\documentstyle{l-aa}
\begin{document}
\setcounter{table}{16}
\begin{table*}
\caption[]{Polarimetry of {\bf HD 163296, KK Oph, MWC 158, He 3--741}}
\label{tab17}
\begin{tabular}{ccccccccrr}
\noalign{\smallskip}
\hline
\noalign{\smallskip}
JD2449000+&filter&t,($\sec$)&N&$p\pm\sigma_{p}(\%)$&
$\Theta\pm\sigma_{\Theta}(\degr)$&$\sigma_{1}(\degr)$&Ux$10^{2}$&Qx$10^{2}$&
$p_{c}\pm\sigma_{p_{c}}(\%)$\\
\hline
\noalign{\smallskip}
&&&&{\bf HD 163296}&&&&&\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
930.2919&$V$    & 600&20& 0.247$\pm$0.026 & 29.3$\pm$3.0&0.7 &0.211&0.129& -0.012$\pm$0.018 \\
930.2989&$R_{c}$& 600&20& 0.322$\pm$0.021 & 35.7$\pm$1.9&0.6 &0.305&0.103&  0.028$\pm$0.015 \\
930.3058&$I_{c}$& 600&20& 0.330$\pm$0.027 & 37.0$\pm$2.3&0.8 &0.317&0.091&  0.006$\pm$0.019 \\
930.3156&$V$    & 600&20& 0.223$\pm$0.031 & 26.4$\pm$4.0&0.9 &0.178&0.135&  0.002$\pm$0.022 \\
930.3225&$R_{c}$& 600&20& 0.310$\pm$0.025 & 35.4$\pm$2.3&0.7 &0.293&0.102& -0.015$\pm$0.018 \\
930.3295&$I_{c}$& 600&20& 0.344$\pm$0.031 & 37.2$\pm$2.6&0.9 &0.331&0.093&  0.043$\pm$0.022 \\
930.3511&$V$    & 600&20& 0.199$\pm$0.031 & 34.4$\pm$4.5&0.9 &0.186&0.072& -0.003$\pm$0.022 \\
930.3581&$R_{c}$& 600&20& 0.219$\pm$0.027 & 33.2$\pm$3.5&0.8 &0.201&0.088&  0.166$\pm$0.019 \\
930.3650&$I_{c}$& 600&20& 0.381$\pm$0.040 & 37.9$\pm$3.0&1.1 &0.369&0.093&  0.092$\pm$0.028 \\
930.3777&$V$    & 600&20& 0.182$\pm$0.025 & 33.0$\pm$3.9&0.7 &0.166&0.074&  0.030$\pm$0.018 \\
930.3846&$R_{c}$& 600&20& 0.285$\pm$0.036 & 37.5$\pm$3.6&1.0 &0.275&0.074&  0.063$\pm$0.025 \\
930.3916&$I_{c}$& 600&20& 0.350$\pm$0.047 & 41.1$\pm$3.8&1.3 &0.347&0.048&  0.123$\pm$0.033 \\
930.4129&$V$    & 600&20& 0.275$\pm$0.026 & 25.9$\pm$2.7&0.7 &0.216&0.170& -0.034$\pm$0.018 \\
930.4278&$R_{c}$& 600&20& 0.464$\pm$0.027 & 29.6$\pm$1.7&0.8 &0.399&0.238&  0.061$\pm$0.019 \\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
&&&&{\bf KK Oph}&&&&&\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
575.3072 &$U$     &180&18&3.90$\pm$1.13&~~1.1$\pm$10.0&32.2 &~0.15&~3.90& 1.45$\pm$0.79 \\
575.3086 &$B$     &120&12&3.34$\pm$0.47&166.9$\pm$~4.0&13.4 &-1.48&~3.00&-0.36$\pm$0.33 \\
575.3098 &$V$     &100&10&3.96$\pm$0.34&174.5$\pm$~9.5&~2.5 &-0.76&~3.89& 0.06$\pm$0.24 \\
575.3107 &$R_{c}$ &~80&~8&4.01$\pm$0.31&173.0$\pm$~8.8&~2.2 &-0.97&~3.89&-0.04$\pm$0.22 \\
575.3119 &$I_{c}$ &100&10&3.87$\pm$0.26&176.0$\pm$~1.9&~7.4 &-0.54&~3.83& 0.12$\pm$0.18 \\
\noalign{\smallskip}
576.2750 &$U$     &180&18&1.27$\pm$1.26&132.2$\pm$33.0&36.8 &-1.26&-0.12&-1.08$\pm$0.90 \\
576.2764 &$B$     &120&12&2.71$\pm$0.54&168.0$\pm$~5.2&15.2 &-1.10&~2.48&-0.09$\pm$0.38 \\
576.2775 &$V$     &100&10&4.05$\pm$0.39&169.2$\pm$~1.0&11.0 &-1.49&~3.77&-0.58$\pm$0.27 \\
576.2785 &$R_{c}$ &~80&~8&2.94$\pm$0.37&169.5$\pm$~1.5&10.5 &-1.05&~2.75& 0.04$\pm$0.26 \\
576.2796 &$I_{c}$ &100&10&4.21$\pm$0.30&173.2$\pm$~2.0&~8.6 &-0.99&~4.09& 0.18$\pm$0.21 \\
\noalign{\smallskip}
577.2912 &$U$     &180&18&3.84$\pm$1.50&~99.5$\pm$18.5&42.2 &-1.25&~3.63& 0.06$\pm$1.05 \\
577.2926 &$B$     &120&12&3.85$\pm$0.57&169.1$\pm$~4.2&16.2 &-1.43&~3.58& 0.04$\pm$0.40 \\
577.2938 &$V$     &100&10&4.06$\pm$0.41&166.6$\pm$~2.9&11.5 &-1.83&~3.62&-0.31$\pm$0.29 \\
577.2947 &$R_{c}$ &~80&~8&4.31$\pm$0.37&168.3$\pm$~1.5&10.6 &-1.71&~3.96& 0.05$\pm$0.26 \\
577.2959 &$I_{c}$ &100&10&4.35$\pm$0.30&169.5$\pm$~2.0&~8.4 &-1.56&~4.06& 0.42$\pm$0.21 \\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
&&&& {\bf MWC 158}&&&&&\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
748.3505&$V$& 180&18&0.58$\pm$0.10& 157.8$\pm$4.9&2.8& -0.406&0.414& 0.11$\pm$0.07\\
748.3562&$U$& 240&24&1.09$\pm$0.19& 168.2$\pm$5.0&5.5& -0.436&0.999& 0.06$\pm$0.14\\
748.3583&$B$& 180&18&0.70$\pm$0.18& 160.3$\pm$7.4&5.1& -0.444&0.541& 0.04$\pm$0.13\\
