\documentstyle{l-aa}
\begin{document}
\setcounter{table}{11}
\begin{table*}
\caption[]{Polarimetry of {\bf MCW 1264, Lkh{alpha}~115, HD 132947, HD 141569}}
\label{tab12}
\begin{tabular}{cccccccccr}
\hline
\noalign{\smallskip}
JD2449000+&filter&t,($\sec$)&N&$p\pm\sigma_{p}(\%)$&
$\Theta\pm\sigma_{\Theta}(\degr)$&$\sigma_{1}(\degr)$&
Ux$10^{2}$&Qx$10^{2}$&
$p_{c}\pm\sigma_{p_{c}}(\%)$\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
&&&&{\bf MCW 1264}&&&&&\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
927.3632&$V$&      120&12&0.68$\pm$0.12&40.2$\pm$5.1&3.5& 0.671&0.111& -0.06$\pm$0.09\\
927.3646& $R_{c}$& 120&12&0.95$\pm$0.12&33.2$\pm$3.6&3.5& 0.871&0.380&  0.17$\pm$0.09\\
927.3660& $I_{c}$& 120&12&1.16$\pm$0.16&43.1$\pm$4.0&4.6& 1.157&0.077&  0.24$\pm$0.11\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
&&&&{\bf Lkh{alpha}~115}&&&&&\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
571.4186& $U$    &180&18&4.12$\pm$1.49 & ~~0.5$\pm$10.4 &42.7&~0.072&4.119&-0.22$\pm$1.06 \\
571.4200& $B$    &120&12&1.98$\pm$0.72 & 178.9$\pm$~8.4 &20.5&-0.076&1.979&-0.43$\pm$0.51 \\
571.4212& $V$    &100&10&4.19$\pm$0.59 & 159.3$\pm$~4.0 &16.9&-2.771&3.143& 0.77$\pm$0.42 \\
571.4221&$R_{c}$ & 80& 8&3.82$\pm$0.60 & 157.8$\pm$~4.5 &17.1&-2.673&2.729& 0.42$\pm$0.42 \\
571.4233&$I_{c}$ &100&10&2.13$\pm$0.56 & 157.0$\pm$~6.0 &16.0&-1.532&1.480& 0.66$\pm$0.40 \\
\noalign{\smallskip}
922.4857& $V$    &600&20&2.99$\pm$0.46 & 161.1$\pm$~4.4 &13.0&-1.833&2.363& 0.63$\pm$0.32 \\
922.4927& $R_{c}$&600&20&4.81$\pm$0.43 & 169.9$\pm$~2.6 &12.1&-1.661&4.514&-1.26$\pm$0.30 \\
\noalign{\smallskip}
926.4764& $V$    &600&20&1.65$\pm$0.30 & 142.7$\pm$~5.2 &~8.8&-1.591&0.438&-1.01$\pm$0.22\\
926.4834& $R_{c}$&600&20&4.31$\pm$0.30 & 160.0$\pm$~2.0 &~8.5&-2.770&3.302& 0.34$\pm$0.21\\
926.4904& $I_{c}$&600&20&1.85$\pm$0.33 & 151.3$\pm$~2.6 &~9.6&-1.559&0.997& 0.21$\pm$0.24\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
&&&& {\bf HD 132947} &&&&&\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
917.2400& $V$     &120&4 & 1.165$\pm$0.115 &  54.6$\pm$2.9 &3.3&1.100&-0.383&  -0.056$\pm$0.081\\
917.2414& $R_{c}$ &120&4 & 1.400$\pm$0.119 &  57.0$\pm$2.4 &3.4&1.279&-0.569&  -0.021$\pm$0.084\\
917.2428& $I_{c}$ &120&4 & 1.513$\pm$0.154 &  62.9$\pm$3.5 &4.4&1.227&-0.885&  -0.022$\pm$0.108\\
917.2599& $V$     &120&4 & 1.140$\pm$0.116 &  53.5$\pm$3.0 &3.3&1.090&-0.333&   0.166$\pm$0.082\\
917.2613& $R_{c}$ &120&4 & 1.087$\pm$0.120 &  55.3$\pm$3.2 &3.4&1.017&-0.382&   0.023$\pm$0.085\\
917.2670& $V$     &120&4 & 1.156$\pm$0.115 &  59.6$\pm$3.0 &3.3&1.009&-0.564&  -0.062$\pm$0.081\\
917.2684& $R_{c}$ &120&4 & 1.272$\pm$0.119 &  56.8$\pm$2.7 &3.4&1.166&-0.509&  -0.012$\pm$0.084\\
917.2698& $I_{c}$ &120&4 & 1.556$\pm$0.153 &  59.5$\pm$2.8 &4.4&1.361&-0.754&  -0.055$\pm$0.108\\
\noalign{\smallskip}
918.2091 &$V$     &120&12& 1.056$\pm$0.115 &  48.2$\pm$3.2 &2.3&1.049&-0.118&   0.010$\pm$0.081\\
918.2105 &$R_{c}$ &120&12& 0.803$\pm$0.119 &  48.9$\pm$3.4 &2.4&0.796&-0.109&  -0.024$\pm$0.084\\
918.2119 &$I_{c}$ &120&12& 1.405$\pm$0.160 &  69.5$\pm$3.3 &3.1&0.922&-1.060&   0.074$\pm$0.113\\
\noalign{\smallskip}
918.2198 &$V$     &240&~8& 1.404$\pm$0.081 &  57.1$\pm$3.2 &2.3&1.282&-0.570&  -0.116$\pm$0.057\\
918.2226 &$R_{c}$ &240&~8& 1.022$\pm$0.085 &  62.1$\pm$3.4 &2.4&0.839&-0.568&   0.032$\pm$0.060\\
918.2254 &$I_{c}$ &240&~8& 1.179$\pm$0.110 &  54.2$\pm$3.3 &3.2&1.122&-0.371&  -0.190$\pm$0.078\\
