
1 GAUSS
        TELCAL\GAUSS  Xvar  Yvar [Wvar] [/GUESS Area Position Width] [/FIXED
    Afix Pfix Wfix]

    Fit a one dimensional Gaussian through the (Xvar,Yvar)  points.  An  op-
    tional  weight array (Wvar) may be given. Area, position and width first
    guess are given through the /GUESS option. Default first guess is 1. Us-
    er  may  impose a parameter through the logical variables Afix, Pfix and
    Wfix. All parameters are considered variable by default.

1 POINT
        TELCAL\POINT [/CROSS]

    Solve for telescope pointing parameters. The default (and currently only
    solution) is to solve through a LAMBDA/BETA cross. Parameters are solved
    and the fit is plotted as soon as each subscan is finished. User can ac-
    cess  to  all related information through the global SIC structure named
    PCROSS.

1 ENDOFHELP













































