\documentstyle{l-aa}
\begin{document}
\setcounter{table}{5}
\begin{table*}
\caption[]{Polarimetry of {\bf V 1012 Ori, HD 34282,
V 346 Ori, HD 35929, RY Ori, V 586 Ori, VY Mon}}
\label{tab6}
\begin{tabular}{ccccccccrr}
\hline
\noalign{\smallskip}
JD2449000+&filter&t,($\sec$)&N&$p\pm\sigma_{p}(\%)$&
$\Theta\pm\sigma_{\Theta}(\degr)$&$\sigma_{1}(\degr)$&
Ux$10^{2}$&Qx$10^{2}$&$p_{c}\pm\sigma_{p_{c}}(\%)$\\
\hline
\noalign{\smallskip}
&&&&{\bf V 1012 Ori}~~~&&&&&\\
\noalign{\smallskip}
\hline
747.2986 &$V$&180&18& 0.98$\pm$0.40 & ~43.4$\pm$13.5&11.3 &~0.978&~0.055& -0.73$\pm$0.28\\
747.3054 &$V$&180&18& 0.64$\pm$0.40 & ~11.8$\pm$23.2&11.3 &~0.256&~0.586& -0.28$\pm$0.28\\
\noalign{\smallskip}
749.3052& $U$ &240&24&  1.17$\pm$1.14& 144.5$\pm$33.6&32.7&-1.106&~0.381& -0.38$\pm$0.81\\
749.3073& $B$ &180&18&  1.97$\pm$0.94& ~25.0$\pm$33.4&26.9&~1.509&~1.266& -0.80$\pm$0.66\\
749.3094& $V$ &180&18&  0.37$\pm$0.47& 125.5$\pm$36.4&13.6&-0.350&-0.120& 0.12$\pm$0.34\\
\hline
\noalign{\smallskip}
&&&& {\bf HD 34282}&&&&&\\
\noalign{\smallskip}
\hline
746.3021& $V$& 180&18&  0.20$\pm$0.16& 114.2$\pm$27.4&4.6 &-0.150&-0.133& 0.06$\pm$0.11 \\
746.3083& $V$& 180&18&  0.20$\pm$0.16& ~93.7$\pm$27.4&4.6 &-0.026&-0.198& -0.14$\pm$0.11 \\
746.3159& $V$& 180&18&  0.18$\pm$0.17& ~99.2$\pm$33.3&4.8 &-0.057&-0.171& 0.09$\pm$0.12 \\
746.3229& $V$& 180&18&  0.19$\pm$0.17& ~56.5$\pm$33.1&5.0 &~0.175&-0.074& 0.32$\pm$0.12 \\
\noalign{\smallskip}
747.3159& $V$& 180&18&  0.17$\pm$0.11& 143.8$\pm$23.4&3.2 &-0.162&~0.051& 0.08$\pm$0.08  \\
747.3207& $V$& 180&18&  0.10$\pm$0.11& ~86.4$\pm$34.7&3.1 &-0.013&-0.099& -0.17$\pm$0.08 \\
\hline
\noalign{\smallskip}
&&&&{\bf V 346 Ori}&&&&&\\
\noalign{\smallskip}
\hline
746.3340& $V$ &  180&18&0.41$\pm$0.18 &~71.5$\pm$15.4&~5.0 &~0.247&-0.327&   -0.12$\pm$0.12\\
746.3389& $V$ &  180&18&0.58$\pm$0.22 &~79.5$\pm$12.3&~6.2 &~0.208&-0.541&   -0.40$\pm$0.15\\
\noalign{\smallskip}
747.3429& $V$ &  180&18&0.17$\pm$0.13 &114.6$\pm$26.7&~3.8 &-0.129&-0.111&  0.01$\pm$0.09\\
\noalign{\smallskip}
750.2933& $U$ &  240&24&0.54$\pm$0.40 &~~8.2$\pm$27.4&10.8 &~0.152&~0.518&  -0.45$\pm$0.28\\
750.2954& $B$ &  180&18&0.37$\pm$0.32 &172.1$\pm$30.5&~9.3 &-0.101&~0.356&   0.37$\pm$0.23\\
750.2975& $V$ &  180&18&0.41$\pm$0.17 &~64.5$\pm$14.3&~5.0 &~0.319&-0.258&  -0.15$\pm$0.12\\
\hline
\noalign{\smallskip}
&&&& {\bf HD 35929}&&&&&\\
\noalign{\smallskip}
\hline
746.3514& $V$ &  180&18&0.07$\pm$0.06&  20.2$\pm$29.5&1.7 &~0.045&~0.053&  0.06$\pm$0.04 \\
746.3569& $V$ &  180&18&0.12$\pm$0.06&  69.9$\pm$17.3&1.6 &~0.077&-0.092&  0.00$\pm$0.04 \\
746.3743& $V$ &  180&18&0.05$\pm$0.06&  ~0.5$\pm$35.4&1.7 &~0.009&~0.050&  -0.10$\pm$0.04 \\
\noalign{\smallskip}
747.3513& $V$ &  180&18&0.05$\pm$0.16&  66.1$\pm$45.5&4.5 &~0.037&-0.034& 0.01$\pm$0.11 \\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
&&&& {\bf RY Ori} &&&&&\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
748.3206 &$V$& 180&18&6.55$\pm$1.88& 165.4$\pm$~8.5&53.9&-3.195&~5.718& 1.40$\pm$1.33 \\
748.3268 &$V$& 180&18&4.29$\pm$1.90& ~41.3$\pm$15.2&54.3&~4.254&~0.553&  0.85$\pm$1.34\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
&&&&{\bf V 586 Ori}&&&&&\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
744.3494&$U$& 240&24&0.71$\pm$0.30& 108.9$\pm$13.3&8.7&-0.435&-0.561&   -0.04$\pm$0.21\\
744.3515&$B$& 180&18&0.37$\pm$0.24& 111.2$\pm$23.2&6.8&-0.249&-0.273&   -0.07$\pm$0.17\\
744.3529&$V$& 120&12&0.15$\pm$0.17& ~86.8$\pm$34.3&4.7&~0.017&-0.149&    0.11$\pm$0.12\\
\noalign{\smallskip}
745.3042&$V$& 180&18&0.30$\pm$0.13& ~82.3$\pm$15.4&3.8&~0.080&-0.289&   -0.18$\pm$0.09\\
\noalign{\smallskip}
747.3596&$V$& 180&18&0.16$\pm$0.10&  54.6$\pm$22.2&2.9&~0.151&-0.053&    0.01$\pm$0.07\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
&&&& {\bf VY Mon}&&&&&\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
