\documentstyle[11pt]{laa}
%\documentstyle[referee]{laa}
\begin{document}
\thesaurus{ }
%Chris's macros
\def\etal{{\it et al.}}
\def\lae{\mathrel{<\kern-1.0em\lower0.9ex\hbox{$\sim$}}}
\def\gae{\mathrel{>\kern-1.0em\lower0.9ex\hbox{$\sim$}}}
\setcounter{table}{3}
\begin{table}
\caption{Flux densities for the complete sample, see Table 5 for notes and references}
\begin{flushleft}
\begin{tabular}{ccrrc}
\hline
\noalign{\smallskip}
\noalign{\smallskip}
source&$\nu_{GHz}$  &S$_{Jy}$&err.&ref.\\
\noalign{\smallskip}
\hline\noalign{\smallskip}
        $0019-000$ & 0.325 & 2.37 & .24  & 4 \\     
         &0.365  &2.87  &0.04  &31\\
         &0.408  &2.99  &0.14  &8\\
         &0.606  &3.44  &0.20  & 9 \\              
         &0.750  &3.34  &0.16  & 9 \\       
         &1.380  &2.88  &0.06  & 1 \\          
         &1.640  &2.59  &0.06  & 1 \\        
         &4.860  &1.10  &0.02  & 1 \\         
        &22.460  &0.175  &.018 & 1 \\        
\noalign{\smallskip}
\hline
\noalign{\smallskip}
        $0108+38$  
        &0.325	&0.065 &.003& 11\\ 
        &0.608 &0.075 &.002& 10 \\
        &1.380 &0.427 &.01  & 2\\
        &1.630 &0.572 &.02  & 2\\
&2.3 &0.837 &0.03 & 6\\
        &2.695 &1.00 & 0.02  & 9\\
&3.9& 1.26& 0.04&  6\\
        &4.816 &1.30 &0.04   &2\\
        &4.866 &1.29 &0.04   &2\\
&7.7 &0.96 &0.03  &6\\
        &8.434 &0.938 &0.03  & 2\\
        &8.484 &0.933 &0.03   &2\\
&11.2& 0.66& 0.02& 6\\
        &22.460 &0.384 &0.03  & 2\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
        $0237-233$ 
        &0.365&   2.96& 0.06 & 7  \\ 
        &0.408&   3.67 & 0.11  & 8  \\      
        &0.468&   4.76 & 0.12  & 9  \\   
        &0.635&   6.20 & 0.25  & 9  \\     
        &0.960&   7.02 & 0.20  & 9  \\       
        &1.380&  6.19  &0.12  & 1  \\        
        &1.640&  5.91  &0.12  & 1 \\         
        &4.860&  3.34  &0.07  & 1 \\             
        &8.870&  2.36  &0.08  & 9 \\
        &22.460&  1.09 & 0.10 &  1\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
        $0248+430$
        &0.302& 0.452 &0.015  &3\\
        &0.333& 0.481 &0.015  &3\\
        &1.335& 0.804 &0.03   &3\\
        &1.665& 0.922 &0.03   &3 \\
        &4.535& 1.244 &0.04   &3\\
        &4.985& 1.241 &0.04   &3\\
        &8.085& 1.13  &0.03   &3\\
        &8.465& 1.09  &0.03   &3\\
        &43.0 & 0.385 &0.01  &14 \\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
       $0316+161$ 
        &0.318 & 6.80 &  0.30  &9\\        
        &0.365 & 7.55&   0.11 &7\\
        &0.408 & 8.06 &  0.25  &8  \\            
        &0.468 & 8.91 &  0.22  &9    \\        
        &0.635 & 9.64 &  0.24  &9 \\                 
        &0.750 & 9.54 &  0.24  &9 \\          
        &0.96 & 9.40 &  0.30   &6 \\       
        &1.380	&7.83  & 0.20   &2\\
        &1.630	&7.24  & 0.20   &2  \\
        &2.3    &5.34  & 0.20  &6\\
        &3.9    &3.61  & 0.03  &6\\
        &4.815	&2.96	&0.10  &2\\
        &4.865	&2.91& 0.10 & 2\\
        &7.7    &1.79& 0.08 & 6\\
        &8.435	&1.70& 0.07 &2 \\
        &8.485	&1.69& 0.07 &2  \\
        &11.2   &1.16& 0.03 &6  \\
        &22.460 &0.570&  0.030&  2\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
\end{tabular}
\end{flushleft}
\end{table}
\addtocounter{table}{-1}

\begin{table}
\caption{continued}
\begin{flushleft}
\begin{tabular}{ccrrc}
\hline
\noalign{\smallskip}
\noalign{\smallskip}
source&$\nu_{GHz}$  &S$_{Jy}$&err.&ref.\\
\noalign{\smallskip}
\hline\noalign{\smallskip}
        $0428+205$ 
        &0.325 &2.63  &0.08  &4\\
        &0.408 &2.92  &0.15  &5\\
        &0.635 &3.96  &0.27  &9\\
        &0.968 &4.07  &0.13  &9\\
        &1.380 &3.70  &0.10  &2\\
        &1.630 &3.62  &0.10  &2\\
        &4.815 &2.32  &0.07  &2\\
        &4.865 &2.30  &0.07  &2\\
        &8.435 &1.71  &0.05  &2\\   
        &8.485 &1.71  &0.05  &2\\   
        &22.460 &0.96 & 0.05  &2\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
$0457+024$ 