748.3604&$V$& 180&18&0.85$\pm$0.10& 156.5$\pm$3.4&2.8& -0.622&0.580& 0.04$\pm$0.07\\
\noalign{\smallskip}
750.3815&$U$& 240&24&1.44$\pm$0.19& 158.8$\pm$3.8&5.4& -0.978&1.057&-0.05$\pm$0.13\\
750.3836&$B$& 180&18&1.00$\pm$0.17& 157.9$\pm$4.9&4.9& -0.697&0.717&-0.01$\pm$0.12\\
750.3857&$V$& 180&18&0.98$\pm$0.10& 162.1$\pm$2.9&2.7& -0.573&0.795&-0.02$\pm$0.07\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
&&&&{\bf He 3-741}&&&&&\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
745.6070& $C$ &180&18& 0.203$\pm$0.065 & 164.5$\pm$11&1.9 &-0.104&~0.174& -0.029$\pm$0.046 \\
745.6132& $V$ &180&18& 0.334$\pm$0.100 & 139.0$\pm$~9&2.9 &-0.331&~0.046& -0.193$\pm$0.071 \\
\noalign{\smallskip}
751.5523& $U$ &240&24& 0.35$\pm$0.29 &~93.7$\pm$29&8.2&-0.045&-0.347& 0.26$\pm$0.20 \\
751.5544&$B$  &180&18& 0.34$\pm$0.23 &~83.4$\pm$24&6.6&~0.078&-0.331& 0.06$\pm$0.16 \\
751.5565& $V$ &180&18& 0.15$\pm$0.12 &106.8$\pm$27&3.5&-0.083&-0.125&-0.13$\pm$0.09 \\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
\end{tabular}
\end{table*}
%
\begin{table*}
\caption[]{Polarimetry of {\bf 3 Pup, AS 117, EW CMa, MWC 257, MWC 900}}
\label{tab18}
\begin{tabular}{ccccccccrr}
\hline
\noalign{\smallskip}
JD2449000+&filter&t,($\sec$)&N&$p\pm\sigma_{p}(\%)$&
$\Theta\pm\sigma_{\Theta}(\degr)$&$\sigma_{1}(\degr)$&
Ux$10^{2}$&Qx$10^{2}$&$p_{c}\pm\sigma_{p_{c}}(\%)$\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
&&&& {\bf 3 Pup}&&&&&\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
742.4111&$U$&240&24&1.353$\pm$0.156& 98.3$\pm$3.3&4.5&-0.387&-1.297&~0.197$\pm$0.111\\
742.4132&$B$&180&18&1.525$\pm$0.171& 96.6$\pm$3.2&4.9&-0.348&-1.485&~0.013$\pm$0.121\\
742.4146&$V$&120&12&1.562$\pm$0.082& 94.6$\pm$1.5&2.3&-0.250&-1.542&-0.037$\pm$0.058\\
742.4300&$U$&240&24&1.499$\pm$0.145& 98.7$\pm$2.8&4.2&-0.448&-1.430&~0.158$\pm$0.103\\
742.4320&$B$&180&18&1.392$\pm$0.158& 96.6$\pm$3.3&4.5&-0.318&-1.355&-0.047$\pm$0.112\\
742.4334&$V$&120&12&1.500$\pm$0.076& 90.2$\pm$1.5&2.2&-0.010&-1.500&-0.081$\pm$0.053\\
\noalign{\smallskip}
744.4703&$V$&120&12&1.376$\pm$0.066& 93.0$\pm$1.4&1.9&-0.144&-1.368&-0.045$\pm$0.047\\
\noalign{\smallskip}
750.4315&$U$&240&24&1.267$\pm$0.123& 92.9$\pm$2.7&3.6&-0.128&-1.126&-0.070$\pm$0.087\\
750.4336&$B$&180&18&1.580$\pm$0.135& 95.8$\pm$2.4&3.9&-0.318&-1.548&-0.233$\pm$0.095\\
750.4357&$V$&180&18&1.490$\pm$0.052& 93.5$\pm$1.0&1.5&-0.182&-1.479&-0.039$\pm$0.037\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
&&&& {\bf AS 117} &&&&&\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
748.3018&$V$&180&18&0.56$\pm$0.18&161.5$\pm$10.0&~5.1&-0.337&~0.477& -0.03$\pm$0.13\\
748.3067&$V$&180&18&0.43$\pm$0.18&118.4$\pm$14.0&~5.0&-0.360&-0.235& -0.22$\pm$0.12\\
\noalign{\smallskip}
750.3267&$U$&240&24&0.48$\pm$0.37&161.0$\pm$26.8&10.7&-0.285&~0.386& -0.45$\pm$0.26\\
750.3288&$B$&180&18&0.37$\pm$0.29&102.4$\pm$26.9&~8.4&-0.155&-0.336&  0.12$\pm$0.21\\
750.3309&$V$&180&18&0.17$\pm$0.17&~86.3$\pm$33.0&~5.0&-0.022&-0.169&  0.16$\pm$0.12\\
\noalign{\smallskip}
752.3133&$U$&240&24& 0.81$\pm$0.38&~41.6$\pm$17.4&10.9&~0.804&~0.086&  0.51$\pm$0.27\\
752.3154&$B$&180&18& 0.01$\pm$0.30&~87.4$\pm$52.0&~8.6&~0    &-0.010&  0.44$\pm$0.21\\
752.3175&$V$&180&18& 0.19$\pm$0.18&158.0$\pm$31.4&~5.1& -0.132&0.137&  0.10$\pm$0.13\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
&&&& {\bf EW CMa} &&&&&\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
748.3950&$V$& 180&18&0.212$\pm$0.076&~56.4$\pm$15.0&2.2&~0.195&-0.082&-0.04$\pm$0.05\\
748.4004&$V$& 180&18&0.314$\pm$0.075&~41.5$\pm$~6.8&2.2&~0.312&~0.038&-0.04$\pm$0.05\\
\noalign{\smallskip}
750.3954&$U$& 240&24&0.401$\pm$0.148&151.8$\pm$16.7&4.2&-0.334&~0.222& 0.03$\pm$0.11\\
750.3975&$B$& 180&18&0.117$\pm$0.154&140.4$\pm$35.1&4.4&-0.115&~0.022&-0.09$\pm$0.11\\
750.3996&$V$& 180&18&0.080$\pm$0.075&~47.9$\pm$32.1&2.1&~0.080&-0.008& 0.01$\pm$0.05\\