744.4286&$V$& 240&24&~8.91$\pm$0.60&~~8.7$\pm$1.9&17.2&~2.664&~8.502&  -0.48$\pm$0.43\\
744.4349&$U$& 240&24&10.81$\pm$1.50&~~7.1$\pm$3.9&42.5&~2.652&10.480&   2.29$\pm$1.06\\
744.4383&$V$& 120&12&~8.50$\pm$0.90&~~6.1$\pm$3.0&25.6&~1.796&~8.308&  -0.22$\pm$0.63\\
\noalign{\smallskip}
747.3992&$V$& 180&18&~7.89$\pm$0.58&~~2.4$\pm$2.1&16.5&~0.660&~7.862&   0.52$\pm$0.41\\
747.4061&$V$& 360&36&~8.18$\pm$0.42&177.9$\pm$1.5&12.0&-0.599&~8.158&   0.30$\pm$0.30\\
\noalign{\smallskip}
749.3934&$U$& 240&24&~9.55$\pm$1.39&~~3.7$\pm$4.2&39.6&~1.230&~9.471&  -0.44$\pm$0.98\\
749.3962&$B$& 180&18&12.92$\pm$2.28&~~5.1$\pm$5.1&65.1&~2.288&12.716&   2.14$\pm$1.60\\
749.3983&$V$& 180&18&~6.22$\pm$0.62&~~8.2$\pm$2.8&17.6&~1.756&~5.967&   0.68$\pm$0.44\\
749.4059&$V$& 240&24&~8.72$\pm$0.61&~~4.7$\pm$2.0&17.2&~1.425&~8.605&   0.12$\pm$0.43\\
\noalign{\smallskip}
751.3558&$U$& 240&24&~8.83$\pm$3.01&173.3$\pm$9.8&85.0&-2.046&~8.590&   3.10$\pm$2.12\\
751.3599&$V$& 180&18&13.03$\pm$1.26&~~9.0$\pm$2.8&35.6&~4.026&12.392&   1.09$\pm$0.88\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
\end{tabular}
\end{table*}
%
\begin{table*}
\caption[]{Polarimetry of {\bf HD 37357, HD 37411, V 599 Ori,
V 350 Ori, GU CMa, MWC 120}}
\label{tab7}
\begin{tabular}{ccccccccrr}
\hline
\noalign{\smallskip}
JD2449000+&filter&t,($\sec$)&N&$p\pm\sigma_{p}(\%)$&
$\Theta\pm\sigma_{\Theta}(\degr)$&$\sigma_{1}(\degr)$&
Ux$10^{2}$&Qx$10^{2}$&$p_{c}\pm\sigma_{p_{c}}(\%)$\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
&&&&{\bf HD 37357}&&&&&\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
746.3840&$V$& 180&18&0.06$\pm$0.09&69.1$\pm$43.4&2.6&~0.040&-0.045& 0.16$\pm$0.06\\
746.3902&$V$& 180&18&0.14$\pm$0.09&43.5$\pm$22.1&2.6&~0.140&~0.007&-0.03$\pm$0.06\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
&&&& {\bf HD 37411}&&&&&\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
744.3647&$U$&240&24&0.89$\pm$0.34&~10.8$\pm$13.3&9.6&~0.328&~0.827&  0.26$\pm$0.24\\
744.3668&$B$&180&18&0.24$\pm$0.26&~23.7$\pm$35.4&7.4&~0.177&~0.162& -0.09$\pm$0.18\\
744.3682&$V$&120&12&0.41$\pm$0.18&~35.5$\pm$15.4&5.2&~0.388&~0.133& -0.12$\pm$0.13\\
\noalign{\smallskip}
749.2879&$U$&240&24&1.21$\pm$0.32&168.3$\pm$~8.5&9.2&-0.481&~1.110& 0.21$\pm$0.23\\
749.2900&$B$&180&18&0.76$\pm$0.25&~~4.4$\pm$10.4&7.2&~0.116&~0.751& 0.15$\pm$0.18\\
749.2920&$V$&180&18&0.11$\pm$0.14&106.4$\pm$35.3&4.1&-0.060&-0.092&-0.32$\pm$0.10\\
\noalign{\smallskip}
750.3121&$U$&240&24&0.31$\pm$0.32&~25.3$\pm$35.3&9.1&~0.240&~0.197& 0.12$\pm$0.22\\
750.3142&$B$&180&18&0.32$\pm$0.25&~28.6$\pm$27.6&7.2&~0.269&~0.173&-0.14$\pm$0.18\\
750.3163&$V$&180&18&0.53$\pm$0.14&~30.3$\pm$~7.5&4.1&~0.462&~0.260& 0.01$\pm$0.10\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
&&&&{\bf V 599 Ori}&&&&&\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
744.3869&$U$&240&24&5.66$\pm$1.69& 128.4$\pm$~8.7&48.4&-5.510&-1.292&  2.7$\pm$1.2\\
744.3890&$B$&180&18&5.50$\pm$3.09& 136.3$\pm$20.3&88.5&-5.494&~0.249& -3.2$\pm$2.2\\
744.3904&$V$&120&12&1.58$\pm$1.01& ~52.5$\pm$23.5&29.0&~1.526&-0.409& -0.5$\pm$0.7\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
&&&&{\bf V 350 Ori}&&&&&\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
744.4015&$U$&240&24&4.45$\pm$1.28&~55.6$\pm$~8.4&36.4&~4.149&-1.609&  -2.16$\pm$0.89\\
744.4036&$B$&180&18&3.34$\pm$1.30&~72.6$\pm$12.5&37.3&~1.906&-2.743&   0.19$\pm$0.92\\
744.4050&$V$&120&12&5.33$\pm$0.71&~52.4$\pm$~3.8&20.4&~5.153&-1.362&   0.04$\pm$0.50\\
\noalign{\smallskip}
747.3728&$V$&180&18&4.99$\pm$0.50&~54.8$\pm$~2.8&14.2&~4.701&-1.674& 0.06$\pm$0.35\\
747.3825&$V$&180&18&4.31$\pm$0.51&~58.2$\pm$~3.4&14.7&~4.135&-1.217& 0.87$\pm$0.36\\
\noalign{\smallskip}
749.3226&$U$&240&24&2.31$\pm$0.86&~75.4$\pm$12.3&24.7&~1.127&-2.016&  0.42$\pm$0.61\\
749.3247&$B$&180&18&1.84$\pm$0.73&~72.6$\pm$13.1&21.1&~1.050&-1.511& -0.36$\pm$0.52\\
