\documentstyle{aa}
\begin{document}
%Table 1
\begin{table*}
\caption[]{Program Cepheids, their spectra and results for individual phases}
%\label{T1}
\tiny
\begin{tabular}{ccccccccc}
\hline
Star          & P, d   & JD, 24+     &$\phi$ & Telescope &T$_{\rm eff},\,K$&
$\log g$&V$_{\rm t}$,\,km~s$^{-1}$&[Fe/H]\\
\hline
{V473 Lyr} (s)  & 1.4908 &  49906.43160&  0.793& OHP 1.93m& 6163 & 2.45 & 4.20&--0.09 \\
              &        &  49907.57360&  0.559& OHP 1.93m& 6113 & 2.60 & 4.50&--0.05 \\
              &        &             &       &          &      &      &     &       \\
{SU Cas}(s)     & 1.9493 &  50674.95633&  0.902& MDO 2.1m & 6594 & 2.60 & 3.85&--0.02 \\
              &        &  50675.96550&  0.420& MDO 2.1m & 6162 & 2.25 & 3.00&--0.00 \\
              &        &  50678.93059&  0.941& MDO 2.1m & 6603 & 2.50 & 3.50&--0.01 \\
              &        &  51473.79052&  0.704& MDO 2.1m & 6201 & 2.30 & 2.85&--0.00 \\
              &        &             &       &          &      &      &     &       \\
{EU Tau}   (s)  & 2.1025 &  51096.90943&  0.172& MDO 2.1m & 6203 & 2.00 & 3.00&--0.09 \\
              &        &  51097.89587&  0.641& MDO 2.1m & 6014 & 2.20 & 3.30&--0.03 \\
              &        &             &       &          &      &      &     &       \\
{IR Cep}   (s)  & 2.1140 &  48821.46940&  0.137& SAORAS 6m& 6162 & 2.40 & 4.10& +0.00 \\
              &        &             &       &          &      &      &     &       \\
{TU Cas}        & 2.1393 &  50674.90819&  0.919& MDO 2.1m & 6465 & 2.10 & 3.70&--0.07 \\
              &        &  50675.91792&  0.391& MDO 2.1m & 5993 & 2.40 & 4.00& +0.03 \\
              &        &  50677.89839&  0.317& MDO 2.1m & 6013 & 2.30 & 3.00& +0.07 \\
              &        &  50678.91008&  0.790& MDO 2.1m & 6148 & 2.40 & 4.80&--0.05 \\
              &        &  50735.76094&  0.364& MDO 2.1m & 5905 & 2.10 & 2.60& +0.09 \\
              &        &  50739.76484&  0.235& MDO 2.1m & 6185 & 2.40 & 3.50& +0.05 \\
              &        &  50740.77928&  0.710& MDO 2.1m & 5906 & 2.20 & 3.90& +0.08 \\
              &        &  50741.79234&  0.183& MDO 2.1m & 6026 & 1.80 & 4.10&--0.06 \\
              &        &  51053.90600&  0.076& MDO 2.1m & 6520 & 2.30 & 3.50&--0.03 \\
              &        &  51095.78573&  0.649& MDO 2.1m & 5920 & 2.30 & 4.00& +0.09 \\
              &        &  51097.81206&  0.600& MDO 2.1m & 5857 & 2.20 & 4.50& +0.08 \\
              &        &             &       &          &      &      &     &       \\
{DT Cyg}   (s)  & 2.4991 &  50379.65482&  0.014& MDO 2.1m & 6406 & 2.60 & 3.70& +0.14 \\
              &        &  50383.55796&  0.576& MDO 2.1m & 6010 & 2.30 & 3.50& +0.08 \\
              &        &  50674.86130&  0.140& MDO 2.1m & 6384 & 2.40 & 3.50& +0.08 \\
              &        &             &       &          &      &      &     &       \\
{V526 Mon}  (s) & 2.6750 &  49022.42220&  0.674& SAORAS 6m& 6464 & 2.40 & 3.50&--0.13 \\
              &        &             &       &          &      &      &     &       \\
{V351 Cep}  (s) & 2.8060 &  48853.50600&  0.425& SAORAS 6m& 5944 & 2.50 & 4.30& +0.03 \\
              &        &  49203.37300&  0.301& SAORAS 6m& 6005 & 2.10 & 3.30& +0.02 \\
              &        &             &       &          &      &      &     &       \\
{VX Pup}        & 3.0109 &  51231.52248&  0.813& MSO 74in & 6159 & 2.50 & 3.50& -0.12 \\
              &        &             &       &          &      &      &     &       \\
{SZ Tau}(s)     & 3.1484 &  50379.86757&  0.430& MDO 2.1m & 5901 & 2.10 & 3.30& +0.12 \\
              &        &  50380.89275&  0.756& MDO 2.1m & 5955 & 2.30 & 3.90& +0.06 \\
              &        &  50482.66323&  0.077& MDO 2.1m & 6121 & 2.20 & 3.70& +0.03 \\
              &        &             &       &          &      &      &     &       \\
{V1334 Cyg} (s) & 3.3330 &  50676.84617&  0.185& MDO 2.1m & 6149 & 1.90 & 3.50&--0.02 \\
              &        &  50738.72218&  0.751& MDO 2.1m & 6363 & 2.00 & 3.60&--0.05 \\
              &        &  51093.72224&  0.268& MDO 2.1m & 6210 & 2.20 & 3.90&--0.02 \\
              &        &             &       &          &      &      &     &       \\
{BG Cru} (s)    & 3.3427 &  51231.64722&  0.188& MSO 74in & 6101 & 2.00 & 3.80&--0.02 \\
              &        &             &       &          &      &      &     &       \\
{BD Cas} (s)    & 3.6510 &  49572.49400&  0.772& SAORAS 6m& 6200 & 2.50 & 5.00&--0.11 \\
              &        &  49577.33900&  0.073& SAORAS 6m& 6075 & 2.30 & 4.50&--0.12 \\
              &        &  49578.34300&  0.347& SAORAS 6m& 5880 & 2.40 & 4.00&--0.04 \\
              &        &             &       &          &      &      &     &       \\
{RT Aur}        & 3.7282 &  50736.01017&  0.328& MDO 2.1m & 5982 & 1.90 & 3.00& +0.03 \\
              &        &  50736.96014&  0.583& MDO 2.1m & 5686 & 1.85 & 3.40& +0.07 \\
              &        &  50739.91812&  0.377& MDO 2.1m & 5878 & 2.00 & 3.00& +0.08 \\
              &        &             &       &          &      &      &     &       \\
{DF Cas}        & 3.8320 &  50505.18472&  0.401& SAORAS 6m& 5644 & 2.20 & 4.65& +0.13 \\
              &        &             &       &          &      &      &     &       \\
{SU Cyg}        & 3.8455 &  50736.68203&  0.415& MDO 2.1m & 5956 & 2.10 & 3.20&--0.00 \\
              &        &  50738.70189&  0.940& MDO 2.1m & 6314 & 2.40 & 4.50&--0.03 \\
              &        &             &       &          &      &      &     &       \\
{ST Tau}        & 4.0325 &  51096.86237&  0.869& MDO 2.1m & 6519 & 2.50 & 4.40&--0.02 \\
              &        &  51097.92470&  0.132& MDO 2.1m & 6268 & 2.00 & 3.50&--0.05 \\
              &        &  51474.97888&  0.594& MDO 2.1m & 5676 & 1.80 & 3.90&--0.09 \\
              &        &             &       &          &      &      &     &       \\
{V1726 Cyg}  (s) & 4.2360 &  51003.23100&  0.109& SAORAS 6m& 6349 & 2.20 & 5.20&--0.02 \\
              &        &             &       &          &      &      &     &       \\
{BQ Ser}        & 4.2709 &  51659.96271&  0.121& MDO 2.1m & 6296 & 2.20 & 4.00&--0.10 \\
              &        &  51660.96355&  0.355& MDO 2.1m & 6021 & 1.70 & 3.15&--0.02 \\
              &        &  51661.96295&  0.589& MDO 2.1m & 5768 & 1.80 & 3.20&--0.00 \\
              &        &             &       &          &      &      &     &       \\
\hline
\end{tabular}
\begin{itemize}
\item[] MDO 2.1m - McDonald Observatory (USA), Struve 2.1-m reflector, R = 60,000,
S/N $>$ 100.