\noalign{\smallskip}
755.3668&$V$& 120&12&0.111$\pm$0.091&~75.8$\pm$30.3&2.6&~0.053&-0.098& 0.09$\pm$0.06\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
&&&&{\bf MWC 257}&&&&&\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
575.3270 & $U$    &180&18& 2.10$\pm$0.16 & 29.9$\pm$2.2 &4.6&1.815&1.056&   0.01$\pm$0.11 \\
575.3284 & $B$    &120&12& 2.24$\pm$0.11 & 34.8$\pm$1.4 &3.2&2.100&0.781&  -0.08$\pm$0.08 \\
575.3296 & $V$    &100&10& 2.14$\pm$0.10 & 32.6$\pm$1.3 &2.9&1.943&0.898&  -0.07$\pm$0.07 \\
575.3305 &$R_{c}$ &~80&~8& 1.80$\pm$0.11 & 30.8$\pm$1.8 &3.0&1.583&0.856&  -0.13$\pm$0.08 \\
575.3317 &$I_{c}$ &100&10& 1.72$\pm$0.11 & 28.7$\pm$1.8 &3.1&1.449&0.927&   0.07$\pm$0.08 \\
\noalign{\smallskip}
576.2922 & $U$    &180&18& 2.28$\pm$0.17 & 32.3$\pm$2.1 &4.3&2.060&0.978&   0.15$\pm$0.12 \\
576.2936 & $B$    &120&12& 2.36$\pm$0.12 & 35.7$\pm$1.5 &3.3&2.237&0.753&   0.19$\pm$0.08 \\
576.2948 & $V$    &100&10& 1.81$\pm$0.10 & 35.9$\pm$1.6 &2.9&1.719&0.565&   0.07$\pm$0.07 \\
576.2957 &$R_{c}$ &~80&~8& 1.46$\pm$0.11 & 35.0$\pm$2.2 &3.1&1.372&0.499&  -0.00$\pm$0.08 \\
576.2969 &$I_{c}$ &100&10& 1.54$\pm$0.11 & 32.2$\pm$2.0 &3.2&1.389&0.665&  -0.07$\pm$0.08 \\
\noalign{\smallskip}
577.3100 & $U$    &180&18& 2.34$\pm$0.17 & 29.7$\pm$2.1 &4.9&2.014&1.191&  -0.01$\pm$0.12 \\
577.3114 & $B$    &120&12& 2.39$\pm$0.12 & 32.2$\pm$1.4 &3.4&2.155&1.033&   0.10$\pm$0.08 \\
577.3126 & $V$    &100&10& 2.01$\pm$0.11 & 34.9$\pm$1.6 &3.0&1.886&0.694&  -0.02$\pm$0.07 \\
577.3135 &$R_{c}$ &~80&~8& 1.84$\pm$0.11 & 35.5$\pm$1.7 &3.1&1.740&0.599&  -0.05$\pm$0.08 \\
577.3147 &$I_{c}$ &100&10& 1.68$\pm$0.11 & 32.4$\pm$1.9 &3.2&1.520&0.715&  -0.05$\pm$0.08 \\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
&&&&{\bf MWC 900}&&&&&\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
919.4009&$V$    &600&20&  0.330$\pm$0.058& 171.4$\pm$~5.2&1.7 &-0.098&0.315&  0.03$\pm$0.04\\
919.4078&$R_{c}$&600&20&  0.436$\pm$0.061& 167.2$\pm$~3.9&1.7 &-0.188&0.393&  0.05$\pm$0.04\\
\noalign{\smallskip}
922.4243&$V$    &600&20&  0.196$\pm$0.096& ~~4.1$\pm$17.2&2.7 &~0.028&0.194& 0.11$\pm$0.07\\
922.4313&$R_{c}$&600&20&  0.472$\pm$0.107& 162.6$\pm$~6.8&3.1 &-0.269&0.388& -0.19$\pm$0.08\\
922.4383&$I_{c}$&600&20&  0.298$\pm$0.115& 151.1$\pm$13.1&3.3 &-0.252&0.159& -0.10$\pm$0.08\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
\end{tabular}
\end{table*}
%
\begin{table*}
\caption[]{Polarimetry of {\bf MWC 843, AS 119, AS 160,
HD 290770, He 3-140, He 3-180, WRA 15-689}}
\label{tab19}
\begin{tabular}{ccccccccrr}
\hline
\noalign{\smallskip}
JD2449000+&filter&t,($\sec$)&N&$p\pm\sigma_{p}(\%)$&
$\Theta\pm\sigma_{\Theta}(\degr)$&$\sigma_{1}(\degr)$&
Ux$10^{2}$&Qx$10^{2}$&$p_{c}\pm\sigma_{p_{c}}(\%)$\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
&&&& {\bf MWC 843}&&&&&\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
745.3959&$V$& 180&18& 0.117$\pm$0.071&~~1.0$\pm$22.8&2.0&~0.004&0.117&  -0.061$\pm$0.050\\
745.4014&$V$& 180&18& 0.269$\pm$0.070&166.1$\pm$~7.5&2.0&-0.125&0.238&  -0.063$\pm$0.049\\
\noalign{\smallskip}
748.4088&$V$&  180&18&0.130$\pm$0.072&173.3$\pm$20.1&2.1&-0.030&0.126&  -0.064$\pm$0.051\\
748.4143&$V$&  180&18&0.238$\pm$0.071&179.5$\pm$~9.1&2.0&-0.004&0.238&   0.009$\pm$0.050\\
748.4213&$U$&  240&24&0.737$\pm$0.127&156.5$\pm$~4.9&3.6&-0.539&0.329&  -0.011$\pm$0.090\\
748.4234&$B$&  180&18&0.234$\pm$0.108&147.4$\pm$16.7&3.1&-0.212&0.098&   0.003$\pm$0.076\\
748.4254&$V$&  180&18&0.146$\pm$0.070&168.7$\pm$17.8&2.0&-0.056&0.135&   0.012$\pm$0.050\\
\noalign{\smallskip}
752.4911&$U$&  240&24&0.673$\pm$0.140&159.4$\pm$~6.0&4.0&-0.443&0.506&   0.051$\pm$0.099\\
752.4932&$B$&  180&18&0.512$\pm$0.115&160.4$\pm$~6.5&3.3&-0.324&0.397&  -0.170$\pm$0.082\\
