31 &   1.36 &   -16.09 &   1.05 &    29.97 &   1.38 &    11.19 \\
   &   &    0.090 &  1 &     -77 &  12 &    10,13           &  -1.95 &    2,6,11          \\
  BT Dra     &  0.588673 &    1.88 &   1.60 &     2.35 &   1.71 &   -32.09 &   1.86 &    11.64 \\
   &   &    0.015 &  1 &    -164 &   2 &    10,13           &  -1.75 &    6,11            \\
  RX Eri     &  0.587246 &    1.08 &   1.29 &   -15.63 &   1.16 &   -11.15 &   1.04 &     9.69 \\
  8.42 &  1 &    0.030 &  1 &      67 &   1 &    4,6,13,15       &  -1.33 &    1,6,13          \\
  SV Eri     &  0.713863 &    1.22 &   1.77 &    12.48 &   1.79 &   -51.10 &   1.95 &     9.96 \\
  8.69 &  2 &    0.060 &  1 &     -14 &   4 &    13,16,18        &  -1.70 &    1,4,6,14        \\
  BB Eri     &  0.569896 &    2.66 &   3.03 &    31.74 &   2.52 &    -1.71 &   2.44 &    11.52 \\
   &   &    0.015 &  1 &     247 &   2 &    10,13,18        &  -1.32 &    1,2,6           \\
  CS Eri 'c' &  0.311333 &    3.25 &   0.97 &    95.42 &   0.87 &     6.92 &   0.85 &     9.00 \\
   &   &    0.015 &  1 &    -147 &  10 &    9               &  -1.41 &    3               \\
  SS For     &  0.495432 &    3.56 &   1.44 &    28.42 &   1.22 &   -71.48 &   1.14 &    10.19 \\
  9.22 &  2 &    0.015 &  1 &    -113 &   1 &    7,13,16,17      &  -0.94 &    6,14            \\
  SX For     &  0.605333 &   -1.23 &   1.89 &    35.33 &   1.62 &    -9.95 &   1.73 &    11.12 \\
   &   &    0.015 &  1 &     230 &   3 &    13,16,17        &  -1.66 &    6,14            \\
  RR Gem     &  0.397316 &   -4.98 &   2.83 &    -1.24 &   3.80 &     0.67 &   2.07 &    11.38 \\
 10.26 &  1 &    0.075 &  1 &      64 &   1 &    4,11,13         &  -0.29 &    1,6,12          \\
  SZ Gem     &  0.501136 &    2.62 &   3.25 &   -10.89 &   3.19 &   -27.66 &   2.13 &    11.75 \\
 10.71 &  2 &    0.030 &  1 &     326 &   4 &    10,11,12,13     &  -1.46 &    2,6,10          \\
  TW Her     &  0.399601 &    0.60 &   1.64 &     3.10 &   1.42 &     1.16 &   1.43 &    11.28 \\
 10.22 &  1 &    0.060 &  1 &      -5 &   1 &    5,13            &  -0.69 &    1,6             \\
  VX Her     &  0.455373 &    0.47 &   1.82 &   -54.20 &   1.76 &    18.03 &   1.57 &    10.69 \\
  9.62 &  2 &    0.060 &  1 &    -377 &   3 &    14              &  -1.58 &    1,5,11,12       \\
\hline\noalign{\smallskip}
\end{tabular}
\end{center}
\end{flushleft}
\end{table}
\begin{table}