\item[] KPNO 4m - Kitt Peak National Observatory (USA), 4-m and coud\'{e}-feed
telescope, R = 30,000 and 80,000 respectively, S/N $\approx$150 (except for
CV Mon with a S/N of about 50).
\item[] CTIO 4m - Cerro Tololo Inter-American Observatory (Chile), 4-m telscope,
R = 30,000, S/N $>$ 100.
\item[] MSO 74in - Mount Stromlo Observatory (Australia), 74-inch telescope,
R = 56,000, S/N $\le$ 50.
\item[] SAORAS 6m - Special Astrophysical Observatory of the Russian Academy of
Sciences (Russia), 6-m telescope, R = 14,000 and 25,000, S/N $\approx$ 70-100
(except for DF Cas, V924 Cyg and TX Del, where the S/N is below 70).
\item[] OHP 1.93m - Haute-Provence Observatoire (France), 1.93-m telescope,
R = 40,000 , S/N $>$ 150.
\end{itemize}
\end{table*}

%Table 1  continued
\begin{table*}
{\bf Table 1 (continued)}\\
\tiny
\begin{tabular}{ccccccccc}
\hline
Star          & P, d   & JD, 24+     &$\phi$ & Telescope &T$_{\rm eff}$,\,K&$\log g$
&V$_{\rm t}$,\,km~s$^{-1}$&[Fe/H]\\
\hline
{Y  Lac}        & 4.2338 &  51098.78394&  0.936& MDO 2.1m & 6330 & 2.00 & 4.00&--0.10 \\
              &        &  51474.61215&  0.858& MDO 2.1m & 6006 & 1.70 & 4.45&--0.08 \\
              &        &  51475.67351&  0.103& MDO 2.1m & 6258 & 1.80 & 4.00&--0.09 \\
              &        &             &       &          &      &      &     &       \\
{T Vul}& 4.4355 &  50381.66164&  0.144& MDO 2.1m & 6077 & 2.00 & 3.55& +0.02 \\
              &        &  50382.67995&  0.374& MDO 2.1m & 5768 & 2.00 & 3.60& +0.03 \\
              &        &  51095.55920&  0.094& MDO 2.1m & 6174 & 2.00 & 3.70&--0.01 \\
              &        &             &       &          &      &      &     &       \\
{FF Aql}  (s)  & 4.4709 &  50674.68472&  0.987& MDO 2.1m & 6425 & 2.10 & 4.90&--0.02 \\
              &        &  50677.74557&  0.672& MDO 2.1m & 6083 & 2.00 & 4.80& +0.05 \\
              &        &  50678.71213&  0.888& MDO 2.1m & 6421 & 2.10 & 5.40& +0.00 \\
{CF Cas}    & 4.8752 &  50735.81552&  0.980& MDO 2.1m & 6115 & 2.00 & 4.00&--0.03 \\
          &        &  50738.76114&  0.584& MDO 2.1m & 5454 & 1.70 & 4.30& +0.01 \\
          &        &  51055.92310&  0.641& MDO 2.1m & 5439 & 1.70 & 4.40&--0.01 \\
          &        &  51097.83265&  0.238& MDO 2.1m & 5704 & 1.90 & 3.70& +0.02 \\
          &        &  51098.85759&  0.448& MDO 2.1m & 5428 & 1.30 & 3.40&--0.01 \\
          &        &             &       &          &      &      &     &       \\
{TV Cam}    & 5.2950 &  44333.65000&  0.090& KPNO 4m  & 6049 & 2.15 & 4.30&--0.06 \\
          &        &             &       &          &      &      &     &       \\
{BG Lac}    & 5.3319 &  51055.83161&  0.147& MDO 2.1m & 5923 & 1.90 & 3.80& +0.01 \\
          &        &  51056.81572&  0.332& MDO 2.1m & 5625 & 1.85 & 3.60& +0.02 \\
          &        &  51097.77450&  0.014& MDO 2.1m & 6095 & 1.80 & 4.20&--0.06 \\
          &        &             &       &          &      &      &     &       \\
{$\delta$ Cep}& 5.3663&  50379.68413&  0.561&MDO 2.1m & 5544 & 1.70 & 3.70& +0.08 \\
          &        &  50741.70985&  0.024& MDO 2.1m & 6532 & 2.20 & 4.10& +0.05 \\
          &        &             &       &          &      &      &     &       \\
{V1162 Aql} & 5.3760 &  51774.74747&  0.890& MDO 2.1m & 5989 & 2.00 & 4.60&--0.03 \\
          &        &  51775.64945&  0.058& MDO 2.1m & 5940 & 1.80 & 3.90& +0.04 \\
          &        &             &       &          &      &      &     &       \\
{CV Mon}    & 5.3789 &  48878.97917&  0.178& KPNO 4m  & 5897 & 2.00 & 4.10&--0.03 \\
          &        &             &       &          &      &      &     &       \\
{V Cen}     & 5.4939 &  49116.54792&  0.236& CTIO 4m  & 5705 & 2.10 & 3.90& +0.04 \\
          &        &             &       &          &      &      &     &       \\
{V924 Cyg} (s:)& 5.5710&  48819.4062& 0.702& SAORAS 6m& 5910 & 1.80 & 5.00&--0.09 \\
          &        &             &       &          &      &      &     &       \\
{MY Pup} (s)& 5.6953 &  51231.46954&  0.950& MSO 74in & 6170 & 1.85 & 3.30&--0.12 \\
          &        &             &       &          &      &      &     &       \\
{Y Sgr}    & 5.7734 &  50674.62981&  0.911& MDO 2.1m & 6078 & 1.90 & 4.40& +0.07 \\
          &        &  51053.66761&  0.564& MDO 2.1m & 5490 & 1.60 & 3.90& +0.06 \\
          &        &  51057.67128&  0.257& MDO 2.1m & 5841 & 1.55 & 3.90& +0.05 \\
          &        &             &       &          &      &      &     &       \\
{EW Sct}    & 5.8233 &  51053.69933&  0.722& MDO 2.1m & 5728 & 1.80 & 3.50& +0.05 \\
          &        &  51055.68163&  0.062& MDO 2.1m & 6155 & 2.30 & 5.00& +0.01 \\
          &        &  51058.65288&  0.572& MDO 2.1m & 5655 & 1.70 & 3.40& +0.05 \\
          &        &             &       &          &      &      &     &       \\
{FM Aql}    & 6.1142 &  50736.61650&  0.942& MDO 2.1m & 6255 & 1.80 & 4.10& +0.07 \\
          &        &  50738.60784&  0.267& MDO 2.1m & 5750 & 1.50 & 3.50& +0.11 \\
          &        &             &       &          &      &      &     &       \\
{TX Del}    & 6.1660 &  49165.12300&  0.005& SAORAS 6m& 6217 & 1.80 & 6.00& +0.23 \\
          &        &             &       &          &      &      &     &       \\
{V367 Sct}  & 6.2931 &  51003.39510&       & SAORAS 6m& 5891 & 2.10 & 4.25& --0.01\\
          &        &             &       &          &      &      &     &       \\