752.4953&$V$&  180&18&0.687$\pm$0.073&140.2$\pm$~3.0&2.1&-0.676&0.189&   0.008$\pm$0.051\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
&&&& {\bf AS 119}&&&&&\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
748.3373&$V$& 180&18&1.69$\pm$0.69& 173.1$\pm$14.0&19.7&-0.403&1.641& -1.29$\pm$0.49\\
748.3421&$V$& 180&18&2.02$\pm$0.66& ~17.2$\pm$10.2&18.8&~1.141&1.667&  0.58$\pm$0.46\\
\noalign{\smallskip}
750.3412&$U$& 240&24&3.97$\pm$1.51& 167.7$\pm$13.8&43.2&-1.653&3.610& -0.53$\pm$1.07\\
750.3433&$B$& 180&18&3.00$\pm$1.53& ~34.0$\pm$17.7&43.9&~2.782&1.124& -1.60$\pm$1.07\\
750.3454&$V$& 180&18&2.60$\pm$0.64& 173.9$\pm$~7.2&18.2&-0.549&2.541& -0.08$\pm$0.45\\
\noalign{\smallskip}
752.3300&$U$& 240&24&4.11$\pm$1.51& 160.1$\pm$12.6&43.2&-2.631&3.158&  0.86$\pm$1.07\\
752.3321&$B$& 180&18&1.62$\pm$1.74& 166.3$\pm$34.9&49.5&-0.746&1.438&  2.32$\pm$1.23\\
752.3342&$V$& 180&18&2.75$\pm$0.72& ~14.4$\pm$~7.7&20.4&~1.325&2.410&  1.21$\pm$0.50\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
&&&& {\bf AS 160} &&&&&\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
744.4522&$V$& 240&24&0.76$\pm$0.18& ~18.4$\pm$~6.8&~5.2&~0.455&~0.609&  -0.02$\pm$0.13\\
744.4619&$V$& 300&30&1.64$\pm$0.16& 104.2$\pm$~2.8&~4.6&-0.780&-1.443&  -0.09$\pm$0.11\\
\noalign{\smallskip}
750.4176&$U$& 240&24&0.82$\pm$0.41&  13.0$\pm$17.5&11.6&~0.359&~0.737&  -0.28$\pm$0.29\\
750.4197&$B$& 180&18&1.83$\pm$0.46&  56.7$\pm$~7.4&13.1&~1.679&-0.727&  -0.73$\pm$0.32\\
750.4218&$V$& 180&18&0.78$\pm$0.20&  38.0$\pm$~7.5&~5.8&~0.757&~0.189&   0.04$\pm$0.14\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
&&&&{\bf HD 290770}&&&&&\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
748.2928&$V$& 180&18& 0.10$\pm$0.11&  98.3$\pm$34.2&3.1& -0.029& -0.096& -0.07$\pm$0.08\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
&&&& {\bf He 3-140}&&&&&\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
745.4334&$V$& 180&18&0.60$\pm$0.16& ~87.8$\pm$~8.2&~4.7& ~0.046&-0.598&  0.06$\pm$0.12 \\
745.4382&$V$& 180&18&0.59$\pm$0.16& ~94.1$\pm$~8.3&~4.7& -0.084&-0.584&  0.12$\pm$0.12 \\
\noalign{\smallskip}
750.4468&$U$& 240&24&0.76$\pm$0.35& 131.9$\pm$16.7&10.2&  -0.756&-0.082&-0.51$\pm$0.25\\
750.4489&$B$& 180&18&1.05$\pm$0.31& 118.6$\pm$~8.6&~8.9&  -0.883&-0.569& 0.36$\pm$0.22 \\
750.4510&$V$& 180&18&0.68$\pm$0.17& 100.5$\pm$~7.3&~4.9&  -0.244&-0.635& 0.06$\pm$0.12 \\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
&&&& {\bf He 3-180} &&&&&\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
745.4508&$V$& 180&18&0.24$\pm$0.54& ~70.3$\pm$44.1&~5.7&~0.152&-0.185& 0.58$\pm$0.38\\
745.4563&$V$& 180&18&2.33$\pm$0.46& 168.9$\pm$13.2&~5.8&-0.880&~2.157& 0.09$\pm$0.33\\
\noalign{\smallskip}
749.4441&$V$& 240&24&2.35$\pm$0.41&~~6.8$\pm$~5.0&11.5&~0.553&~2.284& 0.29$\pm$0.29\\
749.4503&$V$& 240&24&1.06$\pm$0.40&~14.2$\pm$12.7&11.5&~0.504&~0.932&-0.54$\pm$0.29\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
&&&&{\bf WRA 15-689}&&&&&\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
745.5195&$V$& 180&18&1.03$\pm$0.23& ~10.4$\pm$~6.4&~6.6& ~0.366&0.963& -0.40$\pm$0.16 \\
745.5250&$V$& 180&18&1.03$\pm$0.23& ~14.0$\pm$~6.4&~6.7& ~0.484&0.909&  0.27$\pm$0.16\\
\noalign{\smallskip}
750.5225&$U$& 240&24&1.44$\pm$0.44& 176.6$\pm$~9.2&12.5&  -0.171&1.430& 0.56$\pm$0.31\\
750.5246&$B$& 180&18&0.87$\pm$0.43& 176.0$\pm$17.5&12.5&  -0.121&0.862&-0.39$\pm$0.31\\
750.5267&$V$& 180&18&0.95$\pm$0.21& ~22.8$\pm$~6.1&~6.1&  ~0.679&0.665& 0.11$\pm$0.15\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
\end{tabular}
\end{table*}
%
\begin{table*}
\caption[]{Polarimetry of {\bf Hilt 641}}
\label{tab20}
\begin{tabular}{ccccccccrr}
\hline
\noalign{\smallskip}
JD2449000+&filter&t,($\sec$)&N&$p\pm\sigma_{p}(\%)$&
$\Theta\pm\sigma_{\Theta}(\degr)$&$\sigma_{1}(\degr)$&
Ux$10^{2}$&Qx$10^{2}$&$p_{c}\pm\sigma_{p_{c}}(\%)$\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