749.3268&$V$&180&18&1.97$\pm$0.34&~75.9$\pm$~4.9&~9.8&~0.931&-1.736&  0.31$\pm$0.24\\
749.3337&$B$&240&24&2.64$\pm$0.64&~80.2$\pm$~7.0&18.3&~0.886&-2.487&  0.26$\pm$0.45\\
749.3365&$V$&240&24&2.85$\pm$0.30&~65.9$\pm$~3.0&~8.5&~2.125&-1.900& -0.26$\pm$0.21\\
\noalign{\smallskip}
751.2960&$U$&240&24&1.04$\pm$0.92&110.6$\pm$31.3&26.4&-0.685&-0.783&  0.53$\pm$0.65\\
751.2981&$B$&180&18&3.97$\pm$0.75&~75.7$\pm$~5.5&21.5&~1.900&-3.486& -0.85$\pm$0.53\\
751.3002&$V$&180&18&2.27$\pm$0.37&~76.3$\pm$~4.7&10.6&~1.045&-2.015&  0.05$\pm$0.26\\
751.3071&$V$&180&18&2.04$\pm$0.36&~73.9$\pm$~5.1&10.3&~1.087&-1.726& -0.05$\pm$0.26\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
&&&&{\bf GU CMa}&&&&&\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
747.4179&$V$&180&18&1.244$\pm$0.070 & 12.6$\pm$1.6 &2.0&0.530&1.126&  0.03$\pm$0.05\\
747.4332&$V$&180&18&0.969$\pm$0.094 & 17.5$\pm$2.7 &2.7&0.555&0.792& -0.02$\pm$0.07\\
\noalign{\smallskip}
751.4023&$U$&240&24&0.93$\pm$0.17 & ~6.8$\pm$5.3 &4.8&0.218&0.900& -0.04$\pm$0.12\\
751.4044&$B$&180&18&1.36$\pm$0.17 & 11.5$\pm$3.6 &4.8&0.532&1.253&  0.08$\pm$0.12\\
751.4065&$V$&180&18&1.17$\pm$0.09 & 13.5$\pm$2.2 &2.6&0.531&1.042&  0.09$\pm$0.07\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
&&&& {\bf MWC 120}&&&&&\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
749.3476& $U$ &  240&24&0.561$\pm$0.115 &131.9$\pm$6.1&3.3  &-0.558&-0.061& 0.073$\pm$0.082  \\
749.3497& $B$ &  180&18&0.650$\pm$0.096 &126.6$\pm$4.4&2.8  &-0.622&-0.188& 0.026$\pm$0.068  \\
749.3518& $V$ &  180&18&0.481$\pm$0.057 &115.2$\pm$3.6&1.6  &-0.371&-0.307&-0.003$\pm$0.040  \\
\noalign{\smallskip}
751.3155& $V$ &  180&18&0.470$\pm$0.057 &119.6$\pm$3.7&1.6  &-0.404&-0.241&-0.129$\pm$0.040  \\
751.3210& $U$ &  240&24&0.636$\pm$0.113 &128.1$\pm$4.9&3.2  &-0.618&-0.152&-0.055$\pm$0.080  \\
751.3231& $B$ &  180&18&0.733$\pm$0.095 &125.1$\pm$3.9&2.7  &-0.690&-0.248&-0.005$\pm$0.067  \\
751.3252& $V$ &  180&18&0.560$\pm$0.057 &123.1$\pm$3.1&1.6  &-0.512&-0.226&-0.031$\pm$0.040 \\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
\end{tabular}
\end{table*}
%
\begin{table*}
\caption[]{Polarimetry of~ {\bf Z CMa, NX Pup, RCW 34,
Lkh{alpha}~218, V 1295 Aql}}
\label{tab8}
\begin{tabular}{ccccccccrr}
\noalign{\smallskip}
\hline
\noalign{\smallskip}
JD2449000+&filter&t,($\sec$)&N&$p\pm\sigma_{p}(\%)$&
$\Theta\pm\sigma_{\Theta}(\degr)$&$\sigma_{1}(\degr)$&
Ux$10^{2}$&Qx$10^{2}$&$p_{c}\pm\sigma_{p_{c}}(\%)$\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
&&&&{\bf Z CMa}&&&&&\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
746.4416&$V$& 180&18&1.49$\pm$0.12& 144.5$\pm$2.3 &~3.4&-1.409&~0.485&  -0.09$\pm$0.08\\
746.4472&$V$& 180&18&1.30$\pm$0.11& 147.8$\pm$2.4 &~3.2&-1.172&~0.562&  -0.09$\pm$0.08\\
\noalign{\smallskip}
747.4770&$V$& 180&18&1.44$\pm$0.12& 148.2$\pm$2.4 &~3.3&-1.290&~0.640&   0.06$\pm$0.08\\
747.4818&$V$& 180&18&1.49$\pm$0.12& 150.0$\pm$2.3 &~3.3&-1.335&~0.663&  -0.21$\pm$0.08\\
\noalign{\smallskip}
751.4196&$U$& 240&24&1.26$\pm$0.25& 131.6$\pm$5.7 &~7.3&-1.251&-0.149& -0.42$\pm$0.18\\
751.4217&$B$& 180&18&1.63$\pm$0.37& 145.5$\pm$6.5 &10.6&-1.522&~0.584& -0.02$\pm$0.26\\
751.4238&$V$& 180&18&1.35$\pm$0.11& 146.2$\pm$2.3 &~3.3&-1.248&~0.514& -0.04$\pm$0.08\\
\hline
\noalign{\smallskip}
&&&&{\bf NX Pup}&&&&&\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
742.3691&$U$& 240&24&0.70$\pm$0.42& 39.4$\pm$21.2&12.0&0.687&~0.136& -0.23$\pm$0.30\\
742.3712&$B$& 180&18&0.40$\pm$0.41& 63.8$\pm$34.1&11.7&0.317&-0.244&  0.28$\pm$0.29\\
742.3726&$V$& 120&12&0.53$\pm$0.23& 67.8$\pm$15.1&~6.6&0.371&-0.379&  0.03$\pm$0.16\\
742.3858&$U$& 240&24&0.87$\pm$0.41& 63.8$\pm$17.3&11.7&0.689&-0.531&  0.39$\pm$0.29\\
742.3893&$V$& 120&12&0.44$\pm$0.23& 55.4$\pm$18.0&~6.5&0.411&-0.156& -0.06$\pm$0.16\\