{X Vul}    & 6.3195 &  50738.66499&  0.407& MDO 2.1m & 5649 & 1.80 & 3.45& +0.09 \\
          &        &  50739.67020&  0.566& MDO 2.1m & 5434 & 1.60 & 4.00& +0.05 \\
          &        &  51097.69899&  0.220& MDO 2.1m & 5875 & 1.80 & 4.10& +0.09 \\
          &        &             &       &          &      &      &     &       \\
{AW Per}    & 6.4636 &  50380.92178&  0.994& MDO 2.1m & 6423 & 2.15 & 4.30&--0.03 \\
          &        &  50382.86865&  0.295& MDO 2.1m & 5989 & 1.90 & 3.60& +0.06 \\
          &        &  50383.87798&  0.451& MDO 2.1m & 5836 & 2.00 & 3.70& +0.11 \\
          &        &  50736.87128&  0.065& MDO 2.1m & 6627 & 1.70 & 3.90&--0.06 \\
          &        &             &       &          &      &      &     &       \\
{U Sgr}     & 6.7452 &  50674.63784&  0.550& MDO 2.1m & 5388 & 1.50 & 4.00& +0.06 \\
          &        &  50674.64319&  0.551& MDO 2.1m & 5416 & 1.70 & 4.00& +0.07 \\
          &        &  50677.67816&  0.001& MDO 2.1m & 6145 & 1.90 & 4.70& +0.01 \\
          &        &  50735.55199&  0.581& MDO 2.1m & 5347 & 1.60 & 4.00& +0.04 \\
          &        &  50736.56445&  0.731& MDO 2.1m & 5399 & 1.70 & 5.20& +0.01 \\
          &        &  50739.57384&  0.178& MDO 2.1m & 5876 & 1.70 & 4.00& +0.08 \\
          &        &  50740.57748&  0.326& MDO 2.1m & 5710 & 1.70 & 4.00& +0.09 \\
          &        &  50741.55532&  0.471& MDO 2.1m & 5475 & 1.60 & 4.00& +0.05 \\
          &        &  50949.66389&  0.326& MDO 2.1m & 5705 & 1.70 & 4.00& +0.05 \\
          &        &  51053.67960&  0.746& MDO 2.1m & 5441 & 1.80 & 5.50& +0.01 \\
          &        &  51054.68627&  0.896& MDO 2.1m & 6077 & 2.10 & 5.50& +0.04 \\
          &        &  51094.62511&  0.817& MDO 2.1m & 5746 & 2.00 & 6.00& +0.02 \\
          &        &             &       &          &      &      &     &       \\
{V496 Aql} (s)& 6.8071&  51774.72348& 0.910& MDO 2.1m & 5822 & 1.70 & 4.25& +0.03 \\
          &        &  51775.62763&  0.043& MDO 2.1m & 5841 & 1.70 & 4.00& +0.06 \\
          &        &             &       &          &      &      &     &       \\
{$\eta$ Aql}& 7.1767 &  50739.66527&  0.021& MDO 2.1m & 6275 & 1.90 & 4.40& +0.04 \\
          &        &  50741.62832&  0.295& MDO 2.1m & 5787 & 1.80 & 3.90& +0.06 \\
          &        &             &       &          &      &      &     &       \\
\hline
\end{tabular}
\end{table*}

%Table 1  continued
\begin{table*}
{\bf Table 1 (continued)}\\
\tiny
\begin{tabular}{ccccccccc}
\hline
Star          & P, d   & JD, 24+     &$\phi$ & Telescope &T$_{\rm eff}$,\,K
&$\log g$&V$_{\rm t}$,\,km~s$^{-1}$&[Fe/H]\\
\hline
{BB Her}    & 7.5080 &  51055.64149&  0.665& MDO 2.1m & 5265 & 1.60 & 4.10& +0.08 \\
          &        &  51058.66436&  0.068& MDO 2.1m & 5988 & 1.80 & 4.30& +0.17 \\
          &        &  51097.63866&  0.259& MDO 2.1m & 5750 & 1.80 & 4.20& +0.16 \\
          &        &  51098.61695&  0.389& MDO 2.1m & 5556 & 1.70 & 4.20& +0.13 \\
          &        &             &       &          &      &      &     &       \\
{RS Ori}    & 7.5669 &  51098.98467&  0.012& MDO 2.1m & 6367 & 1.80 & 3.70&--0.10 \\
          &        &  51476.87338&  0.952& MDO 2.1m & 6666 & 2.10 & 4.40&--0.10 \\
          &        &  51568.74952&  0.094& MDO 2.1m & 6193 & 1.70 & 3.90&--0.12 \\
          &        &  51569.75694&  0.228& MDO 2.1m & 6043 & 1.60 & 3.70&--0.07 \\
{V440 Per} (s)& 7.5700 &  50738.81027&  0.280& MDO 2.1m & 6144 & 2.00 & 5.10&--0.03 \\
          &        &  50741.86515&  0.684& MDO 2.1m & 5997 & 1.90 & 4.90&--0.08 \\
          &        &  51098.90018&  0.848& MDO 2.1m & 6021 & 1.85 & 5.20&--0.06 \\
          &        &             &       &          &      &      &     &       \\
{W Sgr}    & 7.5949 &  50741.55035&  0.045& MDO 2.1m & 6446 & 2.10 & 4.60&--0.04 \\
          &        &  51053.62870&  0.137& MDO 2.1m & 6207 & 2.00 & 4.30& +0.02 \\
          &        &  51056.63553&  0.533& MDO 2.1m & 5540 & 1.65 & 3.80& +0.01 \\
          &        &             &       &          &      &      &     &       \\
{RX Cam}    & 7.9120 &  50735.89188&  0.212& MDO 2.1m & 5942 & 1.95 & 4.10& +0.07 \\
          &        &  50736.84355&  0.332& MDO 2.1m & 5755 & 1.80 & 4.10& +0.06 \\
          &        &  50741.88410&  0.969& MDO 2.1m & 6227 & 1.90 & 4.20&--0.02 \\
          &        &             &       &          &      &      &     &       \\
{W Gem}    & 7.9138 &  51096.95531&  0.009& MDO 2.1m & 6003 & 1.85 & 4.05&--0.02 \\
          &        &  51097.96579&  0.137& MDO 2.1m & 6021 & 1.80 & 3.90&--0.08 \\
          &        &  51098.96898&  0.264& MDO 2.1m & 5704 & 1.90 & 4.50&--0.01 \\
          &        &             &       &          &      &      &     &       \\
{U Vul}    & 7.9906 &  51055.76933&  0.415& MDO 2.1m & 5629 & 1.70 & 4.00& +0.09 \\
          &        &  51056.73122&  0.536& MDO 2.1m & 5490 & 1.50 & 3.70& +0.08 \\
          &        &  51475.65134&  0.961& MDO 2.1m & 6314 & 1.90 & 5.00& +0.01 \\
          &        &             &       &          &      &      &     &       \\
{DL Cas}    & 8.0007 &  50381.76574&  0.105& MDO 2.1m & 5860 & 1.70 & 4.70&--0.02 \\
          &        &  50382.75636&  0.229& MDO 2.1m & 5786 & 1.70 & 4.20& +0.02 \\
          &        &  50736.74222&  0.473& MDO 2.1m & 5438 & 1.40 & 4.00&--0.05 \\
          &        &             &       &          &      &      &     &       \\
{AC Mon}    & 8.0143 &  50505.35490&  0.919& SAORAS 6m& 6121 & 2.20 & 5.80&--0.07 \\