{\bf Appendix: Basic Data (cont)}
\begin{flushleft}

\vspace{0.3cm}

\begin{center}
\begin{tabular}{lllllllll} 
\hline\noalign{\smallskip}
Star & Period & $\pi$ & $\sigma$  & $\mu_{\alpha}cos(\delta)$ & $\sigma$ &  $\mu_{\delta}$ &  $\sigma$ & $V_J$ \\
K  & Ref & E(B-V) & Ref & $V_r$ & $\sigma$ & Ref & [Fe/H] & Ref \\
\hline
  VZ Her     &  0.440326 &    1.84 &   1.77 &   -19.42 &   1.53 &   -16.44 &   1.68 &    11.48 \\
 10.60 &  2 &    0.030 &  1 &    -115 &   1 &    11,13           &  -1.02 &    1,6             \\
  AR Her     &  0.469970 &    1.24 &   1.68 &   -61.70 &   1.80 &    14.86 &   2.18 &    11.24 \\
 10.25 &  2 &    0.015 &  1 &    -350 &  10 &    11              &  -1.30 &    9               \\
  SV Hya     &  0.478544 &    5.57 &   2.06 &   -36.23 &   1.78 &    12.97 &   1.59 &    10.53 \\
  9.45 &  2 &    0.090 &  1 &     107 &   2 &    12,13,16        &  -1.50 &    6,14            \\
  WZ Hya     &  0.537723 &    2.90 &   2.46 &    -8.69 &   2.82 &   -14.78 &   1.79 &    10.90 \\
  9.65 &  2 &    0.060 &  1 &     304 &   1 &    11,13           &  -1.39 &    6,10            \\
  DD Hya     &  0.501818 &   -1.50 &   4.50 &     1.65 &   5.91 &    -6.65 &   3.75 &    12.22 \\
   &   &    0.030 &  1 &     156 &   1 &    10,13           &  -0.97 &    2,6             \\
  IK Hya     &  0.650327 &    2.35 &   1.40 &   -61.98 &   1.33 &   -51.51 &   0.84 &    10.11 \\
   &   &    0.090 &  1 &     258 &  15 &    9               &  -1.24 &    3               \\
  V Ind      &  0.479591 &    1.50 &   1.59 &   -71.47 &   1.46 &   -83.42 &   0.96 &     9.96 \\
   &   &    0.015 &  1 &     202 &   2 &    8,13,16,17      &  -1.50 &    6,14            \\
  RR Leo     &  0.452387 &   -0.54 &   2.18 &   -16.97 &   2.51 &    -9.34 &   1.52 &    10.73 \\
  9.70 &  1 &    0.015 &  1 &      88 &   1 &    4,11,13         &  -1.60 &    1,4,6,10        \\
  SS Leo     &  0.626343 &    1.12 &   2.25 &   -24.48 &   2.12 &   -25.00 &   1.68 &    11.03 \\
  9.97 &  1 &    0.015 &  1 &     163 &   2 &    2,6,11,13       &  -1.79 &    1,6             \\
  ST Leo     &  0.477984 &   -2.33 &   2.75 &   -11.23 &   3.05 &   -38.21 &   2.07 &    11.49 \\
 10.46 &  2 &    0.015 &  1 &     168 &   8 &    10,13           &  -1.17 &    1,2,6           \\
  AX Leo     &  0.726828 &    7.89 &   5.37 &   -26.49 &   6.74 &   -27.13 &   4.81 &    12.26 \\
 10.91 &  3 &    0.015 &  1 &     193 &   6 &    10,13           &  -1.72 &    2,6             \\
  BX Leo 'c' &  0.362772 &    2.79 &   3.23 &   -24.23 &   3.80 &   -15.50 &   2.87 &    11.61 \\
 10.67 &  3 &    0.015 &  1 &      26 &   5 &    9,10            &  -1.28 &    2,7             \\
   U Lep     &  0.581474 &    3.16 &   1.90 &    41.43 &   1.25 &   -61.32 &   1.63 &    10.57 \\
  9.49 &  2 &    0.015 &  1 &     125 &   2 &    13,16           &  -1.78 &    1,6,14          \\
  VY Lib     &  0.533938 &   -0.46 &   3.15 &     0.86 &   3.43 &   -49.60 &   2.66 &    11.73 \\
   &   &    0.135 &  1 &     151 &   6 &    13,16           &  -1.34 &    6,11,14         \\
  CG Lib 'c' &  0.306789 &   -5.76 &   3.38 &   -61.15 &   4.19 &   -25.49 &   3.12 &    11.55 \\
   &   &    0.135 &  1 &    -179 &  10 &    16              &  -1.19 &    7,14            \\
  FW Lup     &  0.484171 &    2.62 &   1.31 &    -6.22 &   1.13 &   -16.05 &   1.05 &     9.06 \\
  7.69 &  3 &    0.090 &  2 &       3 &   3 &    9               &  -0.20 &    3               \\
  TT Lyn     &  0.597438 &   -2.06 &   1.67 &   -81.96 &   1.57 &   -41.83 &   0.98 &     9.86 \\
  8.65 &  1 &    0.015 &  1 &     -65 &   2 &    4,9,10,13       &  -1.56 &    1,2,3,4,10,12   \\
  TW Lyn     &  0.481853 &   -3.31 &   4.18 &    -6.69 &   5.08 &     1.11 &   3.26 &    12.00 \\
   &   &    0.045 &  1 &     -39 &   1 &    10,13           &  -0.66 &    2,6             \\
  RR Lyr     &  0.566805 &    4.38 &   0.59 &  -109.59 &   0.53 &  -195.54 &   0.59 &     7.76 \\
  6.53 &  2 &    0.060 &  2 &     -63 &   8 &    13              &  -1.39 &    1,4,5,6         \\
  CN Lyr     &  0.411382 &   -2.68 &   2.15 &     0.34 &   1.61 &    -8.94 &   1.95 &    11.48 \\
  9.91 &  3 &    0.240 &  2 &      27 &   3 &    9,10,13         &  -0.58 &    2,3,6           \\
  EZ Lyr     &  0.525268 &    0.02 &   6.37 &    -1.59 &   5.92 &    13.10 &   8.23 &    11.57 \\
 10.50 &  2 &    0.075 &  1 &     -74 &  10 &    10              &  -1.22 &    1               \\
  IO Lyr     &  0.577122 &    0.65 &   2.36 &   -14.43 &   2.45 &    30.08 &   2.50 &    11.85 \\
   &   &    0.060 &  1 &    -188 &   2 &    10,13           &  -1.14 &    1,2,6           \\
   Z Mic     &  0.586934 &   -1.97 &   3.17 &    16.51 &   3.27 &    -7.58 &   1.60 &    11.65 \\
   &   &    0.075 &  1 &     -61 &   2 &    13,16           &  -1.10 &    6,14            \\
  RV Oct     &  0.571130 &    0.42 &   1.39 &   -32.99 &   1.14 &    15.59 &   1.37 &    10.98 \\
  9.51 &  1 &    0.090 &  1 &     136 &   1 &    1,13            &  -1.71 &    6,14            \\
\hline\noalign{\smallskip}
\end{tabular}
\end{center}
\end{flushleft}
\end{table}
\begin{table}