744.4814&$V$&120&12& 3.15$\pm$0.13& 114.5$\pm$3.7&1.2&-2.377&-2.067&  -0.05$\pm$0.09\\
\noalign{\smallskip}
749.4184&$V$&240&24& 3.23$\pm$0.09& 115.7$\pm$2.5&0.8&-2.524&-2.015&   0.03$\pm$0.06\\
749.4247&$U$&240&24& 2.92$\pm$0.19& 117.6$\pm$5.3&1.8&-2.398&-1.666&   0.05$\pm$0.13\\
749.4267&$B$&180&18& 3.27$\pm$0.19& 117.4$\pm$5.5&1.7&-2.672&-1.885&   0.24$\pm$0.14\\
749.4288&$V$&180&18& 3.27$\pm$0.11& 112.1$\pm$3.1&0.9&-2.280&-2.344&  -0.07$\pm$0.08\\
\noalign{\smallskip}
754.3071&$U$&240&24&   3.48$\pm$0.20& 118.9$\pm$1.6&5.8&-2.945&-1.854&  -0.24$\pm$0.14\\
754.3092&$B$&180&18&   3.34$\pm$0.21& 114.9$\pm$1.8&6.0&-2.551&-2.156&  -0.01$\pm$0.15\\
754.3113&$V$&180&18&   3.31$\pm$0.11& 116.5$\pm$0.9&3.2&-2.643&-1.992&   0.01$\pm$0.08\\
754.3182&$U$&240&24&   3.50$\pm$0.20& 117.6$\pm$1.6&5.8&-2.874&-1.997&   0.07$\pm$0.14\\
754.3203&$B$&180&18&   3.37$\pm$0.21& 113.1$\pm$1.8&6.0&-2.432&-2.333&  -0.09$\pm$0.15\\
754.3224&$V$&180&18&   3.25$\pm$0.11& 112.7$\pm$1.0&3.2&-2.314&-2.282&  -0.13$\pm$0.08\\
754.3293&$U$&240&24&   3.01$\pm$0.20& 117.4$\pm$1.9&5.6&-2.460&-1.735&   0.20$\pm$0.14\\
754.3314&$B$&180&18&   3.18$\pm$0.20& 118.8$\pm$1.8&5.8&-2.685&-1.704&   0.27$\pm$0.14\\
754.3335&$V$&180&18&   3.23$\pm$0.11& 116.2$\pm$0.9&3.1&-2.559&-1.971&  -0.01$\pm$0.08\\
754.3404&$U$&240&24&   3.19$\pm$0.20& 122.3$\pm$1.8&5.6&-2.882&-1.368&  -0.03$\pm$0.14\\
754.3425&$B$&180&18&   3.52$\pm$0.20& 114.7$\pm$1.7&5.8&-2.673&-2.291&   0.04$\pm$0.14\\
754.3446&$V$&180&18&   3.35$\pm$0.11& 114.0$\pm$0.9&3.1&-2.490&-2.242&   0.01$\pm$0.08\\
754.3550&$U$&240&24&   2.98$\pm$0.20& 116.4$\pm$1.9&5.6&-2.374&-1.802&   0.34$\pm$0.14\\
754.3571&$B$&180&18&   3.55$\pm$0.20& 117.5$\pm$1.6&3.8&-2.908&-2.036&   0.05$\pm$0.14\\
754.3592&$V$&180&18&   3.36$\pm$0.11& 112.8$\pm$0.9&3.1&-2.401&-2.351&  -0.10$\pm$0.08\\
754.3737&$U$&240&24&   2.91$\pm$0.19& 118.0$\pm$1.9&5.5&-2.412&-1.627&   0.33$\pm$0.14\\
754.3758&$B$&180&18&   3.57$\pm$0.20& 119.6$\pm$1.6&5.7&-3.066&-1.828&  -0.17$\pm$0.14\\
754.3779&$V$&180&18&   3.18$\pm$0.11& 116.4$\pm$1.0&3.1&-2.533&-1.923&  -0.06$\pm$0.08\\
754.3848&$U$&240&24&   3.13$\pm$0.19& 121.6$\pm$1.7&5.4&-2.794&-1.411&   0.05$\pm$0.13\\
754.3869&$B$&180&18&   3.39$\pm$0.20& 116.7$\pm$1.7&5.7&-2.722&-2.021&   0.05$\pm$0.14\\
754.3890&$V$&180&18&   3.27$\pm$0.11& 113.4$\pm$0.9&3.1&-2.384&-2.238&   0.00$\pm$0.08\\
754.4029&$U$&240&24&   2.92$\pm$0.19& 118.6$\pm$1.8&5.4&-2.454&-1.582&  -0.12$\pm$0.13\\
754.4050&$B$&180&18&   3.30$\pm$0.24& 120.8$\pm$2.1&7.0&-2.903&-1.570&   0.06$\pm$0.17\\
754.4071&$V$&180&18&   3.22$\pm$0.11& 115.4$\pm$0.9&3.0&-2.495&-2.035&  -0.04$\pm$0.07\\
754.4154&$V$&180&18&   3.06$\pm$0.10& 114.9$\pm$0.9&2.8&-2.337&-1.975&  -0.04$\pm$0.07\\
754.4223&$V$&180&18&   3.40$\pm$0.09& 114.7$\pm$0.8&2.6&-2.582&-2.213&  -0.09$\pm$0.17\\
754.4286&$V$&180&18&   3.23$\pm$0.09& 114.6$\pm$0.8&2.7&-2.445&-2.111&  -0.10$\pm$0.07\\
754.4348&$V$&180&18&   3.18$\pm$0.09& 115.8$\pm$0.8&2.7&-2.492&-1.975&  -0.05$\pm$0.07\\
754.4404&$V$&180&18&   3.19$\pm$0.09& 114.9$\pm$0.8&2.7&-2.437&-2.059&  -0.07$\pm$0.07\\
754.4460&$V$&180&18&   3.20$\pm$0.09& 115.0$\pm$0.8&2.7&-2.451&-2.057&   0.10$\pm$0.07\\
754.4522&$V$&180&18&   3.33$\pm$0.09& 114.9$\pm$0.9&2.7&-2.543&-2.149&  -0.06$\pm$0.07\\
\noalign{\smallskip}
755.4001&$V$&180&18&   3.25$\pm$0.13& 115.7$\pm$1.1&3.6&-2.540&-2.028&   0.01$\pm$0.09\\
755.4050&$V$&180&18&   3.10$\pm$0.11& 115.5$\pm$1.0&3.0&-2.409&-1.951&   0.06$\pm$0.07\\
755.4112&$V$&180&18&   3.17$\pm$0.09& 116.0$\pm$0.8&2.6&-2.498&-1.952&   0.04$\pm$0.06\\
755.4195&$V$&180&18&   3.01$\pm$0.09& 113.4$\pm$0.9&2.6&-2.194&-2.060&   0.03$\pm$0.06\\
755.4251&$V$&180&18&   3.24$\pm$0.09& 115.4$\pm$0.8&2.6&-2.511&-2.048&   0.02$\pm$0.06\\
755.4507&$V$&180&18&   3.40$\pm$0.10& 114.7$\pm$0.8&2.7&-2.582&-2.213&  -0.16$\pm$0.07\\