        & 0.333	 &0.16   &0.02 &  3\\
        & 0.408  &0.33   &0.01 &  5\\         
        & 0.96  &1.40   &0.06&  6\\
        & 1.335  &1.74  &0.06 & 3  \\     
        & 1.665  &1.84  &0.06 & 3  \\      
        & 2.3  &1.97   &0.06 & 6 \\
        & 4.535  &1.65  &0.05 & 3  \\       
        &  4.985 & 1.57 & 0.05&  3 \\             
        & 8.085  &1.19  &0.04  &3\\
        & 8.465  &1.15  &0.04  &3\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
 $0500+019$ 
&0.325 &0.471& .025&  4\\
          &0.365& 0.628& 0.029& 7\\
          &0.606& 1.31&  0.09 & 9\\
          &0.96 & 1.81&   0.10 & 6\\
          &1.380& 2.23&  0.07 & 1\\
          &1.640& 2.31&  0.07 & 1\\
          &2.3  & 2.26&  0.08 & 6\\
          &3.9  & 2.15&  0.03 & 6\\
          &4.860& 1.89&  0.06 & 1\\
          &8.870& 1.35&  0.05 & 9\\
          &11.2 & 1.23&  0.03 & 6\\
          &43.0   & 0.33&  .02 & 14\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
$0710+439$ 
        &  0.325&  0.56&  0.03&  4\\      
        & 0.365&  0.655&  0.019& 7 \\  
        & 0.408&  0.75 &  0.04 & 15\\        
        & 0.608&  1.27 &  0.06 & 4 \\         
        & 1.380&  1.94 & 0.06  &2  \\        
        & 1.630&  1.95 & 0.06  &2  \\          
        & 4.816&  1.68 & 0.05  &2  \\        
        & 4.866&  1.67 & 0.05  &2  \\        
        & 8.434&  1.28 & 0.04  &2  \\             
        & 8.484&  1.28 & 0.04  &2  \\               
        & 22.460&  0.66&   0.03&  2 \\ 
\noalign{\smallskip}
\hline
\noalign{\smallskip}
 $0738+313$ 
          &0.302& 0.64  &0.04&  3\\
          &0.333& 0.73  &0.04&  3\\
          &0.608& 1.15   &0.04&  4\\
          &1.335& 1.93   &0.06&  3\\  
          &1.665& 2.30   &0.08&  3\\
          &4.535& 3.67   &0.12&  3\\
          &4.985& 3.66   &0.12&  3\\
          &8.085& 3.45   &0.11&  3\\
          &8.465& 3.41   &0.11&  3\\
          &43.&   0.943  &0.03&  14\\  
\noalign{\smallskip}
\hline
\noalign{\smallskip}
\end{tabular}
\end{flushleft}
\end{table}
\addtocounter{table}{-1}

\begin{table}
\caption{continued}
\begin{flushleft}
\begin{tabular}{ccrrc}
\hline
\noalign{\smallskip}
\noalign{\smallskip}
source&$\nu_{GHz}$  &S$_{Jy}$&err.&ref.\\
\noalign{\smallskip}
\hline\noalign{\smallskip}
$0742+103$ 
         &0.302&  1.23   &0.06 & 3\\     
         &0.333&  1.32   &0.06 & 3 \\            
         &1.335&  3.31  &0.10  & 3 \\             
         &1.665&  3.69  &0.10  & 3 \\             
         &2.695&  3.92   &0.20 & 9 \\        
         &4.535&  3.61  &0.10   &3  \\         
         &4.985&  3.46  &0.10   &3  \\         
         &8.085&  2.76  &0.08  &3  \\          
         &8.465&  2.69  &0.08  &3  \\            
         &20.0&  1.44  &0.15  &19\\
         &37.0&  1.00   &0.09  &16\\
 \noalign{\smallskip}
\hline
\noalign{\smallskip}
$0743-006$ 
         &0.302&  0.31 & 0.02&  3\\
         &0.333&  0.38 & 0.02&  3\\
         & 1.335& 0.70 & 0.02&  3\\
         & 1.665& 0.81 & 0.02&  3\\
         & 2.700&  1.40 & 0.08&  9\\
         & 4.535& 1.99  &0.06&  3\\
         & 4.985& 2.05  &0.04&  3\\
         & 8.085& 1.97  &0.06&  3\\
         & 8.465& 1.93  &0.06&  3\\
         & 20.0 &  0.99 & 0.10&   19\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
$0941-080$ 
         &0.302&  3.23&   0.10 &  3\\      
         &0.333&  3.33&   0.10 &  3\\      
         &0.96 &  3.16&   0.10&  6\\
         &1.335&  2.71&   0.09&  3\\         
         &1.665&  2.43&   0.08&  3\\       
         &2.3  &  1.90&   0.06&  6\\
         &3.9  &  1.41&   0.05&  6\\
         &4.535&  1.20&   0.04&  3\\       
         &4.985&  1.10&   0.04&  3\\       
         &7.7  &  0.738&  0.02&  6\\
         &8.085&  0.691& 0.023&  3\\
         &8.465&  0.657& 0.022&  3\\
        &11.2  &  0.550& 0.02& 6\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
 $1031+567$ 
          &0.151& 0.78&  0.04 & 27\\  
          &0.325& 1.36&  0.07 & 4\\
          &0.408& 1.50&  0.07 & 5\\