{\bf Appendix: Basic Data (cont)}
\begin{flushleft}

\vspace{0.3cm}

\begin{center}
\begin{tabular}{lllllllll} 
\hline\noalign{\smallskip}
Star & Period & $\pi$ & $\sigma$  & $\mu_{\alpha}cos(\delta)$ & $\sigma$ &  $\mu_{\delta}$ &  $\sigma$ & $V_J$ \\
K  & Ref & E(B-V) & Ref & $V_r$ & $\sigma$ & Ref & [Fe/H] & Ref \\
\hline
  RY Oct     &  0.563469 &    5.77 &   3.79 &    -3.83 &   3.93 &   -29.41 &   3.54 &    12.06 \\
   &   &    0.105 &  1 &      37 &  10 &    13              &  -1.83 &    6               \\
  SS Oct     &  0.621825 &    2.61 &   2.79 &     3.33 &   2.99 &   -34.73 &   2.47 &    11.91 \\
   &   &    0.105 &  1 &     312 &  14 &    13              &  -1.60 &    6               \\
  UV Oct     &  0.542625 &    1.48 &   0.94 &   -57.83 &   0.89 &  -121.26 &   0.94 &     9.50 \\
  8.23 &  3 &    0.105 &  1 &     116 &   6 &    13,15           &  -1.74 &    6,13            \\
  V445 Oph   &  0.397023 &    0.08 &   2.47 &   -11.35 &   3.67 &     5.48 &   2.36 &    11.05 \\
  9.24 &  1 &    0.195 &  1 &     -20 &   1 &    2,13            &  -0.19 &    1,5,6,14        \\
  V455 Oph   &  0.453918 &    3.77 &   4.18 &   -32.22 &   3.29 &   -23.43 &   3.13 &    12.36 \\
 11.00 &  3 &    0.150 &  2 &     -32 &   1 &    9,10,13         &  -1.07 &    2,6             \\
  WY Pav     &  0.588580 &    1.10 &   3.92 &   -31.26 &   4.09 &   -27.57 &   2.68 &    12.18 \\
   &   &    0.105 &  1 &     -76 &  14 &    13              &  -0.98 &    6               \\
  BN Pav     &  0.567173 &    0.68 &   5.00 &     0.80 &   4.49 &    -4.50 &   4.22 &    12.60 \\
   &   &    0.045 &  1 &     114 &  14 &    13              &  -1.32 &    6               \\
  BP Pav     &  0.527128 &   -7.74 &   4.02 &   -25.48 &   3.19 &   -30.76 &   3.23 &    12.54 \\
   &   &    0.060 &  1 &     348 &  14 &    13              &  -1.48 &    6               \\
  VZ Peg 'c' &  0.306486 &   -1.61 &   2.97 &    19.02 &   2.46 &   -28.41 &   1.85 &    11.90 \\
   &   &    0.060 &  1 &    -264 &   1 &    9,10            &  -1.80 &    2,3,7           \\
  AV Peg     &  0.390380 &    1.41 &   1.72 &    13.37 &   1.94 &    -7.65 &   1.51 &    10.50 \\
  9.36 &  1 &    0.060 &  1 &     -58 &   1 &    4,13,14         &  -0.08 &    1,4,6           \\
  BH Peg     &  0.640983 &   -0.21 &   1.82 &   -24.17 &   1.60 &   -65.42 &   1.39 &    10.46 \\
  8.97 &  2 &    0.060 &  1 &    -275 &   3 & 3  6,13,14         &  -1.22 &    1,6             \\
  CG Peg     &  0.467134 &    2.10 &   2.06 &    -1.87 &   2.04 &    -5.58 &   1.52 &    11.18 \\
  9.93 &  2 &    0.075 &  1 &      -6 &   2 &    11,13,14        &  -0.50 &    6,9             \\
  DH Peg 'c' &  0.255510 &    0.15 &   1.42 &    19.22 &   2.03 &    -1.63 &   0.98 &     9.55 \\
  8.62 &  1 &    0.060 &  1 &     -70 &   1 &    5,9             &  -1.24 &    1,3,4,7         \\
  AR Per     &  0.425549 &    1.84 &   1.64 &    -7.01 &   1.69 &    -9.63 &   1.17 &    10.51 \\
  8.66 &  1 &    0.310 &  2 &       5 &   1 &    4,9,10,11,13,18 &  -0.30 &    1,2,3,4,6       \\
  RV Phe     &  0.596413 &    2.49 &   2.90 &    50.25 &   2.52 &   -13.96 &   1.80 &    11.94 \\
 10.72 &  1 &    0.015 &  1 &      99 &   2 &    7,15            &  -1.69 &    13              \\
   U Pic     &  0.440371 &    1.51 &   1.65 &    -1.96 &   1.56 &     1.62 &   2.12 &    11.38 \\
 10.37 &  2 &    0.015 &  1 &      21 &   6 &    13,16           &  -0.72 &    6,14            \\
  RU Psc 'c' &  0.390317 &    2.20 &   1.63 &    96.20 &   2.18 &   -39.82 &   0.90 &    10.19 \\
  9.16 &  2 &    0.045 &  1 &    -131 &   1 &    11,13           &  -1.75 &    1,7             \\
  XX Pup     &  0.517198 &    1.58 &   2.41 &   -19.09 &   2.03 &    -2.11 &   2.13 &    11.25 \\
 10.14 &  2 &    0.030 &  2 &     391 &   5 &    10,11,18        &  -1.33 &    2               \\
  HH Pup     &  0.390746 &    0.89 &   1.61 &     2.24 &   1.73 &    -0.43 &   1.81 &    11.29 \\
   &   &    0.150 &  1 &       9 &   3 &    13,16           &  -0.50 &    6,14            \\
  HK Pup     &  0.734254 &    1.52 &   2.57 &    21.12 &   2.36 &     0.29 &   1.19 &    11.37 \\
  9.98 &  3 &    0.010 &  2 &     222 &   3 &    10              &  -1.11 &    2               \\
  V440 Sgr   &  0.477474 &   -0.71 &   2.10 &    -5.82 &   2.01 &   -54.43 &   1.11 &    10.34 \\
  9.10 &  2 &    0.120 &  1 &     -62 &   1 &    7,13,16         &  -1.40 &    5,6,9,14        \\
  V675 Sgr   &  0.642289 &    4.30 &   1.75 &    30.85 &   2.09 &   -21.99 &   1.18 &    10.33 \\
  9.10 &  2 &    0.060 &  2 &    -105 &  10 & 0  15              &  -2.28 &    13              \\
  RU Scl     &  0.493333 &    0.63 &   1.67 &    54.29 &   2.14 &   -17.92 &   1.02 &    10.22 \\
  9.21 &  2 &    0.015 &  1 &      34 &   3 &    13,16,17        &  -1.27 &    6,14            \\
  SV Scl 'c' &  0.377366 &    5.56 &   2.07 &    -2.09 &   1.93 &   -35.53 &   1.30 &    11.38 \\
 10.51 &  2 &    0.015 &  1 &     -10 &  10 &    16              &  -1.77 &    7,14            \\
\hline\noalign{\smallskip}
\end{tabular}
\end{center}
\end{flushleft}
\end{table}
\begin{table}