755.4577&$V$&180&18&   3.30$\pm$0.09& 114.7$\pm$0.8&2.7&-2.506&-2.148&  -0.14$\pm$0.07\\
755.4640&$V$&180&18&   3.18$\pm$0.09& 114.3$\pm$0.8&2.6&-2.385&-2.103&  -0.08$\pm$0.06\\
755.4709&$V$&180&18&   3.31$\pm$0.10& 116.3$\pm$0.8&2.8&-2.630&-2.010&   0.15$\pm$0.07\\
755.4764&$V$&180&18&   3.43$\pm$0.09& 116.0$\pm$0.8&2.6&-2.703&-2.112&  -0.01$\pm$0.07\\
755.4827&$V$&180&18&   3.36$\pm$0.09& 113.9$\pm$0.8&2.7&-2.489&-2.257&  -0.09$\pm$0.07\\
755.4932&$V$&180&18&   3.28$\pm$0.10& 116.2$\pm$0.8&2.8&-2.599&-2.001&  -0.08$\pm$0.07\\
755.5105&$V$&180&18&   3.21$\pm$0.10& 114.7$\pm$0.9&2.8&-2.437&-2.089&  -0.06$\pm$0.07\\
755.5244&$V$&180&18&   3.52$\pm$0.10& 115.6$\pm$0.8&2.7&-2.743&-2.206&   0.05$\pm$0.07\\
755.5313&$V$&180&18&   3.16$\pm$0.10& 114.1$\pm$0.9&2.8&-2.356&-2.106&  -0.02$\pm$0.07\\
755.5368&$V$&180&18&   3.32$\pm$0.10& 113.5$\pm$0.8&2.8&-2.428&-2.264&  -0.10$\pm$0.07\\
755.5417&$V$&180&18&   3.34$\pm$0.10& 116.2$\pm$0.9&2.9&-2.646&-2.038&  -0.09$\pm$0.07\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
\end{tabular}
\end{table*}
%
\begin{table*}
\caption[]{Polarimetry of~ {\bf He 3-365, MWC 272, HD 90578}}
\label{tab21}
\begin{tabular}{ccccccccrr}
\hline
\noalign{\smallskip}
JD2449000+&filter&t,($\sec$)&N&$p\pm\sigma_{p}(\%)$&
$\Theta\pm\sigma_{\Theta}(\degr)$&$\sigma_{1}(\degr)$&
Ux$10^{2}$&Qx$10^{2}$&$p_{c}\pm\sigma_{p_{c}}(\%)$\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
&&&&{\bf He 3-365}&&&&&\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
742.4898&$U$&240&24&1.55$\pm$0.21& 157.3$\pm$3.9&6.0&-1.104&1.088&   0.04$\pm$0.15\\
742.4919&$B$&180&18&1.55$\pm$0.25& 161.3$\pm$4.6&7.2&-0.941&1.231&  -0.08$\pm$0.18\\
742.4933&$V$&120&12&1.11$\pm$0.12& 151.3$\pm$3.1&3.4&-0.935&0.598&  -0.15$\pm$0.08\\
\noalign{\smallskip}
743.5196&$U$&180&18&1.11$\pm$0.22& 152.9$\pm$5.3&6.3&-0.900&0.649&  -0.04$\pm$0.16\\
743.5217&$B$&180&18&1.27$\pm$0.23& 143.1$\pm$5.0&6.6&-1.220&0.354&   0.09$\pm$0.16\\
743.5224&$V$&180&18&1.15$\pm$0.15& 156.7$\pm$4.8&4.3&-0.836&0.790&  -0.13$\pm$0.11\\
743.5335&$U$&240&24&0.89$\pm$0.19& 157.7$\pm$6.1&5.5&-0.625&0.634&  -0.21$\pm$0.14\\
743.5356&$B$&180&18&1.74$\pm$0.23& 151.1$\pm$3.9&6.7&-1.472&0.927&   0.11$\pm$0.17\\
743.5376&$V$&180&18&0.89$\pm$0.09& 150.3$\pm$2.8&2.5&-0.766&0.453&   0.03$\pm$0.06 \\
743.5522&$U$&240&24&1.30$\pm$0.18& 149.0$\pm$4.0&5.2&-1.148&0.610&  -0.24$\pm$0.13 \\
743.5543&$B$&180&18&0.88$\pm$0.22& 144.6$\pm$7.1&6.4&-0.831&0.289&   0.22$\pm$0.16 \\
743.5557&$V$&180&18&0.79$\pm$0.10& 151.3$\pm$3.8&3.0&-0.666&0.426&   0.11$\pm$0.07 \\
\noalign{\smallskip}
744.5085&$V$&120&12&0.84$\pm$0.10& 150.2$\pm$3.2&2.8&-0.725&0.425&  -0.04$\pm$0.07\\
744.5140&$V$&180&18&0.88$\pm$0.08& 160.0$\pm$2.6&2.3&-0.566&0.674&  -0.00$\pm$0.06\\
\noalign{\smallskip}
746.5458&$V$&180&18&1.04$\pm$0.08& 154.7$\pm$2.2&2.2&-0.804&0.660&  -0.01$\pm$0.06 \\
746.5513&$U$&240&24&1.33$\pm$0.17& 161.0$\pm$3.7&4.8&-0.819&1.048&  -0.11$\pm$0.12 \\
746.5535&$B$&180&18&1.04$\pm$0.21& 146.9$\pm$5.9&5.9&-0.952&0.420&  -0.06$\pm$0.15  \\
746.5549&$V$&120&12&0.91$\pm$0.10& 160.5$\pm$3.0&2.7&-0.573&0.707&  -0.01$\pm$0.07  \\
\noalign{\smallskip}
748.4761&$V$&180&18&0.94$\pm$0.09& 160.6$\pm$2.7&2.5&-0.589&0.733&  -0.22$\pm$0.06 \\
748.4817&$U$&240&24&1.19$\pm$0.19& 163.0$\pm$4.6&5.3&-0.665&0.987&  -0.07$\pm$0.13\\
748.4838&$B$&180&18&0.64$\pm$0.23& 154.7$\pm$6.6&6.4&-0.495&0.406&   0.24$\pm$0.16 \\
748.4859&$V$&180&18&0.77$\pm$0.08& 157.1$\pm$3.1&2.4&-0.552&0.537&  -0.20$\pm$0.06 \\
\noalign{\smallskip}
750.4635&$U$&240&24&1.15$\pm$0.17& 157.5$\pm$4.2&4.9&-0.813&0.813&   0.07$\pm$0.12 \\
750.4656&$B$&180&18&0.97$\pm$0.21& 153.5$\pm$6.3&5.9&-0.775&0.584&   0.02$\pm$0.15 \\
750.4677&$V$&180&18&1.00$\pm$0.08& 160.1$\pm$2.2&2.2&-0.640&0.768&   0.03$\pm$0.05 \\
\noalign{\smallskip}