\noalign{\smallskip}
926.2611 &$V$     &600&20& 1.243$\pm$0.054 &  58.6$\pm$1.2 &1.5&1.106&-0.568&  -0.050$\pm$0.038\\
926.2680 &$R_{c}$ &600&20& 1.301$\pm$0.056 &  57.9$\pm$1.3 &1.6&1.171&-0.566&   0.027$\pm$0.039\\
926.2759 &$I_{c}$ &600&20& 1.400$\pm$0.071 &  60.4$\pm$1.5 &2.0&1.203&-0.717&  -0.042$\pm$0.050\\
\noalign{\smallskip}
928.2852 &$V$     &600&20& 1.184$\pm$0.056 &  56.1$\pm$1.5 &1.6&1.096&-0.447&   0.009$\pm$0.039\\
928.2921 &$R_{c}$ &600&20& 1.239$\pm$0.056 &  55.2$\pm$1.4 &1.6&1.161&-0.432&   0.038$\pm$0.039\\
\noalign{\smallskip}
929.2616 &$V$     &600&20& 1.207$\pm$0.054 &  57.3$\pm$1.2 &1.5&1.097&-0.502&  -0.048$\pm$0.038\\
929.2686 &$R_{c}$ &600&20& 1.168$\pm$0.055 &  59.7$\pm$1.5 &1.6&1.018&-0.573&   0.017$\pm$0.039\\
929.2755 &$I_{c}$ &600&20& 1.399$\pm$0.071 &  59.2$\pm$1.4 &2.0&1.231&-0.665&   0.014$\pm$0.050\\
\noalign{\smallskip}
930.2092 &$V$     &600&12& 1.194$\pm$0.086 &  51.7$\pm$2.1 &2.5&1.161&-0.277&  -0.159$\pm$0.061\\
930.2162 &$V$     &600&12& 1.279$\pm$0.089 &  60.8$\pm$2.0 &2.5&1.131&-0.597&  -0.058$\pm$0.063\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
&&&& {\bf HD 141569}&&&&&\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
918.2394& $V$     &240&8&  0.487$\pm$0.114&  105.4$\pm$6.4&3.3&-0.251&-0.421&  -0.192$\pm$0.081\\
918.2422& $R_{c}$ &240&8&  0.932$\pm$0.112&  ~91.5$\pm$3.4&3.2&-0.049&-0.931&   0.066$\pm$0.079\\
918.2450& $I_{c}$ &240&8&  0.543$\pm$0.133&  ~89.6$\pm$6.9&3.8&~0.008&-0.543&   0.122$\pm$0.094\\
\noalign{\smallskip}
926.2895& $V$     &600&20& 0.614$\pm$0.023&  ~89.0$\pm$0.9&0.7&~0.021&-0.614&  -0.033$\pm$0.016\\
926.2965& $R_{c}$ &600&20& 0.640$\pm$0.023&  ~89.2$\pm$0.9&0.7&~0.018&-0.640&   0.011$\pm$0.016\\
926.3005& $I_{c}$ &600&20& 0.630$\pm$0.031&  ~88.4$\pm$1.4&0.8&~0.035&-0.629&  -0.017$\pm$0.022\\
\noalign{\smallskip}
929.2851& $V$     &120&12& 0.645$\pm$0.051&  ~90.5$\pm$2.2&1.5&-0.011&-0.645&   0.047$\pm$0.036\\
929.2865& $R_{c}$ &120&12& 0.640$\pm$0.051&  ~92.3$\pm$2.2&1.5&-0.051&-0.638&   0.055$\pm$0.036\\
929.2879& $I_{c}$ &120&12& 0.775$\pm$0.064&  ~85.2$\pm$2.2&1.8&~0.129&-0.764&   0.058$\pm$0.045\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
\end{tabular}
\end{table*}
%
\begin{table*}
\caption[]{Polarimetry of {\bf MWC 863, He 3-331, S CrA}}
\label{tab13}
\begin{tabular}{ccccccccrr}
\hline
\noalign{\smallskip}
JD2449000+&filter&t,($\sec$)&N&$p\pm\sigma_{p}(\%)$&$\Theta\pm\sigma_{\Theta}(\degr)$&
$\sigma_{1}(\degr)$&Ux$10^{2}$&Qx$10^{2}$&$p_{c}\pm\sigma_{p_{c}}(\%)$\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
&&&&{\bf MWC 863}&&&&&\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
571.3689& $U$    &240&24& 1.96$\pm$0.45 & 43.1$\pm$6.6 &12.9&1.956&~0.130& -0.35$\pm$0.32 \\
571.3710& $B$    &180&18& 3.58$\pm$0.15 & 54.1$\pm$1.2 &~4.2&3.401&-1.118& -0.06$\pm$0.10 \\
571.3719& $V$    &~80&~8& 5.14$\pm$0.15 & 57.6$\pm$0.8 &~4.4&4.651&-2.189&  0.00$\pm$0.11 \\
571.3723&$R_{c}$ &~30&~3& 4.98$\pm$0.23 & 56.4$\pm$1.3 &~6.4&4.591&-1.930& -0.15$\pm$0.16 \\
571.3726&$I_{c}$ &~30&~3& 5.09$\pm$0.27 & 60.8$\pm$1.5 &~7.6&4.335&-2.667&  0.07$\pm$0.19 \\
\noalign{\smallskip}
574.3287&$U$     &180&18& 2.66$\pm$0.48 & 43.9$\pm$3.7 &13.7&2.658&~0.102& -0.76$\pm$0.34 \\
574.3301&$B$     &120&12& 3.80$\pm$0.22 & 48.3$\pm$1.7 &~6.1&3.775&-0.437&  0.24$\pm$0.15 \\
574.3312&$V$     &100&10& 4.78$\pm$0.17 & 56.8$\pm$1.0 &~4.7&4.380&-1.914&  0.11$\pm$0.12 \\