          &0.608& 1.59&  0.08 & 4\\
          &1.380& 1.78&  0.05 & 2\\
          &1.630& 1.78&  0.05 & 2\\
          &4.816& 1.28&  0.04 & 2\\
          &4.866& 1.27&  0.04 & 2\\
          &8.434& 0.82&  0.02&  2\\
          &8.484& 0.81&  0.02&  2\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
 $1117+146$ 
         &0.302&  3.58 & 0.20  & 3\\      
         &0.333&  3.73 & 0.20  & 3\\              
         &0.365&  3.82 & 0.08& 7\\              
         &0.96 &  2.96  & 0.11 & 6\\
         &1.335&  2.46  & 0.08 & 3\\               
         &1.665&  2.21  & 0.07 & 3\\               
         &2.3  &  1.67  & 0.06 & 6\\
         &3.9  &  1.24  & 0.04 & 6\\
         &4.535&  1.02  &0.03  &3\\               
         &4.985&  1.00  &0.03  &3\\               
         &7.7  &  0.70 &0.02  &6\\   
         &8.085&  0.642 &0.023 & 3\\               
         &8.465&  0.613 &0.022 & 3 \\              
         &11.2 &  0.51 &0.02  &6 \\   
\noalign{\smallskip}
\hline
\noalign{\smallskip}
\end{tabular}
\end{flushleft}
\end{table}
\addtocounter{table}{-1}

\begin{table}
\caption{continued}
\begin{flushleft}
\begin{tabular}{ccrrc}
\hline
\noalign{\smallskip}
\noalign{\smallskip}
source&$\nu_{GHz}$  &S$_{Jy}$&err.&ref.\\
\noalign{\smallskip}
\hline\noalign{\smallskip}
 $1127-145$ 
         &0.302 &4.17&  0.20&   3\\
         &0.333 &4.51&  0.20&   3\\
         &1.335 &5.57 & 0.18&  3\\
         &1.665 &5.44 & 0.17&  3\\
         &4.535 &4.01 & 0.13&  3\\
         &4.985 &3.82 & 0.13&  3\\
         &8.085 &3.10 & 0.10&  3\\
         &8.465 &3.03 & 0.10&  3\\
         &14.940& 2.09& 0.30&  7\\
         &20.0 &1.77 & 0.18&  19\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
$1143-245$ 
         &0.302&  0.175&  0.01&  3\\      
         &0.333&  0.224&  0.01&  3  \\          
         &1.335&  1.518&  0.08&  3\\         
         &1.665&  1.654&  0.08&  3\\          
         &4.535&  1.47 & 0.07 & 3\\          
         &4.985&  1.40 & 0.07 & 3\\          
         &8.085&  1.03 & 0.05 & 3\\            
         &8.465&  0.99&  0.05&  3\\       
\noalign{\smallskip}
\hline
\noalign{\smallskip}
$1245-197$ 
          &0.302& 7.80 & 0.40 &  3\\
          &0.325& 7.86 & 0.30 &  4\\  
          &0.333& 8.22 & 0.40 &  3\\
          &0.365& 8.89& 0.11& 7\\
          &0.408& 8.61&  0.16&  8\\
          &1.335& 5.21&  0.15&  3\\
          &1.665& 4.63&  0.15&  3\\
          &4.535& 2.48&  0.08&  3\\
          &4.985& 2.31&  0.07&  3\\
          &8.085& 1.51&  0.05&  3\\
          &8.465& 1.45&  0.05&  3\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
$1323+321$ 
         &0.151&  3.78&   0.10 & 26\\    
         &0.318&  6.32&   0.18 & 18 \\     
         &0.408&  7.02&   0.35 & 5 \\         
         &0.608&  6.47&   0.30  & 4 \\      
         &1.380&  4.88&  0.15  &2  \\       
         &1.630&  4.45&  0.15  &2  \\        
         &4.816&  2.35&   0.08 & 2 \\         
         &4.866&  2.35&   0.08 & 2\\  
         &8.435&  1.63&   0.05 & 2\\
         &8.485&  1.63&   0.05 & 2\\        
\noalign{\smallskip}
\hline
\noalign{\smallskip}
 $1345+125$ 
          &0.178& 4.60  & 0.46 & 17\\   
          &0.302& 7.86 & 0.30  & 3\\
          &0.333& 8.39 & 0.30  & 3\\
          &0.365& 8.31& 0.17& 7\\
          &0.408& 8.78 & 0.27&  8\\
          &1.335& 5.33 & 0.15&  3\\
          &1.665& 4.84 & 0.15&  3\\
          &4.535& 3.18 & 0.10&  3\\
          &4.985& 3.03 & 0.10&  3\\
          &8.085& 2.28 & 0.07&  3\\
          &8.465& 2.21 & 0.07&  3\\
          &20.0& 1.13 & 0.11&  19\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
\end{tabular}
\end{flushleft}
\end{table}
\addtocounter{table}{-1}

\begin{table}
\caption{continued}
\begin{flushleft}
\begin{tabular}{ccrrc}
\hline
\noalign{\smallskip}
\noalign{\smallskip}
source&$\nu_{GHz}$  &S$_{Jy}$&err.&ref.\\
\noalign{\smallskip}
\hline\noalign{\smallskip}
$1358+624$ 
         &0.151&  1.71 & 0.04 & 27\\     