          &        &             &       &          &      &      &     &       \\
{V636 Cas} (s)& 8.3770& 50735.78055&  0.919& MDO 2.1m & 5562 & 1.50 & 4.10& +0.05 \\
          &        &  50736.77703&  0.038& MDO 2.1m & 5473 & 1.50 & 3.80& +0.06 \\
          &        &  50737.79151&  0.159& MDO 2.1m & 5395 & 1.60 & 4.05& +0.07 \\
          &        &             &       &          &      &      &     &       \\
{S Sge}    & 8.3821 &  50675.76850&  0.051& MDO 2.1m & 6135 & 2.00 & 4.30& +0.12 \\
          &        &  50677.81371&  0.295& MDO 2.1m & 5855 & 1.80 & 3.80& +0.11 \\
          &        &  50741.65318&  0.911& MDO 2.1m & 6093 & 2.10 & 4.95& +0.09 \\
          &        &             &       &          &      &      &     &       \\
{GQ Ori}    & 8.6161 &  49022.30620&  0.365& SAORAS 6m& 5732 & 1.75 & 5.20&--0.03 \\
          &        &             &       &          &      &      &     &       \\
{V500 Sco}  & 9.3168 &  51093.57083&  0.340& MDO 2.1m & 5359 & 1.40 & 3.80&--0.03 \\
          &        &  51094.56998&  0.447& MDO 2.1m & 5243 & 1.40 & 3.80&--0.05 \\
          &        &  51097.55554&  0.768& MDO 2.1m & 6050 & 1.80 & 4.00& +0.01 \\
          &        &  51098.55823&  0.875& MDO 2.1m & 5969 & 1.70 & 4.40&--0.03 \\
          &        &             &       &          &      &      &     &       \\
{FN Aql}    & 9.4816 &  50740.65730&  0.794& MDO 2.1m & 5698 & 1.65 & 4.70&--0.05 \\
          &        &  51055.73047&  0.024& MDO 2.1m & 5922 & 1.90 & 4.90&--0.02 \\
          &        &  51056.70025&  0.126& MDO 2.1m & 5729 & 1.55 & 3.70& +0.00 \\
          &        &  51057.74039&  0.236& MDO 2.1m & 5464 & 1.50 & 3.50& +0.01 \\
          &        &             &       &          &      &      &     &       \\
{YZ Sgr}    & 9.5536 &  50735.57390&  0.249& MDO 2.1m & 5496 & 1.30 & 3.65& +0.04 \\
          &        &  50737.54744&  0.456& MDO 2.1m & 5223 & 1.20 & 3.90& +0.08 \\
          &        &  50740.59629&  0.775& MDO 2.1m & 5906 & 1.80 & 4.80& +0.06 \\
          &        &  51057.70299&  0.967& MDO 2.1m & 5943 & 1.50 & 4.10& +0.05 \\
          &        &             &       &          &      &      &     &       \\
{S Nor}     & 9.7542 &  49116.83715&  0.550& CTIO 4m  & 5797 & 2.00 & 4.60& +0.06 \\
          &        &  49497.47640&  0.570& CTIO 4m  & 5677 & 1.90 & 5.80& +0.06 \\
          &        &             &       &          &      &      &     &       \\
{$\beta$ Dor}& 9.8424 &  51231.44353& 0.128& MSO 74in & 5618 & 1.60 & 4.30&--0.01 \\
          &        &             &       &          &      &      &     &       \\
{$\zeta$ Gem}&10.1507 &  50381.98995&  0.815& MDO 2.1m & 5740 & 1.70 & 4.50& +0.01 \\
          &        &  50736.98149&  0.787& MDO 2.1m & 5741 & 1.70 & 4.50& +0.03 \\
          &        &  50739.96631&  0.081& MDO 2.1m & 5593 & 1.40 & 3.50& +0.06 \\
          &        &             &       &          &      &      &     &       \\
{Z Lac}    &10.8856 &  51055.88242&  0.903& MDO 2.1m & 5899 & 1.70 & 4.30& +0.01 \\
          &        &  51056.86659&  0.993& MDO 2.1m & 6432 & 1.90 & 4.50&--0.03 \\
          &        &  51058.86037&  0.177& MDO 2.1m & 5722 & 1.50 & 3.80& +0.05 \\
          &        &  51093.78777&  0.385& MDO 2.1m & 5241 & 1.20 & 3.30& +0.02 \\
          &        &             &       &          &      &      &     &       \\
{VX Per}    &10.8890 &  50739.78515&  0.084& MDO 2.1m & 5515 & 1.40 & 3.80&--0.03 \\
          &        &  50740.81077&  0.178& MDO 2.1m & 5369 & 1.40 & 3.80&--0.03 \\
          &        &  51095.81172&  0.780& MDO 2.1m & 5989 & 1.70 & 4.20&--0.07 \\
          &        &  51096.77199&  0.868& MDO 2.1m & 6026 & 1.70 & 4.20&--0.05 \\
          &        &             &       &          &      &      &     &       \\
{V340 Nor}(s:)&11.2870& 49116.86597&  0.193& CTIO 4m  & 5595 & 1.75 & 4.50& +0.00 \\
          &        &             &       &          &      &      &     &       \\
\hline
\end{tabular}
\end{table*}

%Table 1  continued
\begin{table*}
{\bf Table 1 (continued)}\\
\tiny
\begin{tabular}{ccccccccc}
\hline
Star          & P, d   & JD, 24+     &$\phi$ & Telescope &T$_{\rm eff}$,\,K
&$\log g$&V$_{\rm t}$,\,km~s$^{-1}$&[Fe/H]\\
\hline
{RX Aur}    &11.6235 &  50736.91146&  0.171& MDO 2.1m & 5856 & 1.65 & 4.10&--0.03 \\
          &        &  50737.90348&  0.257& MDO 2.1m & 5677 & 1.45 & 3.70&--0.06 \\
          &        &  51093.93187&  0.885& MDO 2.1m & 6111 & 1.60 & 4.40&--0.08 \\
          &        &  51094.91699&  0.970& MDO 2.1m & 6312 & 1.70 & 4.30&--0.11 \\
{TT Aql}    &13.7547 &  51058.71730&  0.895& MDO 2.1m & 5630 & 1.65 & 5.10& +0.09 \\
          &        &  51093.61314&  0.432& MDO 2.1m & 5080 & 1.10 & 3.60& +0.12 \\
          &        &  51476.61856&  0.276& MDO 2.1m & 5335 & 1.15 & 3.60& +0.12 \\
          &        &             &       &          &      &      &     &       \\
{SV Mon}    &15.2328 &  50735.97014&  0.704& MDO 2.1m & 4916 & 1.05 & 4.70&--0.09 \\
          &        &  50737.92962&  0.832& MDO 2.1m & 5263 & 1.40 & 6.80&--0.06 \\
          &        &  50739.94097&  0.964& MDO 2.1m & 5482 & 1.40 & 4.90&--0.06 \\
          &        &  50741.93497&  0.095& MDO 2.1m & 6141 & 1.50 & 4.60&--0.03 \\
          &        &             &       &          &      &      &     &       \\
{X Cyg}    &16.3863 &  51056.80718&  0.020& MDO 2.1m & 6039 & 1.65 & 4.70& +0.12 \\
          &        &  51057.83565&  0.083& MDO 2.1m & 5741 & 1.5  & 4.20& +0.13 \\