{\bf Appendix: Basic Data (cont)}
\begin{flushleft}

\vspace{0.3cm}

\begin{center}
\begin{tabular}{lllllllll} 
\hline\noalign{\smallskip}
Star & Period & $\pi$ & $\sigma$  & $\mu_{\alpha}cos(\delta)$ & $\sigma$ &  $\mu_{\delta}$ &  $\sigma$ & $V_J$ \\
K  & Ref & E(B-V) & Ref & $V_r$ & $\sigma$ & Ref & [Fe/H] & Ref \\
\hline
  VW Scl     &  0.510915 &    1.66 &   2.12 &    25.59 &   1.91 &   -38.16 &   1.29 &    11.03 \\
   &   &    0.015 &  1 &      53 &  10 &    9               &  -0.84 &    3               \\
  VX Scl     &  0.637334 &   -2.35 &   2.77 &    37.57 &   2.17 &   -24.77 &   1.61 &    12.02 \\
   &   &    0.015 &  1 &     -47 &  11 &    13              &  -2.25 &    6               \\
  VY Ser     &  0.714094 &   -0.96 &   1.68 &  -103.20 &   1.92 &   -10.12 &   1.40 &    10.13 \\
  8.78 &  1 &    0.030 &  1 &    -146 &   1 & 1  5,9,10,13       &  -1.79 &    1,2,3,4,5,6,10  \\
  AN Ser     &  0.522069 &   -0.21 &   2.48 &    -2.46 &   3.29 &    -5.99 &   2.25 &    10.94 \\
  9.83 &  2 &    0.015 &  1 &     -47 &   1 &    11,13           &  -0.07 &    1,6             \\
  AP Ser 'c' &  0.340789 &   -4.74 &   2.30 &   -38.27 &   2.63 &   -42.75 &   1.98 &    11.11 \\
 10.20 &  3 &    0.015 &  1 &     -88 &   2 &    9,10            &  -1.58 &    1,2,3,7         \\
  AT Ser     &  0.746568 &    0.49 &   2.99 &    -1.52 &   3.46 &    -6.35 &   3.52 &    11.48 \\
 10.27 &  2 &    0.030 &  1 &     -67 &   3 &    11,12,13        &  -2.03 &    1,6             \\
   T Sex 'c' &  0.324698 &    2.38 &   1.72 &   -21.08 &   1.98 &   -22.43 &   0.85 &    10.04 \\
  9.18 &  1 &    0.015 &  1 &      29 &   1 &    4,9,10          &  -1.34 &    1,2,3,4,7       \\
  MT Tel 'c' &  0.316899 &    1.01 &   1.26 &  -136.48 &   1.38 &  -114.14 &   0.91 &     8.98 \\
   &   &    0.060 &  1 &      56 &  10 &    9               &  -1.85 &    3,7             \\
  RW TrA     &  0.374035 &    1.34 &   3.30 &    -9.11 &   2.47 &    -5.89 &   2.40 &    11.40 \\
   &   &    0.090 &  1 &     -56 &  17 &    13,16           &  -0.13 &    6,14            \\
   W Tuc     &  0.642230 &    4.88 &   1.82 &     4.62 &   1.65 &   -20.25 &   1.79 &    11.41 \\
 10.35 &  1 &    0.015 &  1 &      65 &   1 &    8,13,15         &  -1.57 &    6,13            \\
  AM Tuc 'c' &  0.405789 &    0.22 &   1.93 &    23.57 &   1.85 &   -27.88 &   2.12 &    11.67 \\
   &   &    0.015 &  1 &     130 &  10 &    16              &  -1.49 &    7,14            \\
  RV Uma     &  0.468062 &    0.66 &   1.43 &   -26.33 &   1.53 &   -43.32 &   1.52 &    10.77 \\