574.3322&$R_{c}$ &~80&~8& 4.90$\pm$0.16 & 58.3$\pm$0.9 &~4.6&4.381&-2.194& -0.07$\pm$0.11 \\
574.3333&$I_{c}$ &100&10& 5.00$\pm$0.15 & 56.4$\pm$0.9 &~4.3&4.609&-1.938&  0.03$\pm$0.11 \\
\noalign{\smallskip}
575.2904&$U$     &180&18& 3.50$\pm$0.30 & 54.1$\pm$2.5 &~8.6&3.325&-1.093&  0.58$\pm$0.21 \\
575.2918&$B$     &120&12& 4.52$\pm$0.14 & 54.9$\pm$0.9 &~3.9&4.253&-1.531&  0.03$\pm$0.10 \\
575.2930&$V$     &100&10& 5.13$\pm$0.11 & 57.3$\pm$0.6 &~3.0&4.664&-2.136&  0.02$\pm$0.07 \\
575.2939&$R_{c}$ &~80&~8& 5.01$\pm$0.10 & 57.5$\pm$0.6 &~3.0&4.541&-2.117& -0.05$\pm$0.07 \\
575.2951&$I_{c}$ &100&10& 4.98$\pm$0.10 & 56.3$\pm$0.6 &~2.7&4.598&-1.914& -0.07$\pm$0.07 \\
\noalign{\smallskip}
576.2554&$U$     &180&18& 3.92$\pm$0.30 & 48.7$\pm$2.2 &~8.4&3.887&-0.505&  -0.07$\pm$0.21  \\
576.2568&$B$     &120&12& 4.26$\pm$0.14 & 54.8$\pm$0.9 &~3.9&4.013&-1.429&   0.11$\pm$0.10  \\
576.2580&$V$     &100&10& 4.87$\pm$0.11 & 59.9$\pm$0.6 &~3.0&4.226&-2.420&   0.01$\pm$0.07  \\
576.2589&$R_{c}$ &~80&~8& 4.63$\pm$0.10 & 60.0$\pm$0.6 &~2.9&4.010&-2.315&  -0.01$\pm$0.07 \\
576.2601&$I_{c}$ &100&10& 4.52$\pm$0.09 & 60.9$\pm$0.6 &~2.7&3.842&-2.382&  -0.01$\pm$0.07 \\
\noalign{\smallskip}
577.2746&$U$     &180&18& 3.65$\pm$0.32 & 56.1$\pm$2.5 &~9.1&3.379&-1.379& -0.66$\pm$0.23 \\
577.2760&$B$     &120&12& 4.34$\pm$0.15 & 56.6$\pm$1.0 &~4.2&3.989&-1.710&  0.01$\pm$0.11 \\
577.2771&$V$     &100&10& 5.27$\pm$0.12 & 57.8$\pm$0.7 &~3.3&4.753&-2.277&  0.03$\pm$0.08 \\
577.2781&$R_{c}$ &~80&~8& 5.15$\pm$0.12 & 58.5$\pm$0.7 &~3.3&4.589&-2.338& 0.06$\pm$0.08 \\
577.2792&$I_{c}$ &100&10& 4.97$\pm$0.11 & 57.6$\pm$0.6 &~3.0&4.497&-2.116& 0.05$\pm$0.08 \\
\noalign{\smallskip}
579.2962&$U$     &180&18& 3.20$\pm$0.34 & 45.9$\pm$3.0 &~9.5&3.198&-0.101&  0.25$\pm$0.24 \\
579.2976&$B$     &120&12& 4.30$\pm$0.15 & 54.4$\pm$1.0 &~4.3&4.071&-1.326&  0.22$\pm$0.11 \\
579.2988&$V$     &100&10& 5.32$\pm$0.12 & 59.3$\pm$0.6 &~3.2&4.671&-2.547& -0.01$\pm$0.08 \\
579.2997&$R_{c}$ &~80&~8& 5.49$\pm$0.11 & 58.9$\pm$0.6 &~3.2&4.856&-2.561& -0.10$\pm$0.08 \\
579.3009&$I_{c}$ &100&10& 5.20$\pm$0.11 & 57.9$\pm$0.6 &~3.0&4.682&-2.263&  0.00$\pm$0.08 \\
\noalign{\smallskip}
926.4152&$V$     &600&20& 4.94$\pm$0.05 & 56.1$\pm$0.3 &1.4&4.575&-1.867&  -0.06$\pm$0.04 \\
926.4228&$R_{c}$ &600&20& 4.98$\pm$0.05 & 56.2$\pm$0.3 &1.3&4.608&-1.899&   0.03$\pm$0.03 \\
926.4292&$I_{c}$ &600&20& 4.83$\pm$0.05 & 54.6$\pm$0.3 &1.4&4.561&-1.588&   0.09$\pm$0.03 \\
\noalign{\smallskip}
929.4133&$V$     &600&20& 4.88$\pm$0.05 & 55.3$\pm$0.3 &1.4&4.565&-1.716&  0.02$\pm$0.04 \\
929.4202&$R_{c}$ &600&20& 5.10$\pm$0.05 & 55.7$\pm$0.3 &1.3&4.751&-1.862&  0.05$\pm$0.03 \\
929.4272&$I_{c}$ &600&20& 4.74$\pm$0.05 & 55.0$\pm$0.3 &1.3&4.458&-1.622& -0.06$\pm$0.03 \\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
&&&& {\bf He 3-331}&&&&&\\
\noalign{\smallskip}
\hline
744.4925&$V$& 120&12&0.382$\pm$0.097 & 122.4$\pm$~7.6&2.8&-0.344&-0.162&  -0.022$\pm$0.069 \\
744.4980&$V$& 240&24&0.469$\pm$0.067 & ~98.6$\pm$~4.3&1.9&-0.139&-0.449&  -0.034$\pm$0.048 \\
\noalign{\smallskip}
747.4950&$V$& 180&18&0.467$\pm$0.079 & 103.8$\pm$~4.9&2.3&-0.218&-0.417&  -0.080$\pm$0.056 \\
747.4992&$V$& 180&18&0.480$\pm$0.079 & 108.0$\pm$~4.8&2.3&-0.282&-0.388&  -0.008$\pm$0.056 \\
\noalign{\smallskip}
751.4517&$U$& 240&24&0.012$\pm$0.156 & 164.5$\pm$52.1&4.5&-0.005&~0.009&  -0.178$\pm$0.110\\
751.4537&$B$& 180&18&0.385$\pm$0.149 & 155.3$\pm$13.1&4.3&-0.296&~0.254&  -0.100$\pm$0.106\\