\noalign{\smallskip}
745.4168&$V$& 180&18&0.81$\pm$0.15& 51.2$\pm$~5.3&~4.2&0.791&-0.174&  -0.05$\pm$0.11\\
745.4230&$V$& 180&18&0.94$\pm$0.15& 52.8$\pm$~4.6&~4.4&0.905&-0.253&  -0.31$\pm$0.11\\
\hline
\noalign{\smallskip}
&&&& {\bf RCW 34}&&&&&\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
745.4723&$V$&  180&18&5.73$\pm$0.27&  59.1$\pm$1.4&~7.8&5.050&-2.709&  0.02$\pm$0.19\\
745.4771&$V$&  180&18&5.41$\pm$0.28&  59.8$\pm$1.5&~8.0&4.704&-2.672&  0.33$\pm$0.20\\
\noalign{\smallskip}
746.4979&$V$&  180&18&5.47$\pm$0.27&  59.0$\pm$1.4&~7.5&4.830&-2.569&   -0.60$\pm$0.19\\
746.5048&$U$&  240&24&4.38$\pm$0.64&  55.5$\pm$4.2&18.1&4.089&-1.570&   -0.07$\pm$0.44\\
746.5069&$B$&  180&18&5.26$\pm$0.81&  56.1$\pm$4.4&22.9&4.870&-1.987&    0.62$\pm$0.57\\
746.5083&$V$&  120&12&5.65$\pm$0.34&  58.9$\pm$1.7&~9.7&5.000&-2.635&   -0.17$\pm$0.24\\
\noalign{\smallskip}
749.4621&$V$&  240&24&5.68$\pm$0.24&  58.8$\pm$1.2&~6.8&5.034&-2.632&   -0.27$\pm$0.17\\
749.4677&$U$&  240&24&6.07$\pm$0.64&  68.0$\pm$3.0&18.4&4.217&-4.366&    0.50$\pm$0.45\\
749.4698&$B$&  180&18&3.78$\pm$0.80&  61.8$\pm$6.3&22.6&3.148&-2.092&   -0.80$\pm$0.56\\
749.4719&$V$&  180&18&5.58$\pm$0.28&  60.3$\pm$1.4&~7.9&4.803&-2.840&   -0.27$\pm$0.20\\
\hline
\noalign{\smallskip}
&&&&{\bf Lkh{alpha} 218}&&&&&\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
746.4597&$V$& 180&18&2.06$\pm$0.38 &~~5.6$\pm$~5.3&10.9&~0.400&~2.021&-0.34$\pm$0.27\\
746.4667&$V$& 300&30&1.92$\pm$0.29 &~15.3$\pm$~4.3&~8.2&~0.977&~1.653&-0.04$\pm$0.20\\
\noalign{\smallskip}
751.4356&$U$& 240&24&2.51$\pm$0.93 &138.4$\pm$13.1&26.7 &-2.492&~0.297&  -0.45$\pm$0.66 \\
751.4377&$B$& 180&18&2.01$\pm$0.79 &172.1$\pm$13.2&22.5 &-0.547&~1.934&   1.64$\pm$0.56 \\
751.4398&$V$& 180&18&0.39$\pm$0.40 &~73.0$\pm$32.0&11.3 &~0.218&-0.323&   0.44$\pm$0.28 \\
\hline
\noalign{\smallskip}
&&&& {\bf V 1295 Aql}&&&&&\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
571.4826 & $U$    &240&24& 0.60$\pm$0.15&163.7$\pm$~7.3&~4.3&-0.323&~0.505& -0.21$\pm$0.11\\
571.4847 & $B$    &180&18& 0.11$\pm$0.07&125.1$\pm$23.2&~2.1&-0.103&-0.037&  0.04$\pm$0.05\\
571.4856 & $V$    &~80&~8& 0.32$\pm$0.10&104.8$\pm$~9.8&~2.7&-0.158&-0.278& -0.08$\pm$0.07\\
571.4860 &$R_{c}$ &~30&~3& 0.09$\pm$0.16&~84.3$\pm$40.2&~4.6&~0.018&-0.088&  0.02$\pm$0.11\\
571.4863 &$I_{c}$ &~30&~3& 0.28$\pm$0.22&~84.7$\pm$27.0&~6.3&~0.052&-0.275&  0.01$\pm$0.16\\
\noalign{\smallskip}
575.4911 & $U$    &180&18& 0.69$\pm$0.15&~16.8$\pm$~6.3&~4.1&~0.382&~0.575&  0.07$\pm$0.10\\
575.4925 & $B$    &120&12& 0.30$\pm$0.08&~49.0$\pm$~8.0&~2.1&~0.297&-0.042& -0.06$\pm$0.05\\
575.4937 & $V$    &100&10& 0.46$\pm$0.07&~94.9$\pm$~4.4&~1.9&-0.078&-0.453& -0.12$\pm$0.05\\
575.4946 &$R_{c}$ &~80&~8& 0.38$\pm$0.08&~78.0$\pm$~6.1&~2.1&~0.155&-0.347&  0.12$\pm$0.05\\
575.4958 &$I_{c}$ &100&10& 0.28$\pm$0.08&116.2$\pm$~8.3&~2.3&-0.222&-0.171&  0.02$\pm$0.06\\
\noalign{\smallskip}
576.4645 & $U$    &180&18& 0.55$\pm$0.15&~27.7$\pm$~7.9&~4.1&~0.453&~0.312& -0.22$\pm$0.10\\
576.4659 & $B$    &120&12& 0.02$\pm$0.08&131.4$\pm$48.1&~2.2&-0.020&-0.003& -0.04$\pm$0.05\\
576.4670 &$V$     &100&10& 0.20$\pm$0.07&113.2$\pm$11.0&~2.0&-0.145&-0.138&  0.04$\pm$0.05\\
576.4680 &$R_{c}$ &~80&~8& 0.29$\pm$0.08&~99.8$\pm$~8.0&~2.2&-0.097&-0.273&  0.01$\pm$0.05\\
576.4691 &$I_{c}$ &100&10& 0.25$\pm$0.08&105.2$\pm$10.0&~2.4&-0.127&-0.216&  0.06$\pm$0.06\\
\noalign{\smallskip}
\hline
\end{tabular}
\end{table*}
%
\begin{table*}
\caption[]{Polarimetry of~ {\bf MWC 148, Lkh{alpha} 112}}
\label{tab9}
\begin{tabular}{ccccccccrr}
\noalign{\smallskip}
\hline
\noalign{\smallskip}
JD2449000+&filter&t,($\sec$)&N&$p\pm\sigma_{p}(\%)$&
$\Theta\pm\sigma_{\Theta}(\degr)$&$\sigma_{1}(\degr)$&
Ux$10^{2}$&Qx$10^{2}$&$p_{c}\pm\sigma_{p_{c}}(\%)$\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
&&&&{\bf MWC 148}&&&&&\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