  9.79 &  2 &    0.015 &  1 &    -185 &   1 &    12,13           &  -1.20 &    1,6,10          \\
  SX UMa 'c' &  0.307153 &    0.70 &   1.39 &   -67.24 &   1.18 &     2.49 &   1.41 &    10.84 \\
 10.03 &  2 &    0.015 &  1 &    -154 &   1 &    9,10            &  -1.81 &    1,2,3,7         \\
  TU Uma     &  0.557659 &   -0.03 &   1.35 &   -68.91 &   1.18 &   -52.47 &   1.04 &     9.82 \\
  8.67 &  1 &    0.015 &  1 &      89 &   2 &    4,9,10,13       &  -1.51 &    1,2,3,4,6,10    \\
  AB Uma     &  0.599577 &    0.91 &   1.90 &   -18.50 &   1.72 &   -15.42 &   1.50 &    10.94 \\
  9.59 &  3 &    0.015 &  1 &     -50 &   1 &    10,13           &  -0.49 &    2,6,11          \\
  AF Vel     &  0.527398 &    2.24 &   2.13 &    40.68 &   1.51 &   -13.96 &   1.56 &    11.44 \\
 10.06 &  2 &    0.150 &  2 &     236 &  10 &    16              &  -1.49 &    14              \\
  ST Vir     &  0.410820 &   -2.89 &   3.22 &    -3.73 &   3.72 &   -19.69 &   2.90 &    11.52 \\
 10.60 &  2 &    0.030 &  1 &       1 &   4 &    12,13           &  -0.67 &    1,6             \\
  UU Vir     &  0.475606 &   -0.37 &   1.97 &   -44.42 &   2.06 &    -4.65 &   1.55 &    10.56 \\
  9.51 &  1 &    0.015 &  1 &      -8 &   1 &    4,5,6,13        &  -0.87 &    1,4,6,10        \\
  AF Vir     &  0.483722 &   -6.81 &   4.21 &   -58.14 &   3.45 &    -0.71 &   2.71 &    11.80 \\
 10.75 &  3 &    0.015 &  1 &     -20 &   8 &    10,13           &  -1.33 &    2,6             \\
  AM Vir     &  0.615088 &   -3.25 &   2.91 &     2.57 &   2.71 &   -44.07 &   1.59 &    11.52 \\
   &   &    0.030 &  1 &      98 &   1 &    9,13            &  -1.37 &    3,6             \\
  AT Vir     &  0.525792 &    1.87 &   2.28 &   -61.31 &   1.99 &   -23.11 &   1.42 &    11.34 \\
 10.30 &  2 &    0.015 &  1 &     336 &   3 &    10,13,18        &  -1.60 &    1,6             \\
  AU Vir 'c' &  0.343230 &   -0.21 &   2.95 &    -5.72 &   2.78 &   -26.47 &   1.90 &    11.59 \\
 10.81 &  3 &    0.015 &  1 &     119 &   2 &    16,18           &  -1.50 &    7,9,14          \\
  AV Vir     &  0.656908 &    3.02 &   3.02 &     9.56 &   2.96 &   -38.69 &   1.97 &    11.82 \\
 10.63 &  2 &    0.015 &  1 &     153 &   1 &    11,13           &  -1.25 &    1,6             \\
  BN Vul     &  0.594125 &    5.89 &   2.11 &   -41.88 &   1.67 &   -36.79 &   1.94 &    11.02 \\
  8.81 &  2 &    0.390 &  2 &    -267 &   5 &    11              &  -1.61 &    1               \\
\hline\noalign{\smallskip}
\end{tabular}
\end{center}
\end{flushleft}
\end{table}