752.5078&$U$&240&24&1.41$\pm$0.17& 150.8$\pm$3.6&5.0&-1.201&0.739&   0.14$\pm$0.12 \\
752.5099&$B$&180&18&1.08$\pm$0.21& 147.9$\pm$5.7&6.0&-0.972&0.470&   0.03$\pm$0.15 \\
752.5119&$V$&180&18&0.81$\pm$0.08& 154.3$\pm$2.8&2.3&-0.633&0.505&  -0.01$\pm$0.06 \\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
&&&&{\bf MWC 272}&&&&&\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
576.3478 &$U$&      180&18&1.96$\pm$0.67 & 163.1$\pm$11.0&9.0& -1.090&1.626&-0.48$\pm$0.47 \\
576.3492 &$B$&      120&12&3.51$\pm$0.28 & 168.1$\pm$~2.3&7.8& -1.416&3.212&-0.18$\pm$0.20 \\
576.3504 &$V$&      100&10&3.02$\pm$0.12 & 168.1$\pm$~1.1&3.2& -1.219&2.763&-0.21$\pm$0.08 \\
576.3513 &$R_{c}$ & ~80&~8&2.90$\pm$0.08 & 166.3$\pm$~0.8&2.2& -1.335&2.575& 0.03$\pm$0.05 \\
576.3525 &$I_{c}$ & 100&10&2.74$\pm$0.05 & 166.3$\pm$~0.5&1.5& -1.261&2.433& 0.01$\pm$0.04 \\
\noalign{\smallskip}
923.4817&$V$&       600&20&3.261$\pm$0.059& 164.5$\pm$~0.5&1.7& -1.690&2.795& 0.037$\pm$0.041\\
923.4887& $R_{c}$&  600&20&3.105$\pm$0.035& 161.8$\pm$~0.3&1.0& -1.843&2.409& 0.027$\pm$0.024\\
923.4956& $I_{c}$&  600&20&2.866$\pm$0.028& 160.7$\pm$~0.3&0.8& -1.788&2.240& 0.043$\pm$0.020\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
&&&&{\bf HD 90578}&&&&&\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
744.5376&$V$&120&12&   2.39$\pm$0.17& 122.2$\pm$2.0 &4.8&-2.155&-1.033&  -0.11$\pm$0.12 \\
744.5425&$V$&180&18&   2.21$\pm$0.13& 119.3$\pm$1.7 &3.7&-1.886&-1.151&   0.17$\pm$0.09 \\
\noalign{\smallskip}
750.4801&$U$&240&24&   2.38$\pm$0.21& 122.5$\pm$2.6 &6.1&-2.157&-1.006&   0.23$\pm$0.15 \\
750.4822&$B$&180&18&   2.28$\pm$0.21& 128.7$\pm$2.6 &6.0&-2.225&-0.497&  -0.16$\pm$0.15 \\
750.4843&$V$&180&18&   2.16$\pm$0.12& 125.6$\pm$1.6 &3.5&-2.045&-0.696&   0.07$\pm$0.09 \\
\noalign{\smallskip}
752.5355&$U$&240&24&   2.52$\pm$0.21& 124.7$\pm$2.4 &6.2&-2.359&-0.887&   0.10$\pm$0.15 \\
752.5376&$B$&180&18&   2.23$\pm$0.21& 128.7$\pm$2.7 &6.0&-2.176&-0.486&  -0.08$\pm$0.15 \\
752.5397&$V$&180&18&   2.25$\pm$0.12& 124.6$\pm$1.6 &3.5&-2.130&-0.725&  -0.01$\pm$0.09 \\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
\end{tabular}
\end{table*}
%
\begin{table*}
\caption[]{Polarimetry of~ {\bf HD 303004, MWC 925, WRA 15--535}}
\label{tab22}
\begin{tabular}{ccccccccrr}
\hline
\noalign{\smallskip}
JD2449000+&filter&t,($\sec$)&N&$p\pm\sigma_{p}(\%)$&
$\Theta\pm\sigma_{\Theta}(\degr)$&$\sigma_{1}(\degr)$&
Ux$10^{2}$&Qx$10^{2}$&$p_{c}\pm\sigma_{p_{c}}(\%)$\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
&&&&{\bf HD 303004}&&&&&\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
745.4917&$V$  &180&18& 4.32$\pm$0.14& 113.3$\pm$0.9&4.0&-3.139&-2.968&  0.08$\pm$0.10\\
745.4987&$V$  &180&18& 4.57$\pm$0.14& 114.6$\pm$0.9&4.0&-3.459&-2.986& -0.29$\pm$0.10\\
745.5042&$V$  &180&18& 4.18$\pm$0.14& 112.9$\pm$1.0&4.1&-2.997&-2.914&  0.16$\pm$0.10\\
\noalign{\smallskip}
750.5023&$U$  &240&24& 4.19$\pm$0.31& 112.1$\pm$2.1&8.8&-2.921&-3.003&  0.19$\pm$0.22\\
750.5044&$B$  &180&18& 4.40$\pm$0.34& 117.1$\pm$2.3&9.8&-3.569&-2.574& -0.01$\pm$0.24\\
750.5065&$V$  &180&18& 4.14$\pm$0.14& 113.8$\pm$1.0&4.0&-3.057&-2.792&  0.06$\pm$0.10\\
\noalign{\smallskip}
752.5508&$U$  &240&24& 3.97$\pm$0.31& 112.6$\pm$2.2&8.8&-2.817&-2.797&  0.03$\pm$0.22\\
752.5529&$B$  &180&18& 4.12$\pm$0.34& 115.2$\pm$2.2&9.9&-3.406&-2.817&  0.28$\pm$0.24\\
752.5550&$V$  &180&18& 4.37$\pm$0.14& 112.7$\pm$0.9&4.0&-3.112&-3.068&  -0.13$\pm$0.10\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
&&&&{\bf MWC 925}&&&&&\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
571.4259 &$U$    &240&24&   0.92$\pm$0.18 & 144.4$\pm$~5.2&5.6&-0.871&~0.296&  0.28$\pm$0.13 \\
571.4280 &$B$    &180&18&   0.50$\pm$0.09 & 148.6$\pm$~5.2&2.5&-0.445&~0.229& -0.00$\pm$0.06 \\