745.3605 &$U$&  240&24&3.65$\pm$0.18 &161.9$\pm$1.4&5.1&-2.156 &2.945 & -0.08$\pm$0.13 \\
745.3626 &$B$&  180&18&3.66$\pm$0.20 &165.6$\pm$1.7&5.8&-1.763 &3.207 &  0.13$\pm$0.14 \\
745.3640 &$V$&  120&12&3.82$\pm$0.11 &163.6$\pm$0.8&3.0&-2.069 &3.211 & -0.10$\pm$0.08 \\
\noalign{\smallskip}
751.3829 &$V$&  180&18&3.87$\pm$0.09 &164.5$\pm$0.7&2.6&-1.993 &3.317 & 0.08$\pm$0.06 \\
751.3885 &$U$&  240&24&3.78$\pm$0.18 &163.2$\pm$1.3&5.1&-2.092 &3.148 & 0.06$\pm$0.13 \\
751.3906 &$B$&  180&18&3.80$\pm$0.20 &165.5$\pm$1.6&5.8&-1.842 &3.324 &-0.04$\pm$0.14 \\
751.3927 &$V$&  180&18&3.80$\pm$0.09 &165.3$\pm$0.6&2.5&-1.865 &3.311 & 0.01$\pm$0.06 \\
\noalign{\smallskip}
753.3058 &$U$&  240&24&3.75$\pm$0.20 &163.0$\pm$1.5&5.7&-2.097 &3.109 &-0.05$\pm$0.14 \\
753.3079 &$B$&  180&18&3.63$\pm$0.23 &165.6$\pm$1.8&6.5&-1.749 &3.181 &-0.31$\pm$0.16 \\
753.3099 &$V$&  180&18&4.15$\pm$0.10 &164.6$\pm$0.5&2.9&-2.125 &3.565 & 0.06$\pm$0.07 \\
753.3183 &$U$&  240&24&3.61$\pm$0.19 &163.9$\pm$1.5&5.5&-1.923 &3.055 & 0.09$\pm$0.13 \\
753.3204 &$B$&  180&18&3.87$\pm$0.21 &165.6$\pm$1.6&6.1&-1.864 &3.391 &-0.13$\pm$0.15 \\
753.3224 &$V$&  180&18&3.58$\pm$0.09 &164.4$\pm$0.7&2.6&-1.855 &3.062 &-0.06$\pm$0.06 \\
753.3301 &$U$&  240&24&3.66$\pm$0.19 &161.7$\pm$1.5&5.4&-2.182 &2.938 &-0.41$\pm$0.13 \\
753.3322 &$B$&  180&18&4.00$\pm$0.22 &165.3$\pm$1.5&6.1&-1.964 &3.485 &-0.01$\pm$0.15 \\
753.3343 &$V$&  180&18&3.90$\pm$0.09 &164.3$\pm$0.7&2.6&-2.032 &3.329 &-0.01$\pm$0.07 \\
753.3433 &$U$&  240&24&3.66$\pm$0.19 &164.1$\pm$1.5&5.3&-1.929 &3.111 & 0.13$\pm$0.13 \\
753.3454 &$B$&  180&18&3.86$\pm$0.21 &161.9$\pm$1.6&6.0&-2.280 &3.115 & 0.37$\pm$0.15 \\
753.3474 &$V$&  180&18&3.74$\pm$0.09 &163.9$\pm$0.7&2.6&-1.993 &3.165 &-0.01$\pm$0.06 \\
753.3578 &$U$&  240&24&3.82$\pm$0.19 &165.0$\pm$1.4&5.4&-1.910 &3.308 &-0.02$\pm$0.13 \\
753.3599 &$B$&  180&18&3.65$\pm$0.21 &165.5$\pm$1.7&6.0&-1.770 &3.192 & 0.12$\pm$0.15 \\
753.3620 &$V$&  180&18&3.81$\pm$0.09 &164.4$\pm$0.7&2.6&-1.974 &3.259 & 0.07$\pm$0.06 \\
753.3697 &$U$&  240&24&3.52$\pm$0.19 &161.2$\pm$1.5&5.4&-2.148 &2.789 & 0.07$\pm$0.13 \\
753.3718 &$B$&  180&18&3.89$\pm$0.22 &169.2$\pm$1.6&6.1&-1.432 &3.617 &-0.14$\pm$0.15 \\
753.3739 &$V$&  180&18&3.60$\pm$0.09 &165.3$\pm$0.7&2.6&-1.767 &3.136 &-0.00$\pm$0.07 \\
753.3815 &$U$&  240&24&3.53$\pm$0.19 &165.8$\pm$1.5&5.4&-1.679 &3.105 &-0.11$\pm$0.13 \\
753.3836 &$B$&  180&18&3.63$\pm$0.21 &165.1$\pm$1.7&6.1&-1.804 &3.150 & 0.18$\pm$0.15 \\
753.3857 &$V$&  180&18&3.77$\pm$0.09 &165.1$\pm$0.7&2.6&-1.874 &3.271 &-0.10$\pm$0.07 \\
753.3946 &$U$&  240&24&3.63$\pm$0.19 &165.7$\pm$1.5&5.4&-1.738 &3.187 & 0.06$\pm$0.13 \\
753.3967 &$B$&  180&18&3.61$\pm$0.22 &168.5$\pm$1.7&6.1&-1.411 &3.327 & 0.16$\pm$0.15 \\
753.3988 &$V$&  180&18&3.72$\pm$0.09 &163.9$\pm$0.7&2.6&-1.982 &3.148 &-0.11$\pm$0.07 \\
753.4058 &$U$&  240&24&3.37$\pm$0.19 &162.7$\pm$1.5&5.5&-1.914 &2.774 & 0.12$\pm$0.14 \\
753.4078 &$B$&  180&18&3.95$\pm$0.22 &164.8$\pm$1.6&6.1&-1.999 &3.407 &-0.24$\pm$0.15 \\
753.4099 &$V$&  180&18&3.78$\pm$0.09 &164.7$\pm$0.7&2.6&-1.924 &3.254 &-0.04$\pm$0.07 \\
753.4176 &$U$&  240&24&3.39$\pm$0.19 &164.7$\pm$1.6&5.4&-1.726 &2.918 &-0.12$\pm$0.14 \\
753.4197 &$B$&  180&18&3.70$\pm$0.22 &167.8$\pm$1.7&6.2&-1.528 &3.370 &-0.10$\pm$0.15 \\
753.4217 &$V$&  180&18&3.77$\pm$0.09 &164.9$\pm$0.7&2.6&-1.896 &3.258 &-0.12$\pm$0.06 \\
753.4294 &$U$&  240&24&3.13$\pm$0.19 &166.5$\pm$1.6&5.5&-1.421 &2.789 & 0.11$\pm$0.14 \\
753.4315 &$B$&  180&18&3.81$\pm$0.22 &164.5$\pm$1.7&6.2&-1.962 &3.266 & 0.28$\pm$0.15 \\
753.4336 &$V$&  180&18&3.56$\pm$0.09 &166.1$\pm$0.7&2.6&-1.660 &3.148 &-0.03$\pm$0.07 \\
\noalign{\smallskip}
755.2869 &$U$&  240&24&3.54$\pm$0.21 &165.3$\pm$1.7&6.0&-1.738 &3.084 & 0.10$\pm$0.15 \\
755.2890 &$B$&  180&18&3.74$\pm$0.26 &166.3$\pm$2.0&7.3&-1.721 &3.320 &-0.27$\pm$0.18 \\