         &0.302&  4.79 & 0.15 & 3   \\     
         &0.333&  5.24 & 0.17 & 3 \\       
         &0.365&  5.56 & 0.07& 7\\
         &0.608&  5.90  & 0.20 & 4\\       
         &1.335&  4.49  & 0.15 & 3\\           
         &1.665&  3.88  & 0.13 & 3\\          
         &4.535&  1.94  & 0.07 & 3\\            
         &4.985&  1.80  & 0.06 & 3\\             
         &8.085&  1.25  & 0.04 & 3\\           
         &8.465&  1.20  & 0.04 & 3\\     
\noalign{\smallskip}
\hline
\noalign{\smallskip}
 $1404+286$ 
          &0.327& 0.177 &0.005 & 12\\
          &0.365& 0.179 &0.032 &7\\
          &0.610& 0.245 &.020  &11\\
          &1.380& 0.79 & 0.03 & 2\\
          &1.630& 1.02  &0.03  &2\\
          &2.300& 1.65  &0.05  &6\\
          &2.695& 2.00  &0.06  &23\\
          &3.900& 2.52  &0.07  &6\\
          &4.816& 2.64  &0.08  &2\\
          &4.866& 2.66  &0.08  &2\\
          &8.434& 1.95  &0.06  &2\\
          &8.484& 1.94  &0.06  &2\\
         &11.200& 1.48  &0.05  &6\\
         &22.460& 0.490 &0.025 &2\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
$1442+101$ 
         &0.302&  1.61&  0.05 & 3\\      
         &0.333&  1.82&  0.06 & 3 \\      
         &0.608&  2.24&   0.10 &  4\\         
         &0.96 &  2.53&  0.09 &  6\\
         &1.335&  2.50&  0.08 & 3 \\              
         &1.665&  2.35&  0.08 & 3 \\              
         &2.3  &  1.83&  0.07 & 6 \\
         &3.9  &  1.34&  0.04 & 6 \\
         &4.535&  1.30&  0.04 & 3 \\        
         &4.985&  1.19&  0.04 & 3 \\              
         &7.7  &  0.70& 0.02 & 6 \\
         &8.085&  0.76&  0.03&  3\\            
         &8.465&  0.72&  0.03&  3 \\
         &11.2 &0.462 &0.02 &6\\      
\noalign{\smallskip}
\hline
\noalign{\smallskip}
$1518+047$ 
         &0.178& 2.20  & 0.44  &17\\
         & 0.365& 3.404& 0.139& 7\\
         & 0.608& 4.05 & 0.20 & 4\\   
         & 0.96 & 4.72 & 0.24 & 31\\
         & 1.380& 3.98 & 0.12 & 2\\
         & 1.640& 3.53 & 0.11 & 2\\
         & 3.9  & 1.46 & 0.05 & 31\\
         & 4.815& 1.06 & 0.03 & 2\\
         & 4.865& 1.05 & 0.03 & 2\\
         & 8.435& 0.478& 0.015& 2\\  
         & 8.485& 0.480& 0.015& 2\\    
         & 11.1 & 0.305& 0.03 &31\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
$1600+335$ 
         &0.151&  2.17  & 0.10 & 26\\  
         &0.302&  2.46 & 0.12 & 3 \\       
         &0.333&  2.45 & 0.12 & 3 \\        
         &0.365&  2.47 & 0.03& 7\\
         &1.335&  3.05  & 0.10&  3\\         
         &1.665&  3.11  & 0.10&  3\\         
         &4.535&  2.75  & 0.09&  3\\           
         &4.985&  2.67  & 0.09&  3\\         
         &8.085&  2.22  & 0.07&  3\\         
         &8.465&  2.17  & 0.07&  3\\              
         &20.0&  1.02  &0.10 & 19\\    
\noalign{\smallskip}
\hline
\noalign{\smallskip}
\end{tabular}
\end{flushleft}
\end{table}
\addtocounter{table}{-1}

\begin{table}
\caption{continued}
\begin{flushleft}
\begin{tabular}{ccrrc}
\hline
\noalign{\smallskip}
\noalign{\smallskip}
source&$\nu_{GHz}$  &S$_{Jy}$&err.&ref.\\
\noalign{\smallskip}
\hline\noalign{\smallskip}
 $1607+268$ 
          &0.318 & 2.02  &0.08 & 18\\
          &0.365 & 2.53 &0.07& 7\\
          &0.408 & 2.95  &0.15 &  5\\
          &0.635 & 4.51  &0.28 &  9\\
          &0.750 & 5.16  &0.18 &  9\\
          &1.380 & 4.86 &0.15  & 2\\
          &1.630 & 4.42 &0.14  & 2\\
          & 4.816&  1.72& 0.05 &  2\\
          &4.866 & 1.71 &0.05  & 2\\
          &8.434 & 0.96& 0.03 &  2\\
          &8.484 & 0.96& 0.03 &  2\\
         &22.460 & 0.293& 0.015&  2\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
 $2008-068$ 
          &0.325 & 1.05 &  0.20&  4\\      
          &0.365 & 1.35 & 0.04 &7 \\  
          &0.608 & 1.95 &  0.20&  4\\       
          &1.380 & 2.62 & 0.08 & 2 \\        
          &1.630 & 2.48 & 0.08 & 2 \\      
          &4.816 & 1.34 & 0.04 & 2 \\         
          &4.866 & 1.34 & 0.04 & 2 \\        