          &        &             &       &          &      &      &     &       \\
{RW Cam}    &16.4148 &  50737.83335&  0.182& MDO 2.1m & 5368 & 1.15 & 3.60& +0.07 \\
          &        &  50738.83656&  0.243& MDO 2.1m & 5227 & 1.05 & 3.70& +0.01 \\
          &        &  50739.83773&  0.304& MDO 2.1m & 5108 & 0.95 & 3.40& +0.02 \\
          &        &  51095.85239&  0.993& MDO 2.1m & 5969 & 1.85 & 5.00& +0.03 \\
          &        &             &       &          &      &      &     &       \\
{CD Cyg}    &17.0740 &  50676.85264&  0.943& MDO 2.1m & 5484 & 1.45 & 5.20& +0.09 \\
          &        &  50677.84369&  0.001& MDO 2.1m & 6490 & 1.95 & 6.70& +0.01 \\
          &        &  50736.69273&  0.448& MDO 2.1m & 5108 & 1.10 & 4.00& +0.15 \\
          &        &             &       &          &      &      &     &       \\
{Y Oph} (s)&17.1269 &  50674.65908&  0.936& MDO 2.1m & 6013 & 1.75 & 5.60& +0.02 \\
          &        &  50736.55133&  0.551& MDO 2.1m & 5561 & 1.80 & 5.40& +0.05 \\
          &        &  50740.55568&  0.784& MDO 2.1m & 5709 & 1.90 & 5.80& +0.06 \\
          &        &  51054.66483&  0.128& MDO 2.1m & 6153 & 1.90 & 5.80& +0.07 \\
          &        &             &       &          &      &      &     &       \\
{SZ Aql}    &17.1408 &  50735.60696&  0.055& MDO 2.1m & 5568 & 1.20 & 4.30& +0.18 \\
          &        &  50737.65009&  0.174& MDO 2.1m & 5240 & 1.00 & 3.80& +0.13 \\
          &        &  51055.69289&  0.722& MDO 2.1m & 5454 & 1.45 & 6.00& +0.15 \\
          &        &  51057.71991&  0.840& MDO 2.1m & 6559 & 2.00 & 6.00& +0.13 \\
          &        &             &       &          &      &      &     &       \\
{YZ Aur}    &18.1932 &  44332.70000&  0.390& KPNO 4m  & 5175 & 1.65 & 4.70&--0.05 \\
          &        &             &       &          &      &      &     &       \\
{WZ Sgr}    &21.8498 &  50674.61198&  0.196& MDO 2.1m & 5350 & 1.20 & 4.30&  +0.21\\
          &        &  50677.72586&  0.339& MDO 2.1m & 5099 & 0.70 & 3.50&  +0.21\\
          &        &  50737.58366&  0.078& MDO 2.1m & 5786 & 1.10 & 4.70&  +0.15\\
          &        &             &       &          &      &      &     &       \\
{SW Vel}    &23.4410 &  49116.49905&  0.348& CTIO 4m  & 5010 & 1.00 & 4.40&  +0.01\\
          &        &             &       &          &      &      &     &       \\
{X Pup}    &25.9610 &  50383.94934&  0.308& MDO 2.1m & 5654 & 1.10 & 4.40& --0.00\\
          &        &  51095.95617&  0.734& MDO 2.1m & 4925 & 0.70 & 5.10& --0.08\\
          &        &  50562.60378&  0.190& MDO 2.1m & 6224 & 1.55 & 5.40& --0.06\\
          &        &             &       &          &      &      &     &       \\
{T Mon}    &27.0246 &  50379.88342&  0.113& MDO 2.1m & 5811 & 1.40 & 4.90&  +0.12\\
          &        &  50381.97924&  0.191& MDO 2.1m & 5468 & 1.10 & 4.30&  +0.15\\
          &        &  50382.91306&  0.225& MDO 2.1m & 5346 & 1.05 & 4.20&  +0.11\\
          &        &  50383.91603&  0.262& MDO 2.1m & 5238 & 1.00 & 3.90&  +0.12\\
          &        &             &       &          &      &      &     &       \\
{SV Vul}    &44.9948 &  48876.62947&  0.669& KPNO 4m  & 4880 & 1.00 & 5.00& --0.03\\
          &        &  48878.76771&  0.717& KPNO 4m  & 4883 & 1.00 & 5.00& --0.04\\
          &        &  49981.67704&  0.237& KPNO 4m  & 5314 & 0.70 & 4.90&  +0.05\\
          &        &  49982.71400&  0.260& KPNO 4m  & 5274 & 0.70 & 4.70&  +0.04\\
          &        &  49983.66534&  0.282& KPNO 4m  & 5209 & 0.70 & 4.70&  +0.02\\
          &        &  49984.66494&  0.304& KPNO 4m  & 5188 & 0.60 & 4.60&  +0.02\\
          &        &  49985.69595&  0.327& KPNO 4m  & 5155 & 0.50 & 4.50& --0.01\\
          &        &  49986.66211&  0.348& KPNO 4m  & 5120 & 0.50 & 4.50&  +0.01\\
          &        &  50379.58714&  0.085& MDO 2.1m & 5805 & 1.20 & 5.80&  +0.08\\
          &        &  50381.55138&  0.129& MDO 2.1m & 5611 & 0.95 & 5.30&  +0.06\\
          &        &  50382.56326&  0.151& MDO 2.1m & 5548 & 0.95 & 5.10&  +0.07\\
          &        &  50383.57136&  0.174& MDO 2.1m & 5432 & 0.80 & 5.00&  +0.02\\
          &        &  50672.75472&  0.604& MDO 2.1m & 4896 & 1.00 & 5.00& --0.03\\
          &        &  50674.77562&  0.649& MDO 2.1m & 4876 & 1.00 & 5.00& --0.02\\
          &        &  50675.75208&  0.671& MDO 2.1m & 4873 & 1.00 & 5.00& --0.03\\
          &        &  50677.79466&  0.716& MDO 2.1m & 4861 & 1.00 & 5.00& --0.04\\
          &        &  50738.69196&  0.070& MDO 2.1m & 5856 & 1.20 & 5.90&  +0.10\\
          &        &  51058.75536&  0.188& MDO 2.1m & 5398 & 0.80 & 5.00&  +0.07\\
          &        &  51094.73986&  0.988& MDO 2.1m & 6110 & 1.60 & 6.80&  +0.04\\
          &        &  51096.69223&  0.031& MDO 2.1m & 5977 & 1.40 & 6.20&  +0.09\\
          &        &  51098.76320&  0.077& MDO 2.1m & 5755 & 1.05 & 5.60&  +0.08\\
          &        &  51473.62697&  0.414& MDO 2.1m & 5005 & 0.50 & 4.80& --0.02\\
          &        &  51473.64877&  0.414& MDO 2.1m & 4995 & 0.50 & 4.80&  +0.00\\
          &        &             &       &          &      &      &     &       \\
{S Vul}    &68.4640 &  51055.75037&  0.908& MDO 2.1m & 5881 & 1.10 & 8.70&  +0.02\\
          &        &  51058.73003&  0.951& MDO 2.1m & 5950 & 1.00 & 8.00& --0.05\\
          &        &  51095.66963&  0.491& MDO 2.1m & 5166 & 0.50 & 6.60& --0.05\\
\hline
\end{tabular}
\end{table*}
%Table 2