751.4558&$V$& 180&18&0.148$\pm$0.080 & ~26.2$\pm$19.2&2.3&~0.119&~0.092&   0.014$\pm$0.056\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
&&&& {\bf S CrA}&&&&&\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
575.4709 &$U$     &180&18& 2.32$\pm$1.04&~37.9$\pm$16.1&30.0&~2.25&~0.57&-1.44$\pm$0.73 \\
575.4723 &$B$     &120&12& 2.62$\pm$0.56&~~2.9$\pm$~6.2&15.9&~0.27&~2.61&-0.18$\pm$0.39 \\
575.4735 &$V$     &100&10& 0.62$\pm$0.35&152.5$\pm$19.4&~9.9&-0.51&~0.36&-0.07$\pm$0.25 \\
575.4744 &$R_{c}$ &~80&~8& 1.15$\pm$0.29&168.9$\pm$~7.3&~8.4&-0.44&~1.07& 0.30$\pm$0.21 \\
575.4756 &$I_{c}$ &100&10& 0.27$\pm$0.23&156.5$\pm$30.7&~6.5&-0.20&~0.18& 0.12$\pm$0.16 \\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
\end{tabular}
\end{table*}
%
\begin{table*}
\caption[]{Polarimetry of {\bf MWC 137, RY Lup}}
\label{tab14}
\begin{tabular}{ccccccccrr}
\noalign{\smallskip}
\hline
\noalign{\smallskip}
JD2449000+&filter&t,($\sec$)&N&$p\pm\sigma_{p}(\%)$&
$\Theta\pm\sigma_{\Theta}(\degr)$&$\sigma_{1}(\degr)$&Ux$10^{2}$&Qx$10^{2}$&
$p_{c}\pm\sigma_{p_{c}}(\%)$\\
\hline
\noalign{\smallskip}
&&&&{\bf MWC 137}&&&&&\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
749.3642& $U$ &  240&24&5.09$\pm$0.57 &157.8$\pm$3.2 &16.2&-3.56&~3.64&  0.09$\pm$0.40 \\
749.3663& $B$ &  180&18&6.37$\pm$0.91 &173.9$\pm$4.1 &25.9&-1.35&~6.23& -0.12$\pm$0.64 \\
749.3684& $V$ &  180&18&5.51$\pm$0.25 &159.9$\pm$1.3 &~7.1&-3.56&~4.21& -0.14$\pm$0.18 \\
749.3754& $U$ &  240&24&6.22$\pm$0.58 &161.4$\pm$2.7 &16.6&-3.76&~4.95&  0.54$\pm$0.41 \\
749.3774& $B$ &  180&18&7.79$\pm$0.92 &167.0$\pm$3.4 &26.2&-3.42&~7.00& -0.14$\pm$0.65 \\
749.3795& $V$ &  180&18&5.51$\pm$0.25 &159.8$\pm$1.3 &~7.3&-3.57&~4.20& -0.05$\pm$0.18 \\
\noalign{\smallskip}
751.3377& $U$ &  240&24&5.14$\pm$0.58 &160.0$\pm$3.2 &16.5&-3.30&~3.94& -0.82$\pm$0.41 \\
751.3398& $B$ &  180&18&3.99$\pm$0.92 &163.2$\pm$6.6 &26.1&-2.21&~3.32&  1.08$\pm$0.65 \\
751.3419& $V$ &  180&18&5.46$\pm$0.26 &160.4$\pm$1.3 &~7.3&-3.45&~4.23& -0.07$\pm$0.18 \\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
&&&& {\bf RY Lup} &&&&&\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
49918.2644 &$V$&    240&~8&   1.91$\pm$0.31& 104.8$\pm$~4.6 &9.0&-0.94&-1.66& -0.313$\pm$0.221\\
49918.2672 &$R_{c}$&240&~8&   2.07$\pm$0.27& 111.6$\pm$~3.7 &7.7&-1.42&-1.51& -0.341$\pm$0.189\\
49918.2700 &$I_{c}$&240&~8&   2.71$\pm$0.28& 111.4$\pm$~3.0 &8.1&-1.84&-1.99&  0.460$\pm$0.199\\
49918.2798 &$V$&    240&~8&   1.99$\pm$0.31& 116.0$\pm$~4.5 &8.9&-1.57&-1.23&  0.403$\pm$0.220\\
49918.2826 &$R_{c}$&240&~8&   1.15$\pm$0.25& 115.6$\pm$~6.2 &7.0&-0.90&-0.72&  0.616$\pm$0.173\\
49918.2853 &$I_{c}$&240&~8&   1.12$\pm$0.24& 102.7$\pm$~6.1 &6.8&-0.48&-1.01& -0.353$\pm$0.169\\
\noalign{\smallskip}
49922.2365 &$V$&    600&20&   1.69$\pm$0.16& 167.5$\pm$~3.6 &4.5&-0.63&~1.57&  0.299$\pm$0.111\\
49922.2505 &$V$&    600&20&   1.66$\pm$0.24& 130.2$\pm$~4.1 &6.9&-1.64&-0.28& -0.996$\pm$0.171\\
49922.2644 &$I_{c}$&600&20&   1.66$\pm$0.20& 138.8$\pm$~3.5 &5.8&-1.65&-0.22& -0.385$\pm$0.144\\
49922.3455 &$V$&    600&20&   0.93$\pm$0.21& 124.6$\pm$~6.5 &6.2&-0.87&-0.33& -0.458$\pm$0.152\\
49922.3525 &$R_{c}$&600&20&   0.79$\pm$0.30& 120.1$\pm$10.5 &8.5&-0.69&-0.39&  0.308$\pm$0.209\\
49922.3594 &$I_{c}$&600&20&   2.04$\pm$0.22& 105.8$\pm$~3.1 &6.3&-1.07&-1.74&  0.051$\pm$0.155\\
\noalign{\smallskip}
49923.2337 &$V$    &120&12&   0.53$\pm$0.54& 125.1$\pm$29.6&15.7&-0.50&-0.18& -0.751$\pm$0.386\\