          &8.434 & 0.84&  0.05&  2\\            
          &8.484 & 0.78&  0.07&  2\\
          &22.460& 0.37&  0.02&  2\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
  $2126-158$ 
          &0.333  &0.097 &0.010&  3\\
          &1.335  &0.559 &0.018&  3\\
          &1.665  &0.680 &0.022&  3\\
          &4.535  &1.18  &0.04 &  3\\
          &4.985  &1.17  &0.04 &  3\\
          &8.085  &1.03  &0.03 &  3\\
          &8.465  &1.01  &0.03 &  3\\
          &90.000 &0.31  &0.03 & 13\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
$2128+048$ 
         &0.302  &3.01 & 0.15 & 3\\      
         &0.333  &3.56 & 0.15 & 3\\       
         &0.365  &3.67 & 0.05& 7\\
         &0.408  &4.11  & 0.12 & 8\\          
         &0.635  &5.10  & 0.23 & 9\\          
         & 0.95  &4.95  & 0.25 & 6\\          
         &1.335  &4.08  & 0.13 & 3\\            
         &1.665  &3.73  & 0.12 & 3\\           
         &2.650  &3.16  & 0.02 & 9\\           
         & 3.9   &2.50  & 0.12 & 6\\
         &4.535  &2.16  & 0.07 & 3\\             
         &4.985  &2.02  & 0.07 & 3\\
         &8.085  &1.37  & 0.04 & 3\\
         &8.465  &1.31  & 0.04 & 3\\
         &14.940 &0.82  & 0.12 & 7\\
         &31.400 &0.43  & 0.11 & 9\\    
\noalign{\smallskip}
\hline
\noalign{\smallskip}
\end{tabular}
\end{flushleft}
\end{table}
\addtocounter{table}{-1}

\begin{table}
\caption{continued}
\begin{flushleft}
\begin{tabular}{ccrrc}
\hline
\noalign{\smallskip}
\noalign{\smallskip}
source&$\nu_{GHz}$  &S$_{Jy}$&err.&ref.\\
\noalign{\smallskip}
\hline\noalign{\smallskip}
 $2134+004$ 
          &0.302&  0.60& 0.03 &  3\\
          &0.333&  0.66& 0.03 &  3\\
          &1.335&  3.25 & 0.11 &  3\\ 
          &1.665&  4.62 & 0.15 &  3\\
          &4.535&  8.61 &  0.30 &  3\\
          &4.985&  8.50 &  0.30 &  3\\
          &8.085&  7.40 & 0.25 &  3\\
          &8.465&  7.25 & 0.20 &  3\\
          &20.0&  4.99  &0.50  &19\\
          &43.0&  2.92  &0.12  &14\\
          &87.0&   1.74 & 0.32 & 20\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
$2210+016$ 
         &0.302 & 4.23 & 0.20  & 3\\      
         &0.333 & 4.53 & 0.20  & 3\\         
         &0.365 & 4.54 & 0.06 &7\\
         &0.408 & 4.65 &  0.21 & 8\\        
         &0.96  & 3.17 & 0.16  & 6\\
         &1.335 & 2.84 &  0.10 & 3\\         
         &1.665 & 2.45 &  0.08 & 3\\          
         &2.3   & 1.77 &  0.05 & 6\\
         &3.9   & 1.26 &  0.04 & 6\\
         &4.535 & 1.15 &  0.04 & 3\\            
         &4.985 & 1.05 &  0.03 & 3\\          
         &7.7   & 0.66&  0.03 & 6\\
         &8.085 & 0.65&  0.02 & 3\\             
         &8.465 & 0.62&  0.02 & 3\\
         &11.2  & 0.45&  0.02 & 6\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
 $2342+821$ 
          &0.151& 3.64&  0.10 &  25\\ 
          &0.302& 5.77&  0.30 &  3\\
          &0.325& 5.90&  0.30 &  4\\
          &0.333& 5.91&  0.30 &  3\\
          &0.609& 5.70&  0.30 &  4\\
          &1.335& 3.90&  0.13&  3\\
          &1.665& 3.28&  0.11&  3\\
          &4.535& 1.41 & 0.05&  3\\
          &4.985& 1.28 & 0.04&  3\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
$2352+495$ 
         &0.151&  1.45&   0.15 &30\\
         &0.325&  2.50&   0.12 & 4\\
         &0.408&  2.61&   0.22 & 14\\
         &0.608&  2.82&   0.06 & 10\\
         &0.966&  2.66&   0.27 & 9\\
         &1.380&  2.59&  0.08 & 2\\
         &1.630&  2.43&  0.07 & 2\\
         &4.816&  1.48&  0.05 & 2\\
         &4.866&  1.47&  0.05 & 2\\
         &8.434&  1.07&  0.03 & 2\\
         &8.484&  1.06&  0.03 & 2\\
        &22.460&  0.683&  0.035& 2\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
\end{tabular}
\end{flushleft}
\end{table}

\begin{table}
\caption{Flux densities for the additional objects.References to the flux density measures
for tables 4 and 5: 1)VLA first session
2)VLA second session; 3)VLA third session; 4)WSRT;
5)Northern Cross; 6)Ratan 600; 7)Douglas et al. 1996; 8)Large et al.