\begin{table}

{\bf Appendix: Basic Data (cont)}
\begin{flushleft}

\vspace{0.3cm}

\begin{center}
\begin{tabular}{lllllllll} 
\hline\noalign{\smallskip}
Star & Period & $\pi$ & $\sigma$  & $\mu_{\alpha}cos(\delta)$ & $\sigma$ &  $\mu_{\delta}$ &  $\sigma$ & $V_J$ \\
K  & Ref & E(B-V) & Ref & $V_r$ & $\sigma$ & Ref & [Fe/H] & Ref \\
\hline
  RW Cnc     &  0.547193 &   -4.78 &   3.06 &     1.50 &   3.22 &   -33.33 &   1.78 &    11.85 \\
 10.75 &  2 &    0.015 &  1 &     -85 &   1 &    11,13           &  -1.67 &    6,10,11         \\
  TT Cnc     &  0.563450 &    1.95 &   3.00 &   -40.96 &   3.13 &   -29.24 &   2.35 &    11.35 \\
 10.05 &  2 &    0.030 &  1 &      49 &   1 &    11,13,18        &  -1.57 &    1,6,10          \\
   W CVn     &  0.551759 &    1.15 &   1.69 &   -19.30 &   0.91 &   -15.63 &   1.26 &    10.55 \\
  9.43 &  2 &    0.015 &  1 &      42 &   3 &    12,13           &  -1.22 &    1,6,10,12       \\
  RZ CVn     &  0.567417 &   -1.75 &   2.45 &   -53.42 &   2.41 &    -0.15 &   1.60 &    11.57 \\
 10.57 &  2 &    0.015 &  1 &     -12 &   1 &    11,13           &  -1.84 &    1,6,10,11       \\
  SS CVn     &  0.478519 &   -1.69 &   2.62 &     6.34 &   1.47 &   -42.80 &   1.69 &    11.84 \\
 10.92 &  2 &    0.015 &  1 &     -40 &   3 &    10,13           &  -1.37 &    2,6,10,11       \\
  ST CVn 'c' &  0.329063 &    0.00 &   2.80 &   -14.17 &   2.71 &   -14.31 &   1.86 &    11.37 \\
 10.44 &  2 &    0.015 &  1 &    -129 &   1 &    11,12           &  -1.07 &    1,7             \\
  UZ CVn     &  0.697783 &   16.26 &   7.16 &   -11.53 &   4.78 &   -39.45 &   5.96 &    12.12 \\
 10.90 &  3 &    0.015 &  1 &     -28 &   3 &    10,13           &  -1.89 &    2,6             \\
  AA CMi     &  0.476323 &    4.59 &   3.42 &     0.55 &   3.05 &     3.05 &   2.20 &    11.57 \\
 10.26 &  3 &    0.090 &  2 &      55 &   3 &    10              &  -0.15 &    2,10            \\
  RV Cap     &  0.447750 &   -2.99 &   2.46 &    18.77 &   2.58 &  -106.21 &   1.87 &    11.04 \\
 10.10 &  2 &    0.045 &  1 &     -99 &   4 &    13,17           &  -1.61 &    1,6             \\
  YZ Cap 'c' &  0.273458 &    2.97 &   2.52 &   -17.60 &   3.26 &   -18.41 &   1.47 &    11.30 \\
 10.37 &  3 &    0.060 &  1 &    -105 &   3 &    7,15            &  -1.06 &    1,7,13          \\
  V499 Cen   &  0.521210 &   -2.09 &   1.99 &     9.23 &   1.56 &   -23.91 &   1.78 &    11.12 \\
  9.99 &  2 &    0.075 &  1 &     331 &   3 &    13,15           &  -1.43 &    6,13            \\
  RZ Cep 'c' &  0.308645 &    0.22 &   1.09 &    90.61 &   1.38 &   189.10 &   1.00 &     9.47 \\