49923.2342 &$R_{c}$&120&12&   0.92$\pm$0.42& 127.0$\pm$15.3&15.7&-0.88&-0.25&  0.350$\pm$0.296\\
49923.2346 &$I_{c}$&120&12&   0.90$\pm$0.41& 150.3$\pm$14.7&11.6&-0.77&~0.46&  0.559$\pm$0.287\\
\noalign{\smallskip}
49924.22380&$V$    &600&20&   1.63$\pm$0.26& 131.9$\pm$~4.6& 7.5&-1.62&-0.18&  0.200$\pm$0.184\\
49924.2449&$R_{c}$ &600&20&   1.21$\pm$0.20& 103.3$\pm$~4.7& 5.8&-0.54&-1.08&  0.625$\pm$0.142\\
49924.22518&$I_{c}$&600&20&   0.62$\pm$0.17& ~73.8$\pm$~8.6& 4.8&~0.33&-0.52&  0.439$\pm$0.118\\
49924.2649 &$V$    &600&20&   0.89$\pm$0.23& 125.5$\pm$~7.4& 6.5&-0.84&-0.29&  -0.495$\pm$0.160\\
49924.2719 &$R_{c}$&600&20&   1.66$\pm$0.18& 128.5$\pm$~3.1& 5.2&-1.62&-0.37&  -0.398$\pm$0.127\\
49924.2788 &$I_{c}$&600&20&   1.13$\pm$0.18& 134.6$\pm$~4.6& 5.2&-1.13&-0.02&   0.028$\pm$0.127\\
49924.3462 &$V$    &600&20&   1.37$\pm$0.20& 113.2$\pm$~4.1& 5.6&-0.99&-0.94&  -0.006$\pm$0.139\\
49924.3532 &$R_{c}$&600&20&   0.68$\pm$0.15& 131.8$\pm$~6.5& 4.4&-0.68&-0.08&  -0.022$\pm$0.109\\
49924.3602 &$I_{c}$&600&20&   0.62$\pm$0.15& 151.7$\pm$~6.8& 4.2&-0.52&~0.34&  -0.077$\pm$0.104\\
\noalign{\smallskip}
49926.2310 &$V$    &600&20&   1.11$\pm$0.16& 126.9$\pm$~4.0 &4.4&-1.07&-0.31&   0.474$\pm$0.109\\
49926.2379 &$R_{c}$&600&20&   0.78$\pm$0.13& 128.0$\pm$~4.7 &3.7&-0.76&-0.19&   0.146$\pm$0.091\\
49926.2448 &$I_{c}$&600&20&   0.47$\pm$0.13& 147.0$\pm$~8.6 &3.8&-0.43&~0.19&  -0.102$\pm$0.094\\
\noalign{\smallskip}
49927.2287 &$V$    &600&20&   0.24$\pm$0.12& 136.4$\pm$12.7&3.4&-0.24&~0.01&  -0.050$\pm$0.085\\
49927.2348 &$V$    &600&20&   0.32$\pm$0.13& 129.2$\pm$11.6&3.8&-0.31&-0.06&  -0.108$\pm$0.093\\
49927.2417 &$R_{c}$&600&20&   0.29$\pm$0.11& 123.4$\pm$10.7&3.1&-0.27&-0.11&   0.010$\pm$0.076\\
49927.2487 &$I_{c}$&600&20&   0.32$\pm$0.11& 122.4$\pm$~9.9&3.2&-0.29&-0.14&  -0.043$\pm$0.078\\
49927.3263 &$V$    &600&20&   0.41$\pm$0.13& 100.9$\pm$~9.2&3.9&-0.15&-0.38&  -0.020$\pm$0.092\\
49927.3332 &$R_{c}$&600&20&   0.43$\pm$0.11& 116.0$\pm$~7.2&3.1&-0.34&-0.26&   0.167$\pm$0.076\\
\noalign{\smallskip}
49928.2312 &$V$    &600&20&   0.45$\pm$0.13& 114.1$\pm$~8.2&3.6&-0.34&-0.30&   0.063$\pm$0.090\\
\noalign{\smallskip}
49929.2202 &$V$    &240&12&   0.59$\pm$0.18& 176.9$\pm$~8.7&5.2&-0.06&~0.59&   0.141$\pm$0.127\\
49929.2316 &$V$    &600&20&   0.53$\pm$0.11& ~10.2$\pm$~6.1&3.2&~0.18&~0.50&  -0.093$\pm$0.080\\
49929.2456 &$I_{c}$&600&20&   0.38$\pm$0.10& ~~3.8$\pm$~7.4&2.8&~0.05&~0.38&  -0.261$\pm$0.069\\
49929.3012 &$V$    &600&20&   0.31$\pm$0.11& 164.5$\pm$10.5&3.2&-0.16&~0.27&  -0.052$\pm$0.080\\
49929.3081 &$R_{c}$&600&20&   0.46$\pm$0.10& 169.1$\pm$~5.9&2.7&-0.17&~0.43&   0.046$\pm$0.067\\
49929.3151 &$I_{c}$&600&20&   0.57$\pm$0.10& 178.2$\pm$~4.8&2.8&-0.04&~0.57&   0.073$\pm$0.068\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
\end{tabular}
\end{table*}
%
\begin{table*}
\caption[]{Polarimetry of {\bf HD 163296}}
\label{tab15}
\begin{tabular}{ccccccccrr}
\hline
\noalign{\smallskip}
JD2449000+&filter&t,($\sec$)&N&$p\pm\sigma_{p}(\%)$&
$\Theta\pm\sigma_{\Theta}(\degr)$&$\sigma_{1}(\degr)$&
Ux$10^{2}$&Qx$10^{2}$&$p_{c}\pm\sigma_{p_{c}}(\%)$\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
571.3957&$U$    &~180&18&0.86$\pm$0.17&~24.7$\pm$~5.8&4.7&~0.65&~0.56& 0.09$\pm$0.12\\
571.3971&$B$    &~120&12&0.37$\pm$0.09&~32.2$\pm$~7.2&2.6&~0.33&~0.16&-0.02$\pm$0.06\\
571.3983&$V$    &~100&10&0.10$\pm$0.08&~22.1$\pm$27.4&2.2&~0.07&~0.07&0.06$\pm$0.05\\