1981; 9) K\"uhr et al. (1981);
10) Baum et al 1990; 11) de Bruyn private comunication; 12) de Bruyn, 1990;
13) Steppe et al. 1988;  14) Chandler 1995;
15) Ficarra et al. 1985;
16) Esko private communication ;
17) Gower et al. 1967, Pilkington et al. 1965; 
18) Dennison et al. 1981; 19) Edelson 1987;
20) Ter\"asranta et al 1992;
23) Fiedler et al. 1987; 24) Steppe et al. 1992;
25) Baldwin et al. 1985;  
26) Hales et al. 1988;   
27) Hales et al. 1990; 
28) Hales et al. 1991; 
29) Hales et al. 1993a;  
30) Hales et al. 1993b;
31) Khabrakhmanov private communication.
{\bf notes:} the errors are taken as 3\% if they were found
in literature to be less then 3\%.
0108+388: the flux density at 608 MHz and higher frequencies
refers to the core only, while the flux density measure at 325 MHz
likely includes the extended structure found close to the main compact
component (Baum et al. 1990).
0552+398, the flux density at 37 GHz is the average of
the data taken in 1990 (Ter\"asranta et al. 1992), 
and the error is the r.m.s of the distribution. 
The flux density at 90GHz is the average of
the data taken in 1990 (Steppe et al. 1992), and the error
is the r.m.s of the distribution.
2134+004  The flux density at 87 GHz is the average of
the data taken between 1985 and 1988 (Ter\"asranta et al. 1992), 
the error is the r.m.s of the distribution.}
\begin{flushleft}
\begin{tabular}{ccrrc}
\hline
\noalign{\smallskip}
\noalign{\smallskip}
source&$\nu_{GHz}$  &S$_{Jy}$&err.&ref.\\
\noalign{\smallskip}
\hline\noalign{\smallskip}
\noalign{\smallskip}
$0026+346$  
         &0.365 & 1.36&    0.05&    7\\
         &0.408	&1.88	&0.18	&9\\
         &1.380	&1.91	&0.06	&2\\
         &1.630	&1.87	&0.06	&2\\
         &4.815 & 1.32&	0.04&	2\\
         &4.865	&1.31	&0.04	&2\\
         &8.435	&1.05	&0.03	&2\\
         &8.485	&1.04	&0.03	&2\\
        &22.460  &0.745 &  0.04  &   2\\
\noalign{\smallskip}
\noalign{\smallskip}
\hline
\noalign{\smallskip}
\noalign{\smallskip}
$0201+113$  
         &0.323  &0.350  & 0.01 &  21\\
         &1.380  &0.852  & 0.03 &  2\\
         &1.630  &0.891  & 0.03 &  2\\
         &4.815  &0.844  & 0.03 &  2\\
         &4.865  &0.837  & 0.03 &  2\\
         &8.435  &0.803  & 0.02 &  2\\
         &8.485  &0.801  & 0.02 &  2\\
         &43.0   & 0.565 &  0.02&   32\\         
\noalign{\smallskip}
\hline
\noalign{\smallskip}
\end{tabular}
\end{flushleft}
\end{table}
\addtocounter{table}{-1}

\begin{table}
\caption{continued}
\begin{flushleft}
\begin{tabular}{ccrrc}
\hline
\noalign{\smallskip}
\noalign{\smallskip}
source&$\nu_{GHz}$  &S$_{Jy}$&err.&ref.\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
$0404+768$  
         &0.151	&7.12	&0.30	&28 \\
         &0.302	&8.50	&0.40	&3\\
         &0.333	&8.12	&0.40	&3\\
         &0.608 & 7.22&    0.40 &     4\\  
         &1.335 & 5.71&    0.17&     3\\
         &1.665&  5.13&    0.16&     3\\
         &4.535 & 3.08&    0.10&     3\\
         &4.985&  2.91&    0.10&     3\\
         &15.0	&1.60	&0.08&	23\\
\noalign{\smallskip}
\noalign{\smallskip}
\hline
\noalign{\smallskip}
\noalign{\smallskip}
$0440-003$
& 0.302&  1.20&   .06&     3\\
& 0.333&  1.23&   .06&     3\\
& 1.325&  1.15&   .03&     3\\
& 1.665&  1.19&   .03&     3\\
& 4.535&  1.13&   .03&     3\\
& 4.985&  1.13&   .03&     3\\
& 8.085&  1.08&   .03&     3\\
& 8.465&  1.07&   .03&     3\\
\noalign{\smallskip}
\noalign{\smallskip}
\hline
\noalign{\smallskip}
\noalign{\smallskip}
$0528+134$  
& 0.325& 1.13&  0.05&        4 \\ 
& 1.335& 2.08&  0.06&       3\\