  8.10 &  2 &    0.250 &  2 &       9 &   3 &    12              &  -1.77 &    1,7             \\
  RR Cet     &  0.553025 &   -0.03 &   1.34 &    10.55 &   1.29 &   -43.98 &   0.82 &     9.73 \\
  8.56 &  1 &    0.015 &  1 &     -74 &   1 &    3,4,9,10,13     &  -1.45 &    1,2,3,5,6       \\
  RU Cet     &  0.586271 &    3.02 &   3.17 &    20.36 &   3.56 &   -27.45 &   2.02 &    11.68 \\
   &   &    0.015 &  1 &      46 &  10 &    13,16           &  -1.66 &    6,9,14          \\
  RV Cet     &  0.623428 &    2.33 &   2.03 &    28.71 &   1.94 &   -20.68 &   1.40 &    10.92 \\
  9.55 &  2 &    0.015 &  1 &     -94 &   3 &    13,16,17        &  -1.60 &    6,14            \\
  RX Cet     &  0.573696 &    2.70 &   2.63 &   -20.19 &   3.42 &   -62.68 &   1.89 &    11.44 \\
   &   &    0.015 &  1 &     -57 &   2 &    13,16,17,18     &  -1.28 &    6,14            \\
  RZ Cet     &  0.510613 &   -2.57 &   3.43 &    21.67 &   2.62 &    -0.92 &   2.88 &    11.85 \\
 10.68 &  2 &    0.015 &  1 &      -7 &   3 &    10,13,18        &  -1.36 &    1,2,6           \\
  UU Cet     &  0.606081 &    6.48 &   4.13 &    33.37 &   4.84 &    -0.43 &   1.88 &    12.08 \\
 10.85 &  1 &    0.015 &  1 &    -114 &   1 &    8,16            &  -1.28 &    1,5,12,14       \\
  RX Col     &  0.593733 &   -5.15 &   3.41 &     7.93 &   2.62 &    10.65 &   3.87 &    12.72 \\
   &   &    0.015 &  1 &     356 &  11 &    13              &  -1.70 &    6               \\
  RY Col     &  0.478857 &    1.20 &   1.33 &    34.70 &   1.17 &    22.95 &   1.35 &    10.90 \\
  9.80 &  2 &    0.015 &  1 &     474 &   4 &    13,15           &  -0.91 &    6,13            \\
  S Com      &  0.586591 &   -1.34 &   2.67 &   -16.44 &   3.43 &   -16.52 &   2.15 &    11.63 \\
 10.60 &  3 &    0.015 &  1 &     -55 &   1 &    11,13           &  -1.91 &    1,6             \\
  U Com 'c'  &  0.292738 &    3.46 &   2.75 &   -44.45 &   3.62 &   -13.75 &   1.98 &    11.74 \\
 10.93 &  2 &    0.015 &  1 &     -22 &   3 &    9,10            &  -1.25 &    2,7,9           \\
  ST Com     &  0.598929 &   -5.17 &   2.71 &   -23.97 &   2.77 &   -33.98 &   1.56 &    11.46 \\
 10.22 &  2 &    0.015 &  1 &     -68 &  10 &    11              &  -1.10 &    9               \\
  V413 CrA   &  0.589324 &    0.66 &   2.05 &   -35.10 &   2.23 &   -25.57 &   1.53 &    10.60 \\
   &   &    0.105 &  1 &     -89 &  10 &    13,16           &  -1.26 &    6,14            \\
\hline\noalign{\smallskip}
\end{tabular}
\end{center}
\end{flushleft}
\end{table}