\begin{table*}
\caption[]{Averaged relative-to-solar elemental abundance for program
Cepheids}
\tiny
\begin{tabular}{lrrrrrrrrrrrrr}
\hline
  Star        &   C  &   O  &  Na  &  Mg  &  Al  &  Si  &   S  &  Ca  &  Sc  &  Ti  &   V  &   Cr &    Mn \\
\hline
 V473 Lyr  (s)&--0.34&--0.24&  0.01&--0.14&--0.06&--0.03&  0.09&--0.10&--0.05&--0.06&--0.04&--0.08&--0.22\\
 SU Cas    (s)&--0.24&--0.02&  0.20&--0.24&  0.05&  0.07&  0.11&--0.01&--0.13&  0.13&  0.08&  0.12&  0.07\\
 EU Tau    (s)&--0.24&--0.05&  0.24&--0.28&--0.01&  0.04&  0.09&--0.05&--0.07&  0.03&--0.05&--0.02&--0.05\\
 IR Cep    (s)&--0.04&    --&  0.28&--0.39&  0.12&  0.17&  0.34&--0.06&--0.03&  0.09&  0.26&--0.12&--0.02\\
 TU Cas       &--0.19&--0.03&  0.15&--0.19&  0.14&  0.10&--0.03&--0.02&--0.19&  0.05&  0.02&  0.02&  0.06\\
 DT Cyg    (s)&--0.12&  0.01&  0.33&  0.04&  0.17&  0.12&  0.15&  0.05&--0.01&  0.21&  0.14&  0.18&  0.19\\
 V526 Mon  (s)&--0.28&--0.52&  0.11&--0.09&    --&--0.01&  0.05&--0.08&--0.20&--0.04&--0.18&--0.02&--0.14\\
 V351 Cep  (s)&--0.19&--0.09&  0.17&--0.30&--0.03&  0.07&  0.26&--0.10&  0.01&  0.08&  0.08&  0.03&--0.03\\
 VX Pup       &    --&    --&  0.08&    --&    --&--0.06&    --&--0.33&--0.13&--0.01&--0.02&--0.16&--0.10\\
 SZ Tau    (s)&--0.20&--0.02&  0.25&    --&  0.14&  0.07&  0.19&  0.02&  0.02&  0.06&  0.10&  0.18&  0.09\\
 V1334 Cyg (s)&--0.30&--0.23&  0.18&--0.31&  0.15&  0.08&  0.11&--0.03&--0.01&  0.02&--0.01&--0.03&  0.03\\
 BG Cru    (s)&--0.18&  0.08&  0.24&    --&  0.29&  0.07&    --&--0.01&--0.33&  0.13&  0.15&--0.04&--0.01\\
 BD Cas    (s)&--0.14&--0.09&--0.03&--0.26&--0.09&  0.03&  0.26&--0.19&--0.23&--0.06&--0.06&--0.14&--0.13\\
 RT Aur       &--0.22&--0.01&  0.29&--0.14&  0.13&  0.12&  0.19&  0.09&  0.05&  0.10&  0.05&  0.08&  0.11\\
 DF Cas       &--0.30&    --&  0.16&--0.33&    --&  0.03&  0.39&--0.18&--0.09&  0.00&--0.01&  0.11&--0.12\\
 SU Cyg       &--0.21&--0.25&  0.23&--0.16&  0.17&  0.04&  0.02&  0.01&--0.11&  0.01&  0.06&  0.02&  0.02\\
 ST Tau       &--0.27&--0.29&  0.23&--0.18&  0.03&  0.03&  0.04&--0.04&--0.11&  0.10&--0.07&--0.04&--0.02\\
 V1726 Cyg (s)&--0.22&    --&  0.29&--0.12&  0.07&  0.11&  0.17&--0.16&--0.05&  0.15&    --&--0.07&  0.00\\
 BQ Ser       &--0.15&--0.13&  0.12&--0.14&  0.14&  0.07&  0.13&--0.05&--0.17&  0.03&--0.01&  0.04&--0.04\\
 Y Lac        &--0.26&--0.37&  0.13&--0.24&  0.13&  0.03&--0.04&--0.05&--0.26&--0.03&  0.02&--0.07&--0.09\\
 T Vul        &--0.26&  0.00&  0.13&--0.31&  0.12&  0.04&  0.12&  0.03&--0.19&  0.00&  0.00&  0.10&  0.01\\
 FF Aql    (s)&--0.31&--0.23&  0.25&--0.24&  0.12&    --&  0.01&--0.03&--0.11&  0.09&  0.14&  0.06&  0.04\\
 CF Cas       &--0.19&  0.06&  0.09&--0.21&  0.10&  0.01&  0.10&--0.01&--0.04&--0.00&--0.06&  0.06&--0.01\\
 BG Lac       &--0.17&  0.10&  0.17&--0.25&  0.08&  0.04&  0.09&--0.01&--0.11&  0.03&--0.05&  0.06&  0.04\\
 Del Cep      &--0.17&  0.01&  0.20&--0.16&  0.16&  0.10&  0.15&  0.01&  0.01&  0.04&  0.09&  0.06&  0.17\\
 V1162 Aql (s)&--0.14&--0.19&  0.13&--0.19&  0.13&  0.06&    --&--0.03&--0.21&--0.03&--0.02&  0.02&--0.01\\
 CV Mon       &--0.25&  0.02&  0.03&--0.32&--0.05&  0.01&  0.08&--0.19&--0.14&  0.10&  0.30&  0.04&--0.05\\
 V Cen        &--0.17&  0.02&  0.01&    --&  0.11&  0.03&  0.14&--0.03&  0.00&  0.09&  0.03&--0.04&--0.11\\
 V924 Cyg (s:)&--0.30&    --&--0.04&--0.38&  0.09&--0.04&  0.05&--0.21&--0.37&--0.21&  0.01&--0.09&  0.10\\
 MY Pup    (s)&--0.36&--0.12&  0.14&--0.36&  0.03&--0.08&--0.14&--0.13&--0.17&--0.09&--0.09&--0.18&--0.24\\
 Y Sgr        &--0.14&--0.06&  0.22&--0.03&  0.27&  0.12&  0.17&  0.04&--0.24&  0.01&  0.07&  0.17&  0.11\\
 EW Sct       &--0.07&--0.04&  0.07&--0.10&  0.15&  0.08&  0.15&--0.01&--0.09&  0.09&  0.08&  0.05&  0.08\\
 FM Aql       &--0.24&--0.19&  0.32&  0.00&  0.33&  0.17&  0.24&  0.17&--0.17&  0.15&  0.10&  0.19&  0.11\\
 TX  Del      &  0.06&  0.16&  0.48&--0.22&    --&    --&    --&  0.16&    --&  0.17&  0.15&    --&  0.38\\
 V367 Sct     &--0.38&    --&  0.21&--0.48&  0.21&  0.05&  0.15&--0.15&  0.07&  0.24&  0.06&--0.05&--0.13\\
 X Vul        &--0.16&  0.03&  0.18&--0.20&  0.17&  0.08&  0.20&--0.04&--0.09&  0.08&  0.04&  0.12&  0.08\\
 AW Per       &--0.23&--0.03&  0.24&--0.27&  0.07&  0.06&  0.18&--0.03&--0.15&  0.01&  0.15&  0.27&  0.10\\
 U Sgr        &--0.16&  0.03&  0.20&--0.17&  0.22&  0.07&  0.15&  0.03&--0.16&  0.06&  0.03&  0.10&  0.06\\
 V496 Aql  (s)&--0.20&--0.15&  0.24&--0.12&  0.10&  0.11&  0.13&--0.03&  0.10&  0.06&  0.06&  0.09&  0.05\\
 Eta Aql      &--0.20&--0.10&  0.19&--0.19&  0.23&  0.12&  0.08&--0.02&--0.18&  0.03&  0.02&  0.22&  0.12\\
 BB Her       &--0.10&  0.04&  0.40&--0.01&  0.23&  0.15&    --&--0.01&  0.07&  0.09&  0.07&  0.10&  0.30\\
 RS Ori       &--0.45&--0.18&  0.06&--0.30&  0.02&  0.02&  0.00&--0.06&--0.19&  0.11&--0.12&--0.09&--0.11\\
 V440 Per  (s)&--0.34&--0.21&  0.05&--0.33&  0.06&  0.00&--0.06&--0.16&--0.14&  0.05&  0.00&--0.06&--0.04\\
 W Sgr        &--0.25&  0.02&  0.18&--0.25&--0.01&  0.04&  0.11&--0.01&--0.12&  0.03&  0.03&  0.03&  0.03\\
 RX Cam       &--0.25&--0.11&  0.18&--0.23&  0.06&  0.05&  0.04&--0.05&  0.04&  0.10&  0.03&  0.08&  0.02\\
 W Gem        &--0.27&--0.12&  0.18&--0.28&  0.10&  0.03&  0.05&--0.08&  0.05&  0.09&  0.00&--0.02&--0.02\\
 U Vul        &--0.18&--0.03&  0.18&--0.16&  0.12&  0.09&  0.17&--0.05&--0.28&  0.05&  0.02&  0.10&  0.01\\
 DL Cas       &--0.31&--0.01&  0.11&  0.11&  0.14&  0.02&  0.21&  0.01&--0.16&  0.03&--0.04&  0.10&  0.07\\