& 1.665& 2.09&  0.06&       3\\
& 4.535& 1.97&	0.06&     3\\
& 4.985& 1.96&	0.06&     3\\
& 8.085& 1.84&	0.05&     3\\
& 8.465& 1.82&	0.05&      3\\
\noalign{\smallskip}
\hline\noalign{\smallskip}
$0552+398$   
          &1.380& 1.47	&0.05&  2\\
          &1.630&  1.91& 0.06&  2\\
          &4.815&  6.27& 0.20&   2\\
          &4.865&  6.31& 0.20&  2\\
          &8.435&  7.47& 0.20&  2\\
          &8.485& 7.44	&0.20 &  2\\
          &22.460& 7.01&   0.35&     2\\
          &37.0&  5.06 &   0.20 &     20\\
          &43.0&  4.57 &   0.18&     14\\
          &90.0&  2.88 &   0.45&    24\\  
\noalign{\smallskip}
\hline
\noalign{\smallskip}
$0703+468$ 
          &0.151& 0.41&   0.02      30\\  
          &0.365& 1.77&   0.02  &  7\\
          &0.408& 1.90&    0.04&     15\\
          &1.380&	1.57	&0.05	&2\\
          &1.630&	1.40	&0.05	&2\\
          &4.815&	0.646&	0.02&	2\\
          &4.865&	0.640	&0.02	&2\\
          &8.435&	0.370	&0.01	&2\\
          &8.485& 0.377	&0.01	&2\\
         &22.460& 0.138  &  0.01&     2\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
$0711+356$    
         &0.151   &     0.42   &   0.04 &  30\\   
         &  0.325 &       0.61 &   0.02  &  4\\
         &   0.608&        1.10&    0.04 &   4\\
         &  1.380&	1.35	&0.05 &   2\\
         &  1.630&	1.43	&0.05	&2\\
         &  4.815&	0.87&	0.03	&2\\
         &  4.865&	0.86&	0.03	&2\\
         &  8.435&	0.64&	0.02	&2\\
         &  8.485& 	0.64&	0.02	&2\\
         & 22.460&        0.290 &  0.015&    2\\ 
\noalign{\smallskip}
\hline
\noalign{\smallskip}
\end{tabular}
\end{flushleft}
\end{table}
\addtocounter{table}{-1}

\begin{table}
\caption{continued}
\begin{flushleft}
\begin{tabular}{ccrrc}
\hline
\noalign{\smallskip}
\noalign{\smallskip}
source&$\nu_{GHz}$  &S$_{Jy}$&err.&ref.\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
$0904+039$   
&0.365  0.958&   0.033&   & 7\\
 &      0.408&  1.00&    0.06 &    8\\
          &1.380&  0.77&   0.03 &    2\\
          &1.630&  0.68&   0.02 &    2\\
          &4.815&  0.220&   0.007&    2\\
          &4.865&  0.216&   0.007&    2 \\
          &8.435&  0.109&   0.003&    2\\
          &8.485&  0.108&   0.003&    2\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
$0914+114$  
          &0.365&  2.28 &   0.06 &   7\\
          &0.408&  2.31 &   0.11 &    8\\
          &1.380&  0.76&   0.02 &    2\\
          &1.630&  0.61&   0.02 &    2\\
          &4.815&  0.121&   0.004&    2\\
          &4.865&  0.120&   0.004&    2 \\
          &8.435&  0.050&   0.002&    2\\
          &8.485&  0.049&   0.002&    2\\
\noalign{\smallskip}
\hline\noalign{\smallskip}
$1543+005$  
          &0.365&  2.28&    0.09&    7\\
          &1.380&  2.03&    0.06&     2\\
          &1.630&  1.90&    0.06&     2\\
          &4.815&  1.24&    0.04&     2\\
          &4.865&  1.23&    0.04&     2\\
          &8.435&  0.95&   0.03&     2\\
          &8.485&  0.95&   0.03&     2\\
         &22.460&  0.59&   0.03&     2\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
$1732+094$   
           &0.365&  0.246  & 0.033  &  7\\
           &1.380&  1.11   & 0.04   &  2\\
           &1.630&  1.22   & 0.04   &  2\\
           &4.815&  0.74  & 0.03   &  2\\
           &4.865&  0.74  & 0.03   &  2\\
           &8.435&  0.490  & 0.015  &  2\\
           &8.485&  0.490  & 0.015  &  2\\
          &22.460&  0.165  & 0.010   &  2\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
$2015+657$  
          & 0.151&        0.70&    0.07&    29\\ 