\begin{table}
\begin{flushleft}
{\bf Appendix: Basic Data (cont)}

\vspace{0.3cm}

\footnotesize

Of the 180 stars classified by HIPPARCOS as RR Lyraes and observed by the
satellite the following stars were removed: \\
CH AQL - No metallicity  \\ 
IN ARA - Poor quality HIPPARCOS data (like RW COL)   \\
BH AUR - No reddening  \\
BB CMI - Ecl.Var. (Schmidt et al 1995)   \\
V363 CAS - Fourier Coefficient R(21)  is unusual - Anom.Ceph (see section 2.3)  \\
V753 CEN  - Period too short (0.221 days)  \\
EZ CEP - Poor quality HIPPARCOS data (like RW COL)  \\
XZ CET - Fourier Coefficient R(21) is unusual - Anom.Ceph (see section 2.3)  \\
RW COL - HIPPARCOS data are Poor quality (light curve has a lot of scatter 
         and Trig Parallax and Proper Motion have large errors)  \\
V1719 CYG - Long period Delta Scuti (Fernley and Barnes 1997)  \\
VZ DRA - No metallicity  \\
BX DRA - Ecl.Var. (Schmidt et al 1995)  \\
XZ GRU - Period too long (0.883 days)  \\
LS HER - Period too short (0.231 days)  \\
SZ HYA - Poor quality HIPPARCOS data (like RW COL)  \\
BI HYA - Constant V mag from HIPPARCOS photometry  \\
ET HYA - Both constant V mag from HIPPARCOS and constant radial velocity from spectra
         (Fernley and Barnes 1997)   \\
CZ LAC - Poor quality HIPPARCOS data (like RW COL)   \\
CW LUP - Both constant V mag from HIPPARCOS and constant radial velocity from spectra
         (Solano et al 1997)   \\
TV LYN - Period too short (0.241 days)   \\
VY NOR - Poor quality HIPPARCOS data (like RW COL)   \\
V429 ORI - Both constant V mag from HIPPARCOS and constant radial velocity from spectra
         (Fernley and Barnes 1997)   \\
IV PAV - Period too short (0.203 days)   \\
KN PER - Ecl.Var (Schmidt 1991)   \\
ST PIC - No metallicity or radial velocity \\
SS PSC - Long period Delta Scuti (Fernley and Barnes 1997)  \\
IU PUP - Constant V mag from HIPPARCOS photometry  \\
KZ PUP - Period too long (2.018 days)   \\
V2232 SGR - Poor quality HIPPARCOS data (like RW COL)   \\
V494 SCO - No Reddening  \\
V690 SCO - No Reddening  \\
UY SCL - Period too short (0.182 days)   \\
AR SER - Fourier Coefficient R(21) is unusual - Anom.Ceph (see section 2.3)  \\
CD VEL - No metallicity or radial velocity  \\
BB VIR - Photometric evidence for HB Companion (Fernley 1993b)   \\
NSV5394 - Constant V mag from HIPPARCOS photometry   \\

\end{flushleft}

\end{table}

\begin{table}

\begin{flushleft}

{\bf Appendix: Basic Data (cont)}

\vspace{0.3cm}

\footnotesize
 Star name is followed by a $'c'$ for RRc Lyraes, otherwise it is an 
 RRab Lyrae. The identification of the $'c'$ types is from the Fourier
 components as discussed in section 2.3  \\

\vspace{3mm}

 Periods were initially from the GCVS (Kholopov et al 1985) and then
 refined using the HIPPARCOS photometry as discussed in section 2.1  \\

\vspace{3mm}

Trigonometric Parallaxes and proper motions (and their errors) are
     from HIPPARCOS. The units are milliarcsecs and milliarcsecs/yr.  \\

\vspace{3mm}

 $\rm V_J$ magnitudes are intensity mean magnitudes derived from the HIPPARCOS  
 photometry using the procedures described in section 2.1.
 The error on these mean magnitudes is typically $\pm$ 0.02  \\

\vspace{3mm}

 K magnitudes are from (1) the Baade-Wesselink analyses listed in Skillen
    et al (1993)  (2) Fernley, Skillen and Burki (1993)   (3) Unpublished.
 Typically these have uncertainties of $\pm$0.04  \\

\vspace{3mm}

 E(B-V) is from (1) Burstein and Heiles (1982)  (2) Using the Log(P) - (V-K) 
 relations discussed in Section 2.2.
 Uncertainties on these reddenings are $\pm$0.015 for Burstein and Heiles and
 $\pm$0.03 for those derived from (V-K).  \\

\vspace{3mm}

 Systemic velocities (and their standard errors) are in kms/sec.
The sources of the data are as follows:
       (1) Skillen et al 1993   (2) Fernley et al 1990 
        (3) Meylan et al 1986   (4) Liu and Janes 1990a 
         (5) Jones et al 1988   (6) Carrillo et al 1995
        (7) Cacciari et al 1987   (8) Cacciari et al 1990
          (9) Solano et al 1997
         (10) Fernley and Barnes 1997    (11) Hawley and Barnes 1985
         (12) Fernley et al 1993
        (13) Layden 1994   (14) Woolley and Aly 1966 
         (15) Kinman 1961   (16) Clube, Evans and Jones 1969
       (17) Breger 1964  (18) Notni 1956
       (19) Joy 1938,1950,1955   \\

\vspace{3mm}

 [Fe/H] use the relation [Fe/H] = -0.13 - 0.195$\Delta$S from Fernley and
      Barnes (1997).  
 Typically the error on these abundances is $\pm$0.15 dex.  
 Sources of data are as follows: (1)Suntzeff,Kraft and Kinman 1991 
      (2) Fernley and Barnes 1997   (3) Solano et al 1997 
         (4) Lambert et al 1996   (5) Clementini et al 1995
       (6) Layden 1994     (7) Kemper 1982
         (8) Butler 1975  (unless superseded by ref 1)
       (9) Preston 1959 (unless superseded by ref 1)  
       Kinman and Caretta 1992   (11) Smith 1990 
       (12) Clementini et al 1991   (13) Kinman 1961
        (14) Clube,Evans and Jones 1969   \\ 

\end{flushleft}
\end{table}
\end{document}