571.3992&$R_{c}$&~~80&~8&0.23$\pm$0.08&~21.8$\pm$14.2&2.4&~0.16&~0.17&-0.08$\pm$0.06\\
\noalign{\smallskip}
917.3150&$V$    &~120&~4&0.31$\pm$0.14&~18.0$\pm$17.2&4.1&~0.18&~0.25&0.00$\pm$0.10\\
917.3164&$R_{c}$&~120&~4&0.25$\pm$0.14&~48.3$\pm$19.1&4.0&~0.25&-0.03&-0.08$\pm$0.10\\
917.3178&$I_{c}$&~120&~4&0.40$\pm$0.17&~39.7$\pm$14.2&4.8&~0.39&~0.07&0.06$\pm$0.12\\
917.3249&$V$    &~240&~8&0.31$\pm$0.10&171.5$\pm$10.4&2.9&-0.09&~0.30&0.07$\pm$0.07\\
917.3277&$R_{c}$&~240&~8&0.22$\pm$0.10&~14.8$\pm$11.1&2.8&~0.11&~0.19&0.08$\pm$0.07\\
917.3305&$I_{c}$&~240&~8&0.31$\pm$0.12&~15.2$\pm$13.2&3.4&~0.15&~0.27&-0.02$\pm$0.08\\
917.3395&$V$    &~360&12&0.13$\pm$0.08&~22.7$\pm$23.3&2.3&~0.09&~0.09&-0.15$\pm$0.06\\
917.3436&$R_{c}$&~360&12&0.40$\pm$0.08&~40.7$\pm$~5.8&2.3&~0.40&~0.06&0.07$\pm$0.06\\
917.3478&$I_{c}$&~360&12&0.26$\pm$0.10&~19.7$\pm$12.2&2.8&~0.17&~0.20&0.00$\pm$0.07\\
917.3609&$V$    &~600&20&0.27$\pm$0.06&~14.4$\pm$~7.0&1.8&~0.13&~0.24&0.03$\pm$0.05\\
917.3679&$R_{c}$&~600&20&0.20$\pm$0.06&~33.0$\pm$10.1&1.8&~0.18&~0.08&-0.02$\pm$0.05\\
917.3748&$I_{c}$&~600&20&0.36$\pm$0.08&~33.5$\pm$~6.0&2.2&~0.33&~0.14&0.03$\pm$0.05\\
917.3972&$I_{c}$&1200&40&0.31$\pm$0.05&~27.1$\pm$~5.0&1.5&~0.25&~0.18&0.04$\pm$0.04\\
917.4163&$V$    &1200&40&0.16$\pm$0.05&~17.5$\pm$10.0&1.3&~0.09&~0.13&0.01$\pm$0.03\\
917.4430&$V$    &1200&40&0.14$\pm$0.05&~13.7$\pm$~9.5&1.3&~0.06&~0.12&-0.02$\pm$0.03\\
\noalign{\smallskip}
918.3167&$V$    &1200&20&0.112$\pm$0.045&~~8.0$\pm$13.2&1.3& 0.031&0.108&0.016$\pm$0.032\\
918.3750&$V$    &1800&15&0.166$\pm$0.011&~17.7$\pm$~1.9&0.3& 0.096&0.135&0.019$\pm$0.008 \\
918.4158&$V$    &~600&60&0.162$\pm$0.020&~20.7$\pm$~3.5&0.6& 0.107&0.122&-0.012$\pm$0.014 \\
918.4228&$R_{c}$&~600&60&0.273$\pm$0.021&~41.3$\pm$~2.4&0.6& 0.271&0.035&-0.068$\pm$0.015 \\
918.4298&$I_{c}$&~600&20&0.277$\pm$0.025&~44.6$\pm$~2.6&0.7& 0.277&0.004&0.000$\pm$0.018 \\
918.4540&$V$    &~600&60&0.178$\pm$0.020&~19.7$\pm$~3.2&0.6& 0.113&0.138&0.008$\pm$0.014 \\
918.4610&$R_{c}$&~600&60&0.146$\pm$0.020&~30.9$\pm$~3.9&0.6& 0.129&0.069&0.034$\pm$0.014 \\
918.4680&$I_{c}$&~600&20&0.285$\pm$0.025&~34.3$\pm$~2.5&0.7& 0.265&0.104&0.008$\pm$0.018 \\
\noalign{\smallskip}
919.2575&$V$    &~600&20&0.134$\pm$0.020&~14.0$\pm$~4.3&0.6& 0.063&0.118&0.029$\pm$0.014 \\
919.2645&$R_{c}$&~600&20&0.173$\pm$0.020&~18.7$\pm$~3.3&0.6& 0.105&0.137&0.036$\pm$0.014 \\
919.2146&$I_{c}$&~600&20&0.244$\pm$0.025&~21.0$\pm$~2.9&0.7& 0.163&0.181&0.063$\pm$0.018 \\
919.2854&$V$    &~600&20&0.165$\pm$0.020&~14.9$\pm$~3.5&0.6& 0.082&0.143&0.011$\pm$0.014 \\
919.2923&$R_{c}$&~600&20&0.192$\pm$0.020&~25.0$\pm$~3.0&0.6& 0.147&0.123&0.041$\pm$0.014 \\
919.2993&$I_{c}$&~600&20&0.237$\pm$0.025&~32.3$\pm$~3.0&0.7& 0.214&0.102&0.016$\pm$0.018 \\
919.3498&$V$    &~600&20&0.173$\pm$0.020&~15.5$\pm$~3.3&0.6& 0.089&0.148&-0.015$\pm$0.014 \\
919.3567&$R_{c}$&~600&20&0.179$\pm$0.020&~23.7$\pm$~3.2&0.6& 0.132&0.121&0.026$\pm$0.014 \\
919.3637&$I_{c}$&~600&20&0.252$\pm$0.025&~27.4$\pm$~2.8&0.7& 0.206&0.145&0.038$\pm$0.018 \\
919.4310&$V$    &~600&20&0.158$\pm$0.020&~~4.7$\pm$~3.6&0.6& 0.026&0.156&-0.009$\pm$0.014 \\
919.4379&$R_{c}$&~600&20&0.135$\pm$0.020&~16.4$\pm$~4.2&0.6& 0.073&0.113&0.038$\pm$0.014 \\
919.4449&$I_{c}$&~600&20&0.245$\pm$0.027&~31.9$\pm$~3.2&0.8& 0.220&0.108&0.058$\pm$0.019 \\
\noalign{\smallskip}
922.2889&$V$    &~600&20&0.180$\pm$0.021&~19.8$\pm$~3.3&0.6& 0.115&0.139&-0.004$\pm$0.015 \\