755.2911 &$V$&  180&18&3.80$\pm$0.10 &164.1$\pm$0.7&2.6&-2.002 &3.230 &-0.00$\pm$0.07 \\
755.3070 &$U$&  240&24&3.41$\pm$0.19 &164.2$\pm$1.6&5.4&-1.787 &2.904 &-0.02$\pm$0.13 \\
755.3091 &$B$&  180&18&3.72$\pm$0.22 &166.5$\pm$1.7&6.2&-1.689 &3.315 & 0.16$\pm$0.15 \\
755.3112 &$V$&  180&18&3.89$\pm$0.09 &165.0$\pm$0.6&2.6&-1.945 &3.369 & 0.06$\pm$0.06 \\
755.3181 &$U$&  240&24&3.66$\pm$0.19 &164.2$\pm$1.5&5.5&-1.918 &3.117 & 0.38$\pm$0.14 \\
755.3202 &$B$&  180&18&3.65$\pm$0.22 &164.6$\pm$1.7&6.3&-1.869 &3.135 & 0.04$\pm$0.16 \\
755.3223 &$V$&  180&18&3.82$\pm$0.09 &164.6$\pm$0.7&2.6&-1.956 &3.281 & 0.04$\pm$0.07 \\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
&&&& {\bf Lkh{alpha}~112}&&&&&\\
\hline
926.5018&$V$    &360&12& 0.39$\pm$0.12& 36.5$\pm$10.0&3.3&~0.37&~0.11& -0.14$\pm$0.08\\
926.5060&$R_{c}$&360&12& 0.15$\pm$0.11& 45.2$\pm$27.0&3.2&~0.15&-0.00&  0.17$\pm$0.08\\
926.5100&$I_{c}$&360&12& 0.20$\pm$0.13& 29.6$\pm$23.0&3.7&~0.17&~0.10& -0.05$\pm$0.09\\
\noalign{\smallskip}
\hline
\end{tabular}
\end{table*}
%
\begin{table*}
\caption[]{Polarimetry of~~ {\bf He 3-554, He 3-597, HD 142666}}
\label{tab10}
\begin{tabular}{ccccccccrr}
\noalign{\smallskip}
\hline
\noalign{\smallskip}
JD2449000+&filter&t,($\sec$)&N&$p\pm\sigma_{p}(\%)$&
$\Theta\pm\sigma_{\Theta}(\degr)$&$\sigma_{1}(\degr)$&
Ux$10^{2}$&Qx$10^{2}$&
$p_{c}\pm\sigma_{p_{c}}(\%)$\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
&&&&{\bf He 3-554}&&&&&\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
745.5375&$V$& 180&18&1.585$\pm$0.072& 112.6$\pm$1.3&1.5&-1.125&-1.117&  -0.024$\pm$0.051\\
745.5431&$V$& 180&18&1.585$\pm$0.071& 112.6$\pm$1.3&1.5&-1.125&-1.117&  -0.073$\pm$0.050\\
\noalign{\smallskip}
749.5489&$U$& 240&24&1.299$\pm$0.155& 116.2$\pm$3.4&4.4&-1.032&-0.789&   0.093$\pm$0.110\\
749.5510&$B$& 180&18&1.500$\pm$0.126& 117.3$\pm$2.4&3.6&-1.222&-0.869&  -0.002$\pm$0.089\\
749.5531&$V$& 180&18&1.501$\pm$0.070& 113.3$\pm$1.3&3.0&-1.091&-1.031&  -0.052$\pm$0.049\\
\noalign{\smallskip}
755.5563&$V$& 240&24&1.501$\pm$0.062& 115.8$\pm$1.2&1.8&-1.176&-0.932&   0.044$\pm$0.044\\
755.5618&$V$& 240&24&1.585$\pm$0.062& 114.2$\pm$1.1&1.8&-1.185&-1.052&  -0.100$\pm$0.044\\
755.5674&$V$& 240&24&1.481$\pm$0.061& 113.7$\pm$1.2&1.8&-1.090&-1.002&   0.033$\pm$0.043\\
755.5737&$V$& 240&24&1.386$\pm$0.062& 111.1$\pm$1.3&1.8&-0.931&-1.027&  -0.034$\pm$0.044\\
755.5792&$V$& 240&24&1.422$\pm$0.062& 112.0$\pm$1.2&1.8&-0.988&-1.023&   0.135$\pm$0.044\\
755.5848&$V$& 240&24&1.413$\pm$0.062& 113.9$\pm$1.2&1.8&-1.047&-0.949&  -0.025$\pm$0.044\\
755.5903&$V$& 240&24&1.479$\pm$0.061& 113.4$\pm$1.2&1.8&-1.078&-1.012&  -0.002$\pm$0.043\\
755.5966&$V$& 240&24&1.369$\pm$0.062& 111.9$\pm$1.3&1.8&-0.948&-0.988&  -0.044$\pm$0.044\\
755.6021&$V$& 240&24&1.462$\pm$0.062& 110.8$\pm$1.2&1.8&-0.971&-1.093&  -0.063$\pm$0.044\\
755.6084&$V$& 240&24&1.655$\pm$0.061& 112.3$\pm$1.1&1.8&-1.162&-1.178&   0.067$\pm$0.043\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
&&&& {\bf He 3-597}&&&&&\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
748.5247&$V$&  180&18&2.58$\pm$0.08& 143.6$\pm$0.9&2.2&-2.47&~0.76&  -0.07$\pm$0.06\\
748.5317&$U$&  240&24&2.70$\pm$0.18& 142.5$\pm$1.9&5.2&-2.61&~0.70&   0.10$\pm$0.13\\
748.5338&$B$&  180&18&2.39$\pm$0.16& 140.0$\pm$1.9&4.6&-2.35&~0.42&   0.13$\pm$0.11\\
748.5359&$V$&  180&18&2.43$\pm$0.08& 141.1$\pm$0.9&2.2&-2.38&~0.51&   0.06$\pm$0.05\\
\noalign{\smallskip}
749.5649&$U$&  240&24&2.05$\pm$0.17& 142.7$\pm$2.4&5.0&-1.98&~0.54&  -0.05$\pm$0.12\\
749.5670&$B$&  180&18&2.52$\pm$0.15& 142.6$\pm$1.7&4.4&-2.43&~0.66&   0.18$\pm$0.11\\
749.5691&$V$&  180&18&2.48$\pm$0.07& 141.6$\pm$0.8&2.1&-2.41&~0.57&  -0.11$\pm$0.05\\
\noalign{\smallskip}
753.4592&$U$&  240&24&2.35$\pm$0.19& 142.8$\pm$2.2&5.3&-2.26&~0.63&  -0.10$\pm$0.13\\
