1 Language
                                     SDM\ Command Language Summary

                     ASDM to/from native CLIC format converter

        READ            : Read ASDM data set  and write converted output
                          on ipb file
        WRITE           : Convert current index from ipb into ASDM data set
1 READ
        SDM\READ name

    Convert  the  input ASDM data set  to native CLIC format. Scans are read
    in sequence from the ASDM tables and are written in the CLIC output file
    (should have been opened and/or initialized by command FILE OUT).

    `name' is the name of the root directory of the asdm data set.


1 WRITE
        SDM\WRITE [file] [/HOLO] [/ANTENNA]

    Write   data   into a ASDM data set. All data in the current index (ini-
    tialized by the last command FIND) are  converted.   This  command   and
    many  of the options were actually designed to prepare test data for AL-
    MA.

    `file'

    is the output root directory of the created data set.



    /HOLO ant ref

    generates test holography tables, based on actual holography  data  from
    Plateau  de Bure. `ant' is the antenna that was scanned and `ref' points
    to the reference antenna (i.e. the data from the baseline from `ref'  to
    `ant' will be used).

    /ANTENNA ant1 ant2 ant3 ... antn

    selects a subset of antennas (subarray) which is only used.
