 AC Mon       &--0.42&    --&  0.24&--0.40&    --&--0.02&--0.15&--0.10&--0.07&  0.12&    --&--0.08&--0.19\\
 V636 Cas  (s)&--0.17&--0.09&  0.29&--0.07&  0.09&  0.08&  0.12&  0.15&  0.25&  0.05&  0.05&  0.30&  0.10\\
 S Sge        &--0.12&  0.04&  0.24&--0.22&  0.14&  0.16&  0.17&  0.03&  0.27&  0.12&  0.17&  0.22&  0.19\\
 GQ Ori       &--0.37&--0.12&  0.17&  0.11&  0.04&  0.00&  0.04&--0.25&    --&  0.06&  0.04&  0.01&--0.14\\
 V500 Sco     &--0.20&--0.13&  0.13&--0.23&  0.08&  0.02&  0.06&--0.09&--0.13&--0.06&--0.10&--0.07&--0.03\\
 FN Aql       &--1.31&--0.08&  0.19&--0.21&  0.10&  0.00&--0.02&--0.07&--0.07&  0.04&  0.01&--0.04&--0.12\\
 YZ Sgr       &--0.07&--0.07&  0.31&--0.22&  0.18&  0.12&  0.18&  0.00&    --&  0.03&  0.03&  0.09&  0.07\\
 S Nor        &--0.23&--0.19&  0.27&--0.24&  0.16&  0.05&  0.10&--0.03&  0.01&  0.05&  0.02&--0.08&--0.10\\
 Beta Dor     &--0.31&--0.08&  0.07&--0.30&  0.07&  0.00&--0.04&--0.18&--0.11&  0.01&--0.05&--0.04&  0.03\\
 Zeta Gem     &--0.24&--0.12&  0.25&--0.15&  0.07&  0.04&  0.03&--0.06&  0.13&  0.06&  0.02&  0.00&  0.05\\
 Z Lac        &--0.32&--0.10&  0.23&--0.23&  0.07&  0.05&  0.14&  0.04&--0.18&  0.07&--0.02&  0.05&  0.05\\
 VX Per       &--0.25&--0.15&  0.15&--0.31&  0.03&  0.00&  0.04&--0.12&--0.05&--0.03&--0.11&--0.06&--0.09\\
 V340  Nor(s:)&--0.08&  0.07&  0.29&--0.30&  0.00&  0.03&  0.18&--0.16&--0.12&  0.00&--0.07&  0.01&--0.03\\
 RX Aur       &--0.29&--0.02&  0.18&--0.20&  0.04&  0.05&--0.01&--0.09&--0.31&  0.05&--0.07&  0.04&  0.08\\
 TT Aql       &--0.09&  0.13&  0.28&--0.19&  0.20&  0.11&  0.33&  0.08&  0.12&  0.04&--0.01&  0.09&  0.14\\
 SV Mon       &--0.84&--0.28&  0.28&--0.16&  0.10&  0.00&--0.10&--0.09&--0.30&--0.06&--0.16&--0.07&--0.16\\
 X Cyg        &--0.29&  0.05&  0.26&--0.09&  0.18&  0.13&  0.13&  0.04&    --&  0.21&  0.11&  0.23&  0.11\\
 RW Cam       &--0.14&--0.05&  0.19&--0.23&  0.12&  0.07&  0.18&  0.02&  0.12&  0.04&--0.02&  0.06&  0.05\\
 CD Cyg       &--0.18&--0.11&  0.23&--0.37&  0.19&  0.09&  0.28&  0.08&  0.03&  0.08&  0.06&  0.05&  0.10\\
 Y Oph     (s)&--0.14&--0.01&  0.12&--0.31&  0.14&  0.03&  0.15&--0.15&  0.33&  0.06&  0.05&  0.03&  0.04\\
 SZ Aql       &--0.01&--0.04&  0.28&--0.12&  0.28&  0.17&  0.24&  0.14&  0.11&  0.14&  0.12&  0.19&  0.20\\
 WZ Sgr       &  0.03&  0.13&  0.39&  0.01&  0.28&  0.28&  0.51&  0.19&  0.12&  0.23&  0.17&  0.19&  0.15\\
 SW Vel       &--0.13&  0.18&  0.17&  0.16&  0.04&--0.03&  0.17&--0.16&  0.08&--0.06&--0.14&  0.14&--0.12\\
 X Pup        &--0.29&--0.11&  0.18&    --&  0.10&--0.05&  0.02&  0.06&--0.18&--0.08&--0.16&--0.07&  0.07\\
 T Mon        &--0.27&  0.08&  0.35&    --&  0.10&  0.13&    --&  0.09&    --&  0.06&  0.03&  0.27&  0.14\\
 SV Vul       &  0.02&--0.01&  0.04&--0.10&  0.13&  0.06&  0.16&--0.04&    --&  0.02&--0.08&  0.02&--0.02\\
 S Vul        &--0.34&--0.40&  0.21&    --&  0.22&--0.03&  0.22&--0.04&    --&  0.03&  0.04&  0.10&--0.06\\
\hline
\end{tabular}
\end{table*}

%Table 2
\begin{table*}
{\bf Table 2 (continued)} \\
\tiny
\begin{tabular}{lrrrrrrrrrrrr}
\hline
  Star        &   Fe &   Co &   Ni &   Cu &   Zn &    Y &   Zr &   La &   Ce &   Nd &   Eu &   Gd \\
\hline
 V473 Lyr  (s)&--0.06&--0.13&--0.11&--0.10&  0.12&  0.10&  0.02&  0.20&  0.11&  0.03&--0.02&  0.00\\
 SU Cas    (s)&--0.01&--0.19&  0.00&  0.34&  0.18&  0.19&  0.02&  0.21&--0.04&  0.12&  0.02&--0.20\\
 EU Tau    (s)&--0.06&--0.02&--0.08&  0.21&    --&  0.07&--0.08&  0.16&--0.18&--0.02&  0.01&  0.18\\
 IR Cep    (s)&--0.01&--0.20&--0.07&--0.47&    --&  0.03&  0.16&    --&  0.05&--0.11&    --&    --\\
 TU Cas       &  0.03&--0.08&--0.04&  0.15&  0.46&  0.17&  0.01&  0.24&--0.05&  0.08&  0.11&  0.17\\
 DT Cyg    (s)&  0.11&  0.23&  0.14&  0.42&  0.20&  0.46&--0.06&  0.21&  0.01&  0.25&  0.20&  0.33\\
 V526 Mon  (s)&--0.13&  0.04&--0.07&    --&    --&    --&--0.11&  0.41&    --&  0.25&  0.16&    --\\
 V351 Cep  (s)&  0.03&--0.01&  0.00&--0.05&  0.14&  0.19&--0.01&  0.26&--0.10&  0.12&    --&  0.16\\
 VX Pup       &--0.13&    --&--0.18&  0.25&    --&  0.10&    --&    --&    --&  0.35&--0.15&    --\\
 SZ Tau    (s)&  0.08&--0.01&  0.02&    --&  0.39&  0.17&--0.03&  0.31&  0.06&  0.23&  0.15&    --\\
 V1334 Cyg (s)&--0.04&--0.29&--0.10&  0.39&    --&  0.18&--0.15&  0.21&--0.17&  0.13&  0.13&    --\\
 BG Cru    (s)&--0.02&--0.06&--0.16&--0.68&    --&--0.04&--0.04&    --&  0.28&--0.14&  0.25&    --\\
 BD Cas    (s)&--0.07&  0.09&--0.26&--0.14&    --&  0.01&  0.13&  0.41&  0.19&--0.25&    --&  0.30\\
 RT Aur       &  0.06&--0.09&  0.05&  0.15&  0.24&  0.24&--0.04&  0.14&--0.17&  0.07&  0.01&  0.01\\
 DF Cas       &  0.13&--0.30&  0.04&--0.43&    --&  0.06&  0.22&    --&  0.07&  0.38&  0.28&    --\\
 SU Cyg       &--0.00&--0.01&--0.11&  0.15&    --&  0.16&  0.01&  0.27&--0.19&  0.08&  0.06&  0.10\\
 ST Tau       &--0.05&--0.33&--0.04&  0.19&  0.02&  0.18&--0.13&  0.17&--0.10&  0.14&  0.04&  0.13\\
 V1726 Cyg (s)&--0.02&    --&--0.15&    --&    --&  0.14&    --&    --&    --&  0.24&  0.31&    --\\
 BQ Ser       &--0.04&--0.17&--0.07&  0.08&  0.35&  0.13&--0.10&  0.13&--0.09&  0.22&  0.07&  0.20\\
 Y Lac        &--0.09&    --&--0.15&  0.18&    --&  0.12&--0.24&  0.11&--0.35&  0.16&  0.00&    --\\
 T Vul        &  0.01&  0.01&--0.02&  0.25&  0.30&  0.13&--0.02&  0.20&--0.03&  0.14&  0.08&--0.12\\
 FF Aql    (s)&  0.02&--0.13&  0.01&  0.45&    --&  0.31&--0.11&  0.25&--0.13&  0.08&  0.17&  0.22\\