922.2958&$R_{c}$&~600&20&0.198$\pm$0.021&~33.3$\pm$~3.0&0.6& 0.182&0.079&0.008$\pm$0.015 \\
922.3028&$I_{c}$&~600&20&0.335$\pm$0.030&~33.2$\pm$~2.6&0.9& 0.307&0.134&0.031$\pm$0.021 \\
922.3147&$V$    &~600&20&0.188$\pm$0.020&~32.7$\pm$~3.0&0.6& 0.171&0.078&0.036$\pm$0.014 \\
922.3217&$R_{c}$&~600&20&0.266$\pm$0.021&~37.6$\pm$~2.3&0.6& 0.257&0.068&0.030$\pm$0.015 \\
922.3287&$I_{c}$&~600&20&0.487$\pm$0.030&~28.2$\pm$~1.8&0.9& 0.406&0.270&0.108$\pm$0.021 \\
922.3905&$V$    &~600&20&0.223$\pm$0.036&~21.7$\pm$~4.6&1.0& 0.153&0.162&0.013$\pm$0.026 \\
922.3975&$R_{c}$&~600&20&0.223$\pm$0.041&~32.4$\pm$~5.3&1.2& 0.202&0.095&0.061$\pm$0.029 \\
922.4045&$I_{c}$&~600&20&0.261$\pm$0.045&~29.6$\pm$~4.9&1.3& 0.224&0.134&0.048$\pm$0.032 \\
922.4539&$V$    &~600&20&0.223$\pm$0.024&~29.3$\pm$~3.1&0.7& 0.190&0.116&0.052$\pm$0.017 \\
922.4609&$R_{c}$&~600&20&0.270$\pm$0.026&~25.5$\pm$~2.8&0.7& 0.210&0.170&0.037$\pm$0.018 \\
922.4678&$I_{c}$&~600&20&0.207$\pm$0.034&~32.7$\pm$~4.7&1.0& 0.188&0.086&0.027$\pm$0.024 \\
\noalign{\smallskip}
923.4518&$V$    &~600&20&0.206$\pm$0.021&~27.8$\pm$~2.9&0.6& 0.170&0.116& 0.039$\pm$0.015 \\
923.4588&$R_{c}$&~600&20&0.242$\pm$0.021&~28.1$\pm$~2.5&0.6& 0.201&0.135&-0.007$\pm$0.015 \\
923.4657&$I_{c}$&~600&20&0.347$\pm$0.026&~29.7$\pm$~2.1&0.7& 0.299&0.177& 0.061$\pm$0.019 \\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
\end{tabular}
\end{table*}
%
\begin{table*}
\caption[]{Polarimetry of {\bf HD 163296}}
\label{tab16}
\begin{tabular}{ccccccccrr}
\hline
\noalign{\smallskip}
JD2449000+&filter&t,($\sec$)&N&$p\pm\sigma_{p}(\%)$&
$\Theta\pm\sigma_{\Theta}(\degr)$&$\sigma_{1}(\degr)$&
Ux$10^{2}$&Qx$10^{2}$&$p_{c}\pm\sigma_{p_{c}}(\%)$\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
924.3135&$V$    &600&20&0.174$\pm$0.020&28.5$\pm$3.3&0.6&0.146 &~0.095& 0.007$\pm$0.014 \\
924.3205&$R_{c}$&600&20&0.227$\pm$0.020&28.0$\pm$2.5&0.6&0.188 &~0.127& 0.022$\pm$0.014 \\
924.3275&$I_{c}$&600&20&0.303$\pm$0.025&50.2$\pm$2.4&0.7&0.298 &-0.055&-0.043$\pm$0.018 \\
924.3801&$V$    &600&20&0.287$\pm$0.020&30.2$\pm$2.0&0.6&0.250 &~0.142& 0.020$\pm$0.014 \\
924.3871&$R_{c}$&600&20&0.317$\pm$0.020&29.9$\pm$1.8&0.6&0.274 &~0.159& 0.026$\pm$0.014 \\
924.3941&$I_{c}$&600&20&0.379$\pm$0.025&28.2$\pm$1.9&0.7&0.316 &~0.210& 0.001$\pm$0.018 \\
924.4304&$V$    &600&20&0.218$\pm$0.020&28.6$\pm$2.6&0.6&0.183 &~0.118& 0.006$\pm$0.014 \\
924.4374&$R_{c}$&600&20&0.301$\pm$0.020&30.4$\pm$1.9&0.6&0.263 &~0.147& 0.022$\pm$0.014 \\
924.4444&$I_{c}$&600&20&0.361$\pm$0.025&31.8$\pm$2.0&0.7&0.323 &~0.161&-0.011$\pm$0.018 \\
\noalign{\smallskip}
925.4131&$V$    &600&20&0.217$\pm$0.020&25.6$\pm$2.6&0.6&0.169 &~0.136& 0.032$\pm$0.014 \\
925.4200&$R_{c}$&600&20&0.283$\pm$0.020&25.9$\pm$2.0&0.6&0.222 &~0.175&-0.005$\pm$0.014 \\
925.4270&$I_{c}$&600&20&0.291$\pm$0.025&35.3$\pm$2.1&0.7&0.275 &~0.095& 0.061$\pm$0.018  \\
\noalign{\smallskip}
926.3179&$V$    &600&20&0.182$\pm$0.020&14.5$\pm$3.1&0.6&0.088 &~0.159&-0.004$\pm$0.014 \\
926.3249&$R_{c}$&600&20&0.180$\pm$0.021&20.7$\pm$3.3&0.6&0.119 &~0.135&-0.029$\pm$0.015 \\
926.3318&$I_{c}$&600&20&0.311$\pm$0.026&23.3$\pm$2.4&0.7&0.226 &~0.214& 0.001$\pm$0.018 \\
926.3687&$V$    &600&20&0.165$\pm$0.020&19.5$\pm$3.5&0.6&0.104 &~0.128& 0.001$\pm$0.014 \\
926.3756&$R_{c}$&600&20&0.224$\pm$0.020&30.9$\pm$2.6&0.6&0.197 &~0.106& 0.019$\pm$0.014 \\
926.3826&$I_{c}$&600&20&0.304$\pm$0.025&28.5$\pm$2.4&0.7&0.255 &~0.166& 0.026$\pm$0.018 \\