571.4290 &$V$    &~80&~8&   0.19$\pm$0.11 & 127.4$\pm$21.8&3.1&-0.183&-0.050&  0.06$\pm$0.08 \\
571.4293 &$R_{c}$&~30&~3&   0.12$\pm$0.17 & 161.1$\pm$40.6&5.0&-0.074&~0.095& -0.05$\pm$0.06 \\
571.4297 &$I_{c}$&~30&~3&   0.41$\pm$0.23 & 112.6$\pm$20.0&6.6&-0.291&-0.289& -0.02$\pm$0.16 \\
\noalign{\smallskip}
574.3570 &$U$&180&18&     1.24$\pm$0.25 & 179.3$\pm$~5.8&7.0 &-0.030&~1.240&  -0.07$\pm$0.17 \\
574.3584 &$B$&120&12&     0.88$\pm$0.14 &   2.8$\pm$~4.6&3.9 &~0.086&~0.876&  -0.13$\pm$0.10 \\
574.3595 &$V$&100&10&     0.62$\pm$0.12 & 166.4$\pm$~5.5&3.3 &-0.283&~0.551&   0.07$\pm$0.08 \\
574.3605 &$R_{c}$&~80&~8& 0.50$\pm$0.12 & 165.6$\pm$~7.0&3.5 &-0.241&~0.438&   0.05$\pm$0.09 \\
574.3616 &$I_{c}$&~100&10& 0.11$\pm$0.13 &~16.9$\pm$36.2&3.7 &~0.061&~0.091&   0.14$\pm$0.09 \\
574.3692 &$U$&180&18&     1.51$\pm$0.25 & 178.2$\pm$~4.7&7.1 &-0.095&~1.507&  -0.15$\pm$0.17 \\
574.3706 &$B$&120&12&     0.98$\pm$0.14 & 174.8$\pm$~4.1&3.9 &-0.177&~0.964&   0.02$\pm$0.10 \\
574.3718 &$V$&120&12&     0.52$\pm$0.12 & 173.5$\pm$~6.6&3.3 &-0.117&~0.507&  -0.21$\pm$0.08 \\
574.3727 &$R_{c}$&~80&~8& 0.32$\pm$0.13 & 170.6$\pm$13.8&3.6 &-0.103&~0.303&   0.00$\pm$0.09 \\
574.3739 &$I_{c}$&100&10& 0.26$\pm$0.13 & 164.0$\pm$17.5&3.8 &-0.138&~0.220&   0.18$\pm$0.09 \\
\noalign{\smallskip}
575.3974 &$U$&180&18&     1.06$\pm$0.17 &  17.7$\pm$~4.6&4.7 &~0.614&~0.864&  -0.10$\pm$0.12 \\
575.3988 &$B$&120&12&     0.43$\pm$0.09 &  24.5$\pm$~6.0&2.5 &~0.325&~0.282&   0.12$\pm$0.06 \\
575.4000 &$V$&100&10&     0.28$\pm$0.08 &  19.8$\pm$~8.5&2.2 &~0.178&~0.216&   0.03$\pm$0.05 \\
575.4009 &$R_{c}$&~80&~8& 0.06$\pm$0.08 &  62.8$\pm$38.2&2.4 &~0.049&-0.035&  -0.05$\pm$0.06 \\
575.4021 &$I_{c}$&100&10& 0.11$\pm$0.09 &  91.0$\pm$29.0&2.4 &-0.038&-0.110&  -0.05$\pm$0.06 \\
\noalign{\smallskip}
918.3908 &$V$    &240&24& 0.08$\pm$0.06 & 143.9$\pm$28.1&1.6 &-0.076&~0.024&  -0.03$\pm$0.04 \\
918.3936 &$R_{c}$&240&24& 0.08$\pm$0.05 & 160.7$\pm$22.7&1.5 &-0.050&~0.063&   0.02$\pm$0.04 \\
918.3964 &$I_{c}$&240&24& 0.13$\pm$0.06 & 121.2$\pm$16.6&1.8 &-0.115&-0.060&   0.03$\pm$0.05 \\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
&&&&{\bf WRA 15-535}&&&&&\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
744.5230 &$V$&180&18&   2.55$\pm$0.10 & 43.3$\pm$1.1 &~2.9&2.546&~0.151&  0.06$\pm$0.07\\
744.5272 &$V$&120&12&   2.29$\pm$0.12 & 44.6$\pm$1.5 &~3.5&2.290&~0.032&  0.02$\pm$0.09\\
\noalign{\smallskip}
746.5208 &$V$&180&18&   2.93$\pm$0.10 & 43.8$\pm$1.0 &~2.9&2.927&~0.123&  0.05$\pm$0.07\\
746.5284 &$U$&240&24&   2.52$\pm$0.21 & 45.1$\pm$2.3 &~6.1&2.520&-0.009& -0.08$\pm$0.15\\
746.5305 &$B$&180&18&   2.47$\pm$0.37 & 46.3$\pm$4.3 &10.4&2.467&-0.112& -0.03$\pm$0.26\\
746.5319 &$V$&120&12&   2.86$\pm$0.12 & 43.5$\pm$1.2 &~3.5&2.856&~0.150& -0.13$\pm$0.09\\
\noalign{\smallskip}
748.4969 &$V$&180&18&   3.19$\pm$0.11 & 45.8$\pm$1.0 &~3.2&3.189&-0.089&  0.02$\pm$0.08\\
748.5033 &$U$&240&24&   3.25$\pm$0.25 & 43.2$\pm$2.2 &~7.1&3.244&~0.204& -0.02$\pm$0.18\\
748.5054 &$B$&180&18&   2.94$\pm$0.43 & 40.8$\pm$4.3 &12.3&2.908&~0.429&  0.15$\pm$0.30\\
748.5075 &$V$&180&18&   3.26$\pm$0.12 & 45.9$\pm$1.0 &~3.4&3.258&-0.102& -0.04$\pm$0.08\\
\noalign{\smallskip}
749.5010 &$U$&240&24&   2.66$\pm$0.22 & 46.5$\pm$2.3 &~6.1&2.656&-0.139& -0.07$\pm$0.15\\
749.5031 &$B$&180&18&   2.72$\pm$0.37 & 51.4$\pm$3.8 &10.4&2.652&-0.603&  0.06$\pm$0.26\\
749.5052 &$V$&180&18&   3.00$\pm$0.10 & 48.1$\pm$0.9 &~2.9&2.982&-0.324&  0.14$\pm$0.07\\
\noalign{\smallskip}
752.5216 &$U$&240&24&   1.80$\pm$0.20 & 41.0$\pm$3.2 &~5.8&1.782&~0.251& -0.17$\pm$0.14\\
752.5237 &$B$&180&18&   2.18$\pm$0.34 & 42.7$\pm$4.4 &~9.8&2.173&~0.175& -0.05$\pm$0.24\\
752.5258 &$V$&180&18&   2.05$\pm$0.10 & 47.9$\pm$1.3 &~2.7&2.040&-0.207&  0.05$\pm$0.07\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
\end{tabular}
\end{table*}
\end{document}