          & 0.365&        0.88&  0.06&     7 \\      
          & 1.380&	0.65&   0.02&     2\\
          & 1.630&	0.67&   0.02&	2\\
          & 4.815&	0.67&   0.02&	2\\
          & 4.865&	0.67&   0.02&	2\\
          & 8.435&	0.59&	0.02&	2 \\
          & 8.485&	0.59&   0.02&	2 \\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
$2021+614$   
          &1.380 & 2.11&  0.06  &  2\\
          &1.640 & 2.17&  0.06  &  2\\
          &4.815 & 2.82&   0.08 &  2\\
          &4.865 & 2.82&   0.08 &  2\\
          &8.435 & 3.22&   0.10  &  2\\
          &8.485 & 3.21&   0.10  &  2\\
         &43.0   & 1.24&   0.19 &  14\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
\end{tabular}
\end{flushleft}
\end{table}
\addtocounter{table}{-1}

\begin{table}
\caption{continued}
\begin{flushleft}
\begin{tabular}{ccrrc}
\hline
\noalign{\smallskip}
\noalign{\smallskip}
source&$\nu_{GHz}$  &S$_{Jy}$&err.&ref.\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
$2050+364$ 
          &0.365& 3.05&    0.03 &   31\\
          &1.380&	5.18&    0.20 &     2\\
          &1.630&	5.43&    0.20	&2\\
          &4.815&	3.30&    0.10	&2\\
          &4.865&	3.28&    0.10	&2\\
          &8.435&	2.06&    0.06&	2 \\
          &8.485&	2.04&    0.06&	2\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
 $2137+209$   
           &0.365 &       1.90&    0.03&    7\\
           & 1.380&	1.32   & 0.04&	2\\
           &1.630&	1.21    &0.04 &    2\\
           &4.815&	0.59    &0.02	&2\\
           &4.865&	0.59   &0.02 &    2\\
           &8.435&	0.38   &0.01	&2 \\
           &8.485&	0.38   &0.01     &2\\ 
          &22.460    &    0.160&   0.010&     2\\
\noalign{\smallskip}
\hline\noalign{\smallskip}
\noalign{\smallskip}
\noalign{\smallskip}
$2149+056$   
          & 0.333&    0.091&   0.01 &    3\\
          & 1.335&    0.730&   0.02 &    3\\   
          & 1.665&    0.836&   0.03 &    3\\
          & 4.535&	0.87&	0.030&	3\\
          & 4.985&	0.84&	0.027&	3\\
          & 8.085&	0.614&	0.020&	3\\
          & 8.465& 	0.593&	0.020&	3\\
\noalign{\smallskip}
\noalign{\smallskip}
\noalign{\smallskip}
\hline
\noalign{\smallskip}
\noalign{\smallskip}
\noalign{\smallskip}
$2223+210$  
       &0.302	   & 3.52&   0.20	&  3\\
       &0.333	   & 3.63&   0.20	&  3\\
       &  1.335  &   1.67&     0.05&   3\\     
       &  1.665  &   1.41 &    0.05&   3  \\  
       &   4.535 &    1.03&   0.03&    3 \\ 
       &    4.985&    1.07  &  0.03&    3 \\ 
\noalign{\smallskip}
\noalign{\smallskip}
\noalign{\smallskip}
\hline
\noalign{\smallskip}
\noalign{\smallskip}
\noalign{\smallskip}
$2230+114$   
          &0.302&	7.34&	0.20	&3\\
          &0.333&	7.86&	0.20	&3\\
          &0.365& 8.22&   0.09   & 7\\
          &1.335& 6.44&    0.20  &    3\\  
          &1.665& 6.10&    0.18 &    3  \\
          &4.535&	4.29&	0.12	&3\\
          &4.985&	4.12&	0.12	&3\\
          &8.085&	3.40&	0.10	&3\\
          &8.465&	3.36&	0.10	&3\\
\noalign{\smallskip}
\noalign{\smallskip}
\noalign{\smallskip}
\hline
\noalign{\smallskip}
\noalign{\smallskip}
\noalign{\smallskip}
$2337+264$   
          &1.380&	1.05 &   0.03	&2\\
          &1.630&	1.08 &   0.03 &    2\\
          &4.815&	0.995&   0.03	&2\\
          &4.865&	0.996&   0.03 &    2\\
          &8.435&	0.776&   0.03	&2 \\
          &8.485&	0.760&   0.03 &    2\\ 
         &22.460& 0.423&   .02&     2\\
\noalign{\smallskip}
\noalign{\smallskip}
\hline
\noalign{\smallskip}
\noalign{\smallskip}
\end{tabular}
\end{flushleft}
\end{table}



\end{document}