753.4613&$B$&  180&18&2.02$\pm$0.16& 140.3$\pm$2.3&4.7&-1.99&~0.37&   0.06$\pm$0.12\\
753.4634&$V$&  180&18&2.50$\pm$0.08& 142.0$\pm$0.9&2.2&-2.43&~0.61&   0.01$\pm$0.05\\
753.4710&$U$&  240&24&2.32$\pm$0.19& 141.5$\pm$2.3&5.3&-2.26&~0.52&   0.02$\pm$0.13\\
753.4731&$B$&  180&18&2.43$\pm$0.16& 140.8$\pm$1.9&4.7&-2.38&~0.49&  -0.17$\pm$0.11\\
753.4752&$V$&  180&18&2.55$\pm$0.08& 141.9$\pm$0.8&2.2&-2.48&~0.61&   0.01$\pm$0.05\\
753.4828&$U$&  240&24&2.63$\pm$0.18& 144.6$\pm$2.0&5.3&-2.48&~0.87&  -0.25$\pm$0.13\\
753.4849&$B$&  180&18&2.13$\pm$0.16& 139.0$\pm$2.1&4.6&-2.11&~0.30&   0.10$\pm$0.11\\
753.4870&$V$&  180&18&2.41$\pm$0.08& 143.5$\pm$0.9&2.2&-2.30&~0.70&  -0.07$\pm$0.05\\
753.4981&$U$&  240&24&2.34$\pm$0.18& 144.2$\pm$2.2&5.3&-2.22&~0.74&   0.22$\pm$0.13\\
753.5002&$B$&  180&18&2.16$\pm$0.20& 141.8$\pm$2.7&4.5&-2.10&~0.51&   0.24$\pm$0.14\\
753.5023&$V$&  180&18&2.55$\pm$0.08& 141.3$\pm$0.9&2.2&-2.49&~0.56&   0.17$\pm$0.06\\
753.5092&$U$&  240&24&2.67$\pm$0.18& 143.1$\pm$1.9&5.3&-2.56&~0.74&   0.03$\pm$0.13\\
753.5113&$B$&  180&18&2.26$\pm$0.16& 144.0$\pm$2.0&5.8&-2.15&~0.70&   0.09$\pm$0.11\\
753.5134&$V$&  180&18&2.51$\pm$0.08& 144.1$\pm$0.9&2.2&-2.38&~0.78&  -0.02$\pm$0.05\\
753.5203&$U$&  240&24&2.05$\pm$0.18& 140.6$\pm$2.5&5.3&-2.01&~0.40&  -0.09$\pm$0.13\\
753.5224&$B$&  180&18&2.29$\pm$0.16& 144.3$\pm$2.0&4.6&-2.17&~0.73&  -0.06$\pm$0.11\\
753.5245&$V$&  180&18&2.35$\pm$0.08& 141.9$\pm$0.9&2.2&-2.28&~0.58&   0.09$\pm$0.05\\
753.5322&$U$&  240&24&2.47$\pm$0.18& 144.4$\pm$2.1&5.3&-2.34&~0.80&   0.03$\pm$0.13\\
753.5343&$B$&  180&18&2.52$\pm$0.16& 139.9$\pm$1.8&4.6&-2.48&~0.43&  -0.20$\pm$0.11\\
753.5363&$V$&  180&18&2.59$\pm$0.08& 142.9$\pm$0.8&2.2&-2.49&~0.71&   0.01$\pm$0.05\\
753.5432&$U$&  240&24&2.23$\pm$0.18& 141.8$\pm$2.3&5.3&-2.17&~0.52&  -0.08$\pm$0.13\\
753.5453&$B$&  180&18&2.17$\pm$0.16& 141.3$\pm$2.1&4.6&-2.12&~0.47&   0.05$\pm$0.11\\
753.5474&$V$&  180&18&2.41$\pm$0.08& 143.0$\pm$0.9&2.2&-2.32&~0.66&  -0.06$\pm$0.06\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
&&&& {\bf HD 142666}&&&&&\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
927.2682&$V$    & 600&20& 0.629$\pm$0.046&  77.5$\pm$1.3&1.3&~0.266&-0.570& 0.015$\pm$0.033\\
927.2751&$R_{c}$& 600&20& 0.679$\pm$0.042&  75.7$\pm$1.2&1.2&~0.325&-0.596& 0.054$\pm$0.030\\
927.2821&$I_{c}$& 600&20& 0.707$\pm$0.047&  76.5$\pm$1.3&1.3&~0.323&-0.629& 0.028$\pm$0.033\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
\end{tabular}
\end{table*}
%
\begin{table*}
\caption[]{Polarimetry of {\bf He 3-515, He 3-644, He 3-672, He 3-692, VV Ser}}
\label{tab11}
\begin{tabular}{ccccccccrr}
\noalign{\smallskip}
\hline
\noalign{\smallskip}
JD2449000+&filter&t,($\sec$)&N&$p\pm\sigma_{p}(\%)$&
$\Theta\pm\sigma_{\Theta}(\degr)$&$\sigma_{1}(\degr)$&
Ux$10^{2}$&Qx$10^{2}$&
$p_{c}\pm\sigma_{p_{c}}(\%)$\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
&&&& {\bf He 3-515}&&&&&\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
744.5543 &$V$&  180&18&0.74$\pm$0.15& 109.2$\pm$~5.9&4.2&-0.460&-0.580&  -0.09$\pm$0.10  \\
744.5591 &$V$&  180&18&0.78$\pm$0.20& 109.9$\pm$~7.4&5.6&-0.499&-0.599&   0.23$\pm$0.14  \\
\noalign{\smallskip}
747.5278 &$V$&  180&18&0.79$\pm$0.15& 116.7$\pm$~5.5&4.2&-0.634&-0.471&  -0.26$\pm$0.10 \\
747.5332 &$V$&  180&18&0.60$\pm$0.17& 114.1$\pm$~8.5&4.9&-0.477&-0.400&   0.20$\pm$0.12  \\
747.5402 &$V$&  180&18&0.37$\pm$0.30& 166.0$\pm$28.0&8.5&-0.174&~0.327&  -0.03$\pm$0.21 \\
\noalign{\smallskip}
749.5309 &$U$&  240&24&1.20$\pm$0.23& 141.0$\pm$~5.5&6.7&-1.174&~0.249&   -0.09$\pm$0.17  \\
749.5330 &$B$&  180&18&0.77$\pm$0.19& 125.5$\pm$~7.1&5.3&-0.728&-0.251&   -0.02$\pm$0.13  \\
749.5351 &$V$&  180&18&0.64$\pm$0.11& 114.7$\pm$~4.9&3.2&-0.486&-0.416&    0.10$\pm$0.08  \\
\noalign{\smallskip}
751.4773 &$U$&  240&24&0.30$\pm$0.24& ~55.0$\pm$27.2&6.9&~0.282&-0.103&   -0.19$\pm$0.17  \\