926.4451&$V$    &600&20&0.241$\pm$0.020&24.1$\pm$2.4&0.6&0.180 &~0.161& 0.044$\pm$0.014 \\
926.4520&$R_{c}$&600&20&0.246$\pm$0.021&23.7$\pm$2.4&0.6&0.181 &~0.167& 0.051$\pm$0.015 \\
926.4590&$I_{c}$&600&20&0.302$\pm$0.026&33.5$\pm$2.5&0.7&0.278 &~0.118& 0.025$\pm$0.018 \\
\noalign{\smallskip}
927.2963&$V$    &600&20&0.183$\pm$0.020&11.3$\pm$3.1&0.6&0.070 &~0.169& 0.004$\pm$0.014 \\
927.3032&$R_{c}$&600&20&0.204$\pm$0.020&29.2$\pm$2.8&0.6&0.174 &~0.107& 0.011$\pm$0.014 \\
927.4694&$I_{c}$&600&20&0.342$\pm$0.025&34.5$\pm$2.1&0.7&0.319 &~0.123& 0.017$\pm$0.018 \\
927.3806&$V$    &600&20&0.163$\pm$0.020&27.0$\pm$3.5&0.6&0.132 &~0.096& 0.003$\pm$0.014 \\
927.3876&$R_{c}$&600&20&0.239$\pm$0.020&29.0$\pm$2.4&0.6&0.203 &~0.127& 0.010$\pm$0.014 \\
927.3945&$I_{c}$&600&20&0.284$\pm$0.025&29.6$\pm$2.5&0.7&0.244 &~0.145& 0.025$\pm$0.018 \\
927.4554&$V$    &600&20&0.168$\pm$0.020&16.2$\pm$3.4&0.6&0.090 &~0.142& 0.014$\pm$0.014 \\
927.4624&$R_{c}$&600&20&0.227$\pm$0.020&30.6$\pm$2.5&0.6&0.199 &~0.109& 0.019$\pm$0.014 \\
927.4694&$I_{c}$&600&20&0.318$\pm$0.025&35.5$\pm$2.2&0.7&0.301 &~0.104& 0.031$\pm$0.018 \\
\noalign{\smallskip}
928.3155&$V$    &600&20&0.161$\pm$0.020&23.9$\pm$3.6&0.6&0.119&~0.108 & 0.029$\pm$0.014 \\
928.3224&$R_{c}$&600&20&0.178$\pm$0.021&23.6$\pm$3.4&0.6&0.131&~0.121 & 0.004$\pm$0.015 \\
928.3294&$I_{c}$&600&20&0.333$\pm$0.027&31.0$\pm$2.3&0.8&0.294&~0.156 & 0.017$\pm$0.019 \\
928.3652&$V$    &600&20&0.160$\pm$0.021&26.8$\pm$3.8&0.6&0.129&~0.095 & 0.033$\pm$0.015 \\
928.3722&$R_{c}$&600&20&0.174$\pm$0.022&33.0$\pm$3.6&0.6&0.159&~0.071 & 0.018$\pm$0.016 \\
928.3791&$I_{c}$&600&20&0.283$\pm$0.030&32.6$\pm$3.0&0.9&0.257&~0.119 &-0.007$\pm$0.021 \\
928.3920&$V$    &600&20&0.125$\pm$0.027&23.3$\pm$6.3&0.8&0.091&~0.086 & 0.024$\pm$0.019 \\
928.3990&$R_{c}$&600&20&0.294$\pm$0.028&31.3$\pm$2.7&0.8&0.261&~0.135 & 0.052$\pm$0.020 \\
928.4059&$I_{c}$&600&20&0.250$\pm$0.030&37.5$\pm$3.4&0.9&0.241&~0.065 & 0.031$\pm$0.022 \\
928.4190&$V$    &600&20&0.259$\pm$0.029&24.9$\pm$3.2&0.8&0.198&~0.167 & 0.033$\pm$0.020 \\
928.4260&$R_{c}$&600&20&0.227$\pm$0.029&33.9$\pm$3.7&0.8&0.210&~0.086 &-0.011$\pm$0.020 \\
928.4329&$I_{c}$&600&20&0.289$\pm$0.038&30.3$\pm$3.8&1.1&0.252&~0.142 & 0.016$\pm$0.027 \\
\noalign{\smallskip}
929.3285&$V$    &600&20&0.151$\pm$0.020 & 20.2$\pm$3.8&0.6 &0.098&~0.115&-0.020$\pm$0.014 \\
929.3354&$R_{c}$&600&20&0.242$\pm$0.020 & 26.4$\pm$2.4&0.6 &0.193&~0.146& 0.011$\pm$0.014 \\
929.3424&$I_{c}$&600&20&0.358$\pm$0.025 & 38.5$\pm$2.0&0.7 &0.349&~0.081& 0.017$\pm$0.018 \\
929.3778&$V$    &600&20&0.163$\pm$0.020 & 22.0$\pm$3.5&0.6 &0.113&~0.117& 0.020$\pm$0.014 \\
929.3847&$R_{c}$&600&20&0.193$\pm$0.020 & 33.0$\pm$3.0&0.6 &0.176&~0.079& 0.013$\pm$0.014 \\
929.3917&$I_{c}$&600&20&0.354$\pm$0.026 & 40.0$\pm$2.1&0.7 &0.349&~0.061&-0.003$\pm$0.019 \\
929.4393&$V$    &600&20&0.203$\pm$0.020 & 31.2$\pm$2.8&0.6 &0.180&~0.094&-0.016$\pm$0.014 \\
929.4463&$R_{c}$&600&20&0.306$\pm$0.021 & 32.6$\pm$2.0&0.6 &0.278&~0.128& 0.028$\pm$0.015 \\
929.4532&$I_{c}$&600&20&0.356$\pm$0.026 & 36.9$\pm$2.1&0.7 &0.342&~0.099& 0.024$\pm$0.018 \\
929.4633&$V$    &600&20&0.181$\pm$0.021 & 28.4$\pm$3.3&0.6 &0.151&~0.099& 0.036$\pm$0.015 \\
929.4702&$R_{c}$&600&20&0.207$\pm$0.021 & 38.9$\pm$2.9&0.6 &0.203&~0.044& 0.015$\pm$0.015 \\
929.4772&$I_{c}$&600&20&0.309$\pm$0.026 & 35.8$\pm$2.4&0.8 &0.293&~0.098& 0.031$\pm$0.018 \\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
\end{tabular}
\end{table*}
\end{document}