 CF Cas       &--0.01&--0.15&--0.03&--0.11&  0.25&  0.11&--0.19&  0.14&--0.17&  0.04&  0.06&--0.02\\
 BG Lac       &--0.01&--0.13&--0.03&  0.10&  0.28&  0.14&--0.12&  0.07&--0.17&  0.05&  0.02&  0.18\\
 Del Cep      &  0.06&--0.02&  0.01&  0.55&  0.36&  0.27&--0.14&  0.25&--0.08&  0.17&  0.02&    --\\
 V1162 Aql (s)&  0.01&--0.15&--0.02&  0.28&  0.14&  0.21&--0.21&  0.09&--0.24&  0.02&--0.06&--0.23\\
 CV Mon       &--0.03&    --&--0.08&--0.05&    --&  0.01&  0.00&  0.19&--0.03&  0.29&  0.13&    --\\
 V Cen        &  0.04&--0.21&  0.11&  0.16&  0.37&  0.35&  0.18&  0.26&  0.02&  0.28&  0.20&    --\\
 V924 Cyg (s:)&--0.09&    --&--0.14&  0.12&    --&--0.18&    --&    --&    --&  0.04&    --&    --\\
 MY Pup    (s)&--0.12&--0.10&--0.04&--0.25&--0.09&--0.03&--0.16&  0.17&--0.10&--0.07&--0.04&   -- \\
 Y Sgr        &  0.06&--0.07&  0.03&    --&  0.38&  0.31&--0.08&  0.13&--0.15&  0.10&--0.03&  0.00\\
 EW Sct       &  0.04&--0.10&--0.01&  0.11&  0.34&  0.22&--0.12&  0.29&--0.07&  0.17&  0.06&    --\\
 FM Aql       &  0.08&  0.02&  0.09&  0.26&    --&  0.16&--0.01&  0.23&--0.17&  0.14&  0.09&    --\\
 TX  Del      &  0.24&    --&  0.17&    --&    --&  0.07&    --&  0.13&--0.34&--0.38&    --&    --\\
 V367 Sct     &--0.01&  0.03&--0.01&--0.02&    --&--0.06&--0.15&  0.45&    --&  0.18&  0.36&    --\\
 X Vul        &  0.08&--0.11&  0.07&  0.07&  0.35&  0.23&--0.11&  0.15&--0.15&  0.10&  0.03&  0.04\\
 AW Per       &  0.01&--0.01&  0.04&  0.57&  0.51&  0.11&--0.02&  0.25&--0.11&  0.10&  0.11&--0.12\\
 U Sgr        &  0.04&--0.12&  0.01&  0.02&  0.24&  0.22&--0.11&  0.14&--0.12&  0.05&  0.01&--0.03\\
 V496 Aql  (s)&  0.05&--0.09&  0.03&    --&  0.33&  0.14&--0.10&  0.09&--0.23&  0.02&--0.01&--0.09\\
 Eta Aql      &  0.05&--0.27&  0.04&  0.28&  0.14&  0.23&--0.14&  0.26&--0.19&  0.10&  0.04&--0.05\\
 BB Her       &  0.15&--0.04&  0.15&  0.19&  0.39&  0.32&  0.00&  0.11&--0.17&  0.02&  0.08&    --\\
 RS Ori       &--0.10&--0.01&--0.13&  0.12&  0.21&  0.16&--0.12&  0.18&--0.20&  0.04&  0.00&  0.07\\
 V440 Per  (s)&--0.05&--0.13&--0.05&  0.16&  0.06&  0.26&--0.13&  0.30&--0.10&  0.14&  0.14&  0.12\\
 W Sgr        &--0.01&--0.08&--0.04&  0.21&  0.22&  0.20&--0.11&  0.23&--0.07&  0.06&--0.01&  0.11\\
 RX Cam       &  0.03&--0.14&  0.03&  0.20&  0.14&  0.23&--0.06&  0.27&--0.17&  0.10&  0.09&  0.15\\
 W Gem        &--0.04&--0.21&--0.07&  0.11&  0.16&  0.23&--0.09&  0.28&--0.10&  0.15&  0.10&  0.07\\
 U Vul        &  0.05&--0.09&  0.05&  0.13&  0.31&  0.21&--0.10&  0.13&--0.06&  0.13&  0.02&  0.02\\
 DL Cas       &--0.01&--0.04&  0.00&--0.19&  0.47&  0.21&  0.16&  0.12&  0.09&  0.12&  0.11&--0.05\\
 AC Mon       &--0.07&    --&--0.11&--0.61&    --&  0.05&    --&  0.39&    --&  0.35&  0.28&    --\\
 V636 Cas  (s)&  0.06&--0.09&  0.09&--0.07&  0.30&  0.18&--0.11&  0.16&--0.11&  0.12&  0.02&  0.06\\
 S Sge        &  0.10&  0.00&  0.12&  0.26&  0.39&  0.28&  0.02&  0.29&--0.09&  0.13&  0.15&  0.02\\
 GQ Ori       &--0.03&--0.01&--0.15&    --&    --&  0.29&    --&  0.25&    --&--0.16&  0.09&    --\\
 V500 Sco     &--0.02&--0.18&--0.06&--0.02&  0.21&  0.19&--0.19&  0.18&--0.10&  0.08&  0.03&--0.24\\
 FN Aql       &--0.02&--0.14&--0.05&  0.09&  0.15&  0.16&--0.07&  0.23&--0.09&  0.12&  0.08&  0.12\\
 YZ Sgr       &  0.05&--0.06&  0.03&  0.11&  0.22&  0.35&--0.09&  0.14&--0.10&  0.01&  0.02&--0.01\\
 S Nor        &  0.05&--0.10&--0.07&--0.17&    --&  0.11&  0.14&  0.35&--0.10&  0.00&  0.02&    --\\
 Beta Dor     &--0.01&--0.19&--0.04&--0.45&  0.14&  0.02&  0.03&  0.18&  0.05&--0.05&  0.04&  0.20\\
 Zeta Gem     &  0.04&--0.10&  0.02&  0.03&  0.17&  0.19&--0.07&  0.21&--0.13&  0.08&  0.06&--0.06\\
 Z Lac        &  0.01&--0.13&--0.02&  0.14&  0.25&  0.20&--0.07&  0.26&--0.04&  0.12&  0.06&  0.09\\
 VX Per       &--0.05&--0.20&--0.10&  0.05&  0.18&  0.16&--0.12&  0.21&--0.13&  0.08&  0.03&  0.00\\
 V340  Nor(s:)&  0.00&--0.13&  0.01&--0.06&    --&  0.07&    --&  0.13&--0.25&--0.11&--0.06&  0.12\\
 RX Aur       &--0.07&--0.15&--0.07&  0.28&  0.30&  0.09&--0.11&  0.28&--0.21&  0.08&  0.10&  0.12\\
 TT Aql       &  0.11&--0.07&  0.08&  0.05&  0.41&  0.28&--0.06&  0.20&--0.09&  0.14&  0.05&  0.01\\
 SV Mon       &--0.03&--0.28&--0.12&--0.07&  0.16&  0.26&--0.08&  0.25&--0.14&  0.13&  0.03&    --\\
 X Cyg        &  0.12&  0.06&  0.09&  0.24&  0.35&  0.33&--0.03&  0.29&  0.02&  0.15&  0.14&  0.14\\
 RW Cam       &  0.04&--0.08&  0.05&--0.08&  0.45&  0.17&--0.04&  0.25&--0.11&  0.10&  0.06&  0.02\\
 CD Cyg       &  0.07&--0.03&  0.05&  0.01&  0.32&  0.31&--0.10&  0.23&--0.07&  0.17&  0.08&  0.10\\
 Y Oph     (s)&  0.05&--0.05&  0.03&  0.07&  0.14&  0.33&--0.04&  0.28&--0.07&  0.21&  0.13&  0.08\\
 SZ Aql       &  0.15&--0.02&  0.03&  0.05&  0.42&    --&  0.04&  0.21&--0.12&  0.15&  0.12&  0.12\\
 WZ Sgr       &  0.17&  0.12&  0.21&  0.13&  0.35&  0.30&--0.08&  0.24&--0.08&  0.18&  0.15&  0.08\\
 SW Vel       &  0.01&--0.25&--0.06&--0.41&  0.30&  0.21&    --&  0.23&  0.00&  0.22&  0.16&  0.10\\
 X Pup        &--0.03&--0.25&--0.08&--0.13&  0.26&  0.14&  0.01&  0.27&--0.09&  0.22&  0.09&--0.04\\
 T Mon        &  0.13&--0.03&  0.05&    --&  0.34&    --&  0.04&  0.30&  0.02&  0.22&  0.15&    --\\
 SV Vul       &  0.03&--0.13&  0.00&--0.16&  0.22&  0.26&--0.08&  0.20&--0.13&  0.05&  0.04&  0.03\\
 S Vul        &--0.02&--0.22&  0.02&  0.03&    --&  0.22&--0.06&  0.18&--0.25&  0.15&  0.02&--0.01\\
\hline
\end{tabular}
\end{table*}
\end{document}