751.4794 &$B$&  180&18&0.22$\pm$0.15& ~45.7$\pm$23.1&5.4&~0.220&-0.005&    0.16$\pm$0.13  \\
751.4815 &$V$&  180&18&0.17$\pm$0.12& 163.2$\pm$25.4&3.4&-0.094&-0.142&   -0.02$\pm$0.08  \\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
&&&&{\bf He 3-644}&&&&&\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
742.5573&$U$& 240&24&0.515$\pm$0.087& 152.8$\pm$~5.0&2.5&-0.419&~0.300& -0.095$\pm$0.061\\
742.5594&$B$& 180&18&0.201$\pm$0.070& 168.4$\pm$14.1&2.0&-0.079&~0.185&  0.097$\pm$0.049\\
742.5608&$V$& 180&18&0.235$\pm$0.051& 160.5$\pm$~6.0&1.5&-0.148&~0.183& -0.044$\pm$0.036\\
\noalign{\smallskip}
745.5577&$V$& 180&18&0.115$\pm$0.113& 124.7$\pm$32.3&3.2&-0.107&-0.042&  0.030$\pm$0.080\\
745.5632&$V$& 180&18&0.285$\pm$0.114& 156.7$\pm$13.4&3.3&-0.207&~0.196& -0.098$\pm$0.080\\
\noalign{\smallskip}
751.5300&$U$& 240&24&0.383$\pm$0.255& ~94.3$\pm$24.2&7.3&-0.059&-0.378&  0.042$\pm$0.181\\
751.5321&$B$& 180&18&0.102$\pm$0.215& 170.0$\pm$43.0&6.1&-0.035&~0.096&  0.332$\pm$0.152\\
751.5342&$V$& 180&18&0.072$\pm$0.116& ~66.2$\pm$40.1&3.3&~0.053&-0.049& -0.078$\pm$0.082\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
&&&& {\bf He 3-672}&&&&&\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
743.5910&$U$&240&24&0.303$\pm$0.081& 159.4$\pm$24.0&~8.2 &-0.200&~0.228& 0.103$\pm$0.057 \\
743.5932&$B$&180&18&0.023$\pm$0.062& 160.1$\pm$47.2&12.4 &-0.015&~0.018& 0.070$\pm$0.044\\
743.5945&$V$&120&12&0.223$\pm$0.046& ~33.2$\pm$~6.7&~5.8 &~0.204&~0.089&-0.002$\pm$0.033  \\
743.6057&$U$&240&24&0.420$\pm$0.085& 137.6$\pm$~6.2&~6.2 &-0.418&~0.038& 0.037$\pm$0.060   \\
743.6078&$B$&180&18&0.193$\pm$0.068& 110.8$\pm$12.0&10.3 &-0.128&-0.144& 0.005$\pm$0.048  \\
743.6099&$V$&180&18&0.128$\pm$0.040& ~61.9$\pm$~9.0&~9.6 &~0.106&-0.071&-0.075$\pm$0.028  \\
\noalign{\smallskip}
748.5539&$V$&180&18&0.231$\pm$0.114&~49.2$\pm$17.1&~3.3 &~0.229&-0.034& 0.073$\pm$0.080   \\
748.5588&$V$&180&18&0.313$\pm$0.113&~76.6$\pm$11.0&~9.2 &~0.141&-0.279& 0.069$\pm$0.079    \\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
&&&& {\bf He 3-692}&&&&&\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
742.5808 &$U$& 240&24&1.12$\pm$0.33 & 112.4$\pm$~8.6&9.4 &-0.789&-0.795&  0.16$\pm$0.23 \\
742.5829 &$B$& 180&18&0.95$\pm$0.26 & 118.9$\pm$~8.0&7.3 &-0.804&-0.506& -0.13$\pm$0.18 \\
742.5843 &$V$& 120&12&0.70$\pm$0.18 &  93.6$\pm$~7.4&5.1 &-0.088&-0.694& -0.04$\pm$0.13 \\
\noalign{\smallskip}
746.5805&$U$&  240&24&0.32$\pm$0.30& 139.8$\pm$32.1&~8.6 &-0.316&~0.053& -0.22$\pm$0.21\\
746.5826&$B$&  180&18&0.81$\pm$0.21& 115.6$\pm$~7.5&~6.0 &-0.631&-0.508&  0.32$\pm$0.15\\
746.5840&$V$&  120&12&0.44$\pm$0.15& 106.1$\pm$11.0&~4.2 &-0.234&-0.372&  0.14$\pm$0.10\\
746.5916&$U$&  240&24&0.91$\pm$0.28& 121.6$\pm$~9.0&~8.0 &-0.812&-0.410&  0.01$\pm$0.20\\
746.5937&$B$&  180&18&0.46$\pm$0.37&  88.3$\pm$29.4&10.5 &~0.027&-0.459& -0.09$\pm$0.26\\
746.5951&$V$&  120&12&0.99$\pm$0.29& 106.2$\pm$~8.5&~8.3 &-0.530&-0.836& -0.29$\pm$0.21\\
\noalign{\smallskip}
748.5692&$V$&  180&18&0.45$\pm$0.12&  87.9$\pm$~7.7&~3.3 &~0.033&-0.449&  0.10$\pm$0.08\\
748.5747&$U$&  240&24&0.54$\pm$0.26&  98.3$\pm$17.1&~7.4 &-0.154&-0.517& -0.03$\pm$0.18\\
748.5768&$B$&  180&18&0.37$\pm$0.22&  88.3$\pm$21.0&~6.2 &~0.022&-0.369& -0.01$\pm$0.15\\
748.5789&$V$&  180&18&0.66$\pm$0.12&  92.2$\pm$~5.2&~3.4 &-0.051&-0.658& -0.03$\pm$0.08\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
&&&&{\bf VV Ser}&&&&&\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
575.3606 & $V$     &100&10&0.94$\pm$0.53&106.0$\pm$20.1&15.0&-0.50&-0.80& 0.76$\pm$0.37\\
575.3616 & $R_{c}$ &~80&~8&1.94$\pm$0.41&~72.1$\pm$~5.7&11.6&~1.14&-1.57& 0.49$\pm$0.29\\
575.3628 & $I_{c}$ &100&10&1.78$\pm$0.31&~82.6$\pm$~5.6&~8.9&~0.46&-1.72&-0.48$\pm$0.22\\
\noalign{\smallskip}
\hline
\noalign{\smallskip}
\end{tabular}
\end{table*}
\end{document}
